% Hyphenation, miscellaneous macros, and initial values for standard layout
\newcount\usenglish  \global\usenglish=0
\newcount\german     \global\german=1
\newcount\austrian   \global\austrian=2
\newcount\french     \global\french=3
\newcount\english    \global\english=4
\newcount\greek      \global\greek=5

\message{US-english hyphenation}
\language=\usenglish
\lefthyphenmin=2 \righthyphenmin=3 % disallow x- or -xx breaks
\input ehyphen

\message{german hyphenation}
\language=\german
\lefthyphenmin=2 \righthyphenmin=3 % disallow x- or -xx breaks
\input ghyphen.min

\language=\usenglish
