Copyright: Digital Equipment Corporation


SMC 8432 Ethernet PCI Adapter
SMC 8432 - EtherPower PCI Ethernet Adapter

Use this dialog box to setup the data rate for the Standard Microsystems Corporation's SMC 8432 EtherPower PCI Ethernet adapter.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


SMC 8432 Ethernet PCI Adapter
SMC 8432e - EtherPower PCI Ethernet Adapter

Use this dialog box to setup the data rate for the Standard Microsystems Corporation's SMC 8432e EtherPower PCI Ethernet adapter.

AutoSense

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


SMC 8434 Ethernet PCI Adapter
SMC 8434 - EtherPower2 PCI Ethernet Adapter

Use this dialog box to setup the data rate for the Standard Microsystems Corporation's SMC 8434 EtherPower2 PCI Ethernet adapter.

AutoDetect

Twisted_Pair (10BaseT)

Twisted_Pair Full_Duplex

Twisted_Pair No_Link_Test

BNC (10Base2)

AUI (10Base5)


SMC9332 Fast Ethernet  PCI Adapter
SMC 9332 - EtherPower10/100 PCI Fast Ethernet Adapter

Use this dialog box to setup the data rate for the Standard Microsystems Corporation's SMC 9332  EtherPower10/100 PCI Fast Ethernet Family.

AutoSense

100BaseTx

100BaseTx Full_Duplex

10BaseT


Check once the 10BaseT (TP), 10Base2 (BNC) and 10Base5 (AUI) media ports and select the first live media.

This detection takes place during driver initialization: the wire should be connected before the system boots and media  cannot be switched during run time.

AutoDectect does not check 10BaseT's Full_Duplex and No_Link_Test modes.


Autosense the media ports supported by the adapter and dynamically switch to the live media.

(AutoSense does not sense 10BaseT's No_Link_Test mode.)


Autosense the media ports supported by the adapter and dynamically switch to the live media.

Nway's negociation is disabled.

(AutoSense does not sense 10BaseT's No_Link_Test mode.)


Select the 10BaseT connection (RJ connector).


Select the Full_Duplex 10BaseT connection (RJ connector).


Select the 10BaseT connection (RJ connector) with no Link Integrity Test.

Choose this option if the adapter is connected to a hub which does not generate link pulses to check the link integrity.


Select the 10Base2 connection (BNC connector).


Select the 10Base5 connection (AUI 15_pin connector).


Select the Fast Ethernet 100BaseTx connection.


Select the Fast Ethernet Full_Duplex 100BaseTx connection.


Select the Fast Ethernet 100BaseT4 connection.


Select the Fast Ethernet 100BaseFx connection.