User Guide for VVencode/VVdecode

1

1 Guide to using VVcode

ffl general introduction

1.1 VVencode command options

ffl described in a generic manner with operating system specifics at the end of the section The general syntax of the VVencode command line is:

vvencode [options] input-file [options] [output-file] [options]

There are two parameters and many optional qualifiers. The parameters are:

input-file
output-file

The command qualifiers modify the behaviour of VVcode and are all optional. Qualifiers may appear before, between or after the parameters. The qualifiers acceptable to VVencode are:

debug Write copious debugging output to the standard error device or to the log file if the
          +log qualifier was specified. This qualifier would normally only be used when trying

to report a VVencode problem and may indeed have been disabled for the version that you are using.

encoding_table file-spec

Read the encoding table to be used from the file ‘file-spec’. The file must contain the 64 characters to be used by VVencode. If this qualifier is not specified, the default

          VVencode encoding table will be used.
format file-format

Explicitly specify the file format that should be assumed by VVencode when it is reading the input file. The file-format value must be one of ‘fixed’, ‘stream’ and ‘variable’. This qualifier would only be used if it was necessary to override the value determined automatically by VVencode.

header_filespec file-spec
help VVencode will display a usage message on the standard error device and exit.
log file-spec
mode file-mode

Explicitly specify the file mode that should be assumed by VVencode when it is reading the input file. The file-format value must be one of ‘binary’ and ‘text’. This qualifier would only be used if it was necessary to override the value determined automatically by VVencode.

overwrite
record_length
split_size
timestamp time
translation_file file-spec

1.2 VVdecode command options

The general syntax of the VVdecode command line is:

vvdecode [options] input-file [options] [output-file] [options]

1.3 Operating system specific considerations

1.3.1 MS-DOS

ffl qualifiers introduced with ‘/’ or ‘-’ and must be separated from each other by whitespace ffl values separated from qualifier by ‘=’ or ‘:’ ffl optional values supported ffl VVcode will act as a filter when ‘-’ is specified as the input or output file ffl optional file specification for ‘log’ qualifier ffl examples of VVencode usage

1.3.2 OS/2

ffl qualifiers introduced with ‘/’ or ‘-’ and must be separated from each other by whitespace ffl values separated from qualifier by ‘=’ or ‘:’ ffl optional values supported ffl VVcode will act as a filter when ‘-’ is specified as the input or output file ffl optional file specification for ‘log’ qualifier ffl GCC 2.1 implementation does not support file timestamping ffl HPFS file names supported ffl OS/2 extended attributes not supported yet ffl examples of VVencode usage

1.3.3 Unix

ffl qualifiers introduced with ‘-’ or ‘+’ and must be separated from each other by whitespace ffl values separated from qualifier by whitespace ffl optional values not supported ffl VVcode will act as a filter when ‘-’ is specified as the input or output file ffl examples of VVencode usage

1.3.4 VAX/VMS

ffl qualifiers introduced with ‘/’ ffl values separated from qualifier by ‘=’ ffl standard VMS CLD conventions ffl optional values supported ffl VVcode will act as a filter when ‘-’ is specified as the input or output file though meaningless on VMS ffl optional file specification for ‘log’ qualifier ffl examples of VVencode usage

1.3.5 VM/CMS

ffl qualifiers introduced with ‘(’ and must be separated from each other by whitespace ffl values separated from qualifier by ‘=’ or ‘:’ ffl command line driven through REXX EXEC ffl optional values supported ffl VVcode does not support input or output from/to standard I/O ffl optional file specification for ‘log’ qualifier ffl examples of VVencode usage

1.4 Transferring files between systems

ffl file type and format ffl character set ffl electronic mail ffl timestamping

1.5 Unusual applications of VVcode

ffl character set conversion ffl file type conversion ffl VMS file format conversion vs. CONVERT

Table of Contents

1 Guide to using VVcode : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2

1.1 VVencode command options : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 2 1.2 VVdecode command options : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 3 1.3 Operating system specific considerations : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 3 1.3.1 MS-DOS : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 3 1.3.2 OS/2 : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 3 1.3.3 Unix : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 3 1.3.4 VAX/VMS : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 4 1.3.5 VM/CMS : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 4 1.4 Transferring files between systems : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 4 1.5 Unusual applications of VVcode : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : : 4