***************************************************************************
******************** HELP FOR "X TO EXIT" MENU***********************
***************************************************************************

QUICK START: See the end of the HELP screen in the "Generate Index" Menu.

OVERVIEW: The "X to Exit" menu includes options which enable you to quit
          INDEX! altogether or to shell out to DOS from within INDEX!
          without losing the current parameters of your INDEX! session.

DOS SHELL: A DOS shell is simply a means of executing commands from the DOS
           prompt without having to exit a program and then reenter it and
           reset its parameters later. The DOS shell in INDEX! is fairly
           small because of INDEX!'s large memory requirements. Therefore,
           it is useful mainly for DOS commands such as DIR, COPY, DEL,
           ERASE, and so on. It provides a handy way to solve file problems
           that you discover when preparing for indexing.

QUIT: This choice causes a complete exit from INDEX!. Only your saved
      defaults are retained for your next session.

HELP: This option provides the on-screen information which you are now
      reading.

MORE HELP: If you would like to have more help online relating to the
           X TO EXIT menu, you can edit the file "INEXTMEN.HLP" in any
           ASCII text editor, adding to or reshaping the material as you
           see fit up to a maximum file size of 64K. Use spaces rather
           than tabs to indent, limit line lengths to 76 characters, and
           end each and every line with a carriage return.
