Copyright: Wed Apr 07 21:02:07 1999


التعليمات متوفرة لكل عنصر في هذه المجموعة. انقر فوق  [image]  في أعلى مربع الحوار، ثم انقر فوق العنصر المحدد الذي تريد معلومات حوله.


سرد المهام وإظهار متى تكون هذه المهام مجدولة للتشغيل، متى بدأت أخر مرة، متى انتهت آخر مرة، وماذا كانت النتائج.


عرض الاسم للمهمة المجدولة.


توفير فراغ لكتابة ملاحظة أو معلومات أخرى حول المهمة المجدولة.


توفير فراغ لكتابة حساب المستخدم لتشغيل المهمة المجدولة. إذا كانت المهمة المجدولة تتطلب للتشغيل امتياز مستوى مسؤول، يجب أن يملك هذا الحساب امتيازات المسؤول.


انقر هنا للاستعراض عبر المجلدات للبحث عن الملف الذي تريد تشغيله.


توفير فراغ لتحديد المجلد الذي يتضمن ملف البرنامج أو بعض الملفات ذات الصلة. أحياناً، تحتاج البرامج لاستخدام ملفات من مواقع أخرى. ربما تحتاج لتحديد المجلد حيث تكون هذه الملفات موجودة ليتمكن البرنامج من إيجادهم.


توفير فراغ لكتابة مسار الملف الذي تريد تشغيله كمهمة مجدولة.

إذا كانت مهمة البرنامج تتطلب معلمات، قم بكتابتهم في مربع "تشغيل"، بعد مسار المهمة.

إذا كان مسار مهمة البرنامج يتضمن فراغات، قم بوضع علامتي اقتباس (") حول مسار المهمة بكامله.


انقر هنا لتوفير كلمة مرور للحساب الذي حددته في مربع "التشغيل كـ"، يجب أن تكتب كلمة المرور الصحيحة للحساب.


توفير فراغ لكتابة كلمة المرور الخاصة بك. تظهر علامات النجمة عوضاً عن الذي كتبته.


توفير فراغ لكتابة وتأكيد كلمة المرور. تظهر علامات النجمة عوضاً عن الذي كتبته.


تحديد تشغيل المهمة المجدولة في الوقت المحدد. يتم تحديد هذا المربع بشكل افتراضي.


بدء المهمة بعد التوقف عن استخدام لوحة المفاتيح أو الماوس لمدة زمنية محددة. إذا كانت المهمة مجدولة للتكرار، يحدث التشغيل الأول للمهمة فقط إذا كان الكمبيوتر خاملاً في الفترة الزمنية المحددة.

إذا كان الكمبيوتر غير معطل عندما تحاول المهمة البدء لأول مرة، فإن مجدول المهمة يتابع التأكد من أن الكمبيوتر معطل من أجل مقدار الزمن المحدد في "إذا لم يكن الكمبيوتر خاملاً عند وقت بدء التشغيل المجدول، أعد المحاولة لمدة:".

 إذا لم يصبح الكمبيوتر خاملاً خلال هذا الزمن، لن يحدث تشغيل لأي مهمة.


تحديد كم من الوقت سيتابع مجدول المهمة التأكد من أن الكمبيوتر خاملاً، إذا تم التأكد من "بدء تشغيل المهمة المجدولة فقط عند خمول الكمبيوتر لفترة" والكمبيوتر غير معطل في وقت الجدولة.

إذا لم يصبح الكمبيوتر خاملاً خلال هذا الوقت، لن يحدث تشغيل لأي مهمة.


تحديد عدد الدقائق الواجب انقضاؤها دون استخدام لوحة المفاتيح أو الماوس قبل بدء تشغيل المهمة.


إيقاف المهمة المجدولة إذا قمت باستخدام الكمبيوتر بينما تكون المهمة قيد التشغيل.


منع المهمة المجدولة من البدء عندما يكون الكمبيوتر يعمل بالبطاريات.

بعض البرامج تصل كثيراً إلى القرص الثابت وذلك يؤدي إلى استهلاك البطاريات بسرعة أكبر. اختيار خانة الاختيار هذه يمكن أن يطيل عمر البطاريات.


إيقاف تشغيل المهمة عندما يبدأ تشغيل الكمبيوتر بواسطة البطاريات.


تنبيه الكمبيوتر لتشغيل المهمة في الوقت المجدول، حتى لو كان الكمبيوتر في حالة السكون ويستخدم إدارة الطاقة OnNow.


حذف ملف المهمة من القرص الثابت بعد انتهاء تشغيلها ولم يعد هناك تشغيلات مجدولة للمهمة. هذا مفيد أكثر للمهمات التي تجدولها ليتم تشغيلها مرة واحدة فقط.


إيقاف المهمة بعد أن تم تشغيلها للمدة المحددة من الوقت.


انقر هنا لتعيين خيارات جدولة إضافية.


انقر هنا لتعيين خيارات جدولة متقدمة.


تحديد تاريخ البدء للمهمة المجدولة.


القيام بتشغيل المهمة بشكل متكرر، بفاصل زمني محدد بـ "كل".


تحديد مدى تكرار المهمة(بالدقائق أو بالساعات).


تحديد تاريخ نهاية المهمة المجدولة.


إيقاف كافة مراحل المهمة والتي ما تزال قيد التشغيل حتى الموعد الأخير المحدد بـ "وقت" أو "مدة". هذا الخيار مفيد في حال عدم توقف المهمات تلقائياً.

إذا كانت خانة الاختيار هذه غير محددة، ستستمر المهمة بالعمل، حتى بعد الموعد الأخير. هذا مفيد، على سبيل المثال، إذا كانت مهمتك تستغرق ساعة واحدة لتعمل لكن تبدأ قبل 15 دقيقة من الموعد الأخير. مع ذلك إذا لم تتوقف المهمة تلقائياً عندما تنتهي من التشغيل فعندها ربما تحتاج لإيقافها.


إظهار الجدولة (الجدولات) الحالية للمهمة.


تحديد أن تكرار المهمة المجدولة يجب أن ينتهي عند زمن معرّف، أو أن التكرار يجب أن يستمر لفترة زمنية معينة بعد البدء.


تحديد الوقت الذي سيتم عنده إيقاف تكرار تشغيل المهمة.


تحديد الوقت الذي سيتم فيه تكرار تشغيل المهمة.


تعريف عدد مرات تشغيل المهمة.


تحديد الوقت من النهار لبدء المهمة، إذا كانت مجدولة يومياً، أو أسبوعياً، أو شهرياً، أو لمرة واحدة.


انقر هنا لإعداد خيارات جدولة إضافية للمهمة. على سبيل المثال، يمكنك تعريف تاريخ البدء والانتهاء.


تشغيل المهمة المجدولة فقط لمرة واحدة، بدءاً من التاريخ والزمن المحددين.


تشغيل المهمة المجدولة يومياً، بدءاً من التاريخ والزمن المحددين. انقر فوق السهم إلى الأعلى أو إلى الأسفل لتحديد عدد مرات تشغيل المهمة.


تحديد الفترات الزمنية (بالأسابيع ) لتشغيل المهمة. يمكنك اختيار عدة أيام من كل أسبوع لتشغيل المهمة.


تحديد اليوم الذي تريده لبدء المهمة.


تحديد اليوم الذي تريده لتشغيل المهمة. اكتب رقماً أو انقر فوق الأسهم لتعيين يوم جديد.

إذا قمت بتحديد اليوم بين 29 و31، سيتم تشغيل المهمة فقط في الأشهر التي تحتوي على ذلك اليوم.


تحديد الشهر الذي تريد فيه بدء المهمة. تستطيع اختيار عدة أشهر لتشغيل المهمة.


تحديد اليوم من الشهر لتشغيل المهمة. في القائمة الأولى، قم بتحديد فيما إذا كنت تريد أن تشتغل المهمة في أول تواجد، أو الثاني، أو الثالث، أو الرابع، أو آخر تواجد لهذا اليوم المحدد من الأسبوع خلال الشهر. في القائمة الثانية، أنقر فوق اليوم المحدد من الأسبوع الذي تريده.


تحديد كم من الوقت يجب أن يبقى الكمبيوتر خاملاً قبل بدء المهمة المجدولة.


انقر هنا لإنشاء جدولة إضافية للمهمة الحالية. بهذه الطريقة، يمكنك تحديد مهمة تعمل في جدولات متعددة (مثل في كل يوم اثنين أو في كل أول يوم من كل شهر).


انقر هنا لإيقاف المهمة عن العمل في الجدولة المختارة. يتم حذف الجدولة المختارة من قائمة الجدولة.


انقر هنا لإنشاء جدولة مختلفة للمهمة. يمكنك إنشاء جدولات متعددة باستعمال هذه الميزة.


انقر هنا لحذف أي جدولة من الجدولات المختلفة التي أنشأتها للمهمة.


انقر هنا لعرض وتغيير الإعدادات الخاصة بالتطبيق للبرامج المجدولة.