Rolodex found too many field entries matching your search string to display
each record on the screen and allow you to select each one by number.  Instead,
you may view the entire list, one-by-one, by entering 'v' at the prompt;
or, you may abort this search by entering '\', and request another search
using a more unique search string to reduce the number of matches.
