You may use SoundSculptor to create custom sounds
for other Ibis music software. Play It By Ear,
RhythmAce and NotePlay load a sound file, IBIS.INS,
at startup time.  If the file does not exist then
an internally specified default timbre is used.

To create a new timbre for an Ibis program:

 1) Use SoundSculptor to design your new timbre.

 2) Save the new timbre to "IBIS.INS".  Use the
    File main menu button and select the
    "Save to INS" item from the pop-up menu. When
    prompted for the timbre's name, type in "IBIS".

 3) Quit SoundSculptor. Use the ESC key on your
    computer keyboard.

 4) Use the DOS "COPY" command to copy IBIS.INS to
    the home directory of the IBIS program. For
    example:

      C:> COPY C:\SS\IBIS.INS C:\EAR



    Note: This assumes that you have installed
    SoundSculptor in a subdirectory on your C:
    drive with the name "SS" and Play It By Ear
    was installed in a subdirector called "EAR".
