name	C4WCombo

description	'Clip-4-Win Application'

exetype	windows	3.1	;remove the 3.1 for some linkers

stub	'c4wstub.exe'

code	preload moveable discardable

data	preload moveable

stacksize	6000
heapsize	2094		;this determines how big a combo box can be

exports	__WndProc	@1
	DialogWndProc	@2

