Copyright: Copyright 1997 TommySoftware®


Index
General

Introduction

Library Installation from CD-ROM

Level 1 Libraries

(For all TommySoftware® applications)

Electrical Engineering #1

Electronics

Electrical Installation

Digital Information Processing

Process Engineering

Valves

Heating

Chemistry Laboratory Equipment #1

Chemistry Laboratory Equipment #2

Chemistry Laboratory Equipment #3

Furniture #1

Furniture #2

Hydraulics & Pneumatics

Environment & Ecology

Landscape Design

Electrical Engineering #2

Steel Sections

Level 3 Libraries

(For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only)

Screws

Screws DIN 912

Screws DIN 931

Screws DIN 933

Screws DIN 7968

Screws DIN 7991

Screw Heads

Nuts

Profile


Introduction

TommySoftware® is pleased to announce a comprehensive range of symbol libraries for serious users of all TommySoftware® CAD and graphic packages. This catalogue lists the full range of symbols in each library although for space reasons we are only illustrating a representative sample from each.

Note that for technical reasons the sample illustrations shown here will not display or print with the accuracy or definition of the original symbols when used in the TommySoftware® application. Specifically some lines will appear jagged, especially on low resolution displays, and curves may not be shown accurately. The samples are intended purely to give you an idea of the libraries contents. Each symbol is an accurate, high definition scale drawing in its own right and has been produced by professionals for TommySoftware®, to industrial standards where appropriate.

Use of the appropriate symbol library for your particular field will save you a considerable amount of time and will greatly enhance the quality of your work. Professional quality drawings will become even easier!

While it is believed that all information given in this catalogue is correct, TommySoftware® does not make any claims regarding the accuracy of the information given, and accepts no responsibility for any consequence of its use or of the products referred to.

Library Installation from CD-ROM

For a description of the installation of libraries from the TommySoftware® CD-ROM, please click here!

North America, Inc.	Germany

1843 10th Avenue	Selchower Straße 32

San Francisco, CA 94122	D-12049 Berlin

U. S. A.	Germany

Phone (415) 566 6118	Phone +49 30 621 5931

Fax (415) 566 6589	Fax +49 30 621 4064

Internet

sales@tommysoftware.com	(Sales)

support@tommysoftware.com	(Technical Support)

http://www.tommysoftware.com	(World Wide Web)

Library Catalogue - Edition 1/97 - Copyright 1997 TommySoftware®


Library Installation from CD-ROM

The TommySoftware® CD-ROM contains all currently available libraries for TommySoftware® applications in the \LIBRARY\ENGLISH\ directory. Every single of these libraries is available in several different file formats to be usable by as many TommySoftware® applications as possible without conversion.

Each libraries with all avaiable file formats resides in a single file the extension .ZIP . This file is an archive created using the PKZIP 2.04g software. The archive is protected by a password. Only if you know the password you can extract the contained files.

In order to extract you will need a program that is capable of extracting PKZIP 2.04g archive with password (e.g. PKZIP for Windows, available at  http://www.pkware.com, or PKZIP 2.04g, available on the TommySoftware® CD-ROM in the \EXTRAS\ directory).

You will receive the required password once you have purchased the library from us.

If all preconditions are fulfilled, you can install the library. First, extract the respective archive into a temporary directory, stating the password . The result will be several files with the same name but different extensions. Now pick the file with the extension suitable best for your application and copy it into the library directory of your application.

The following extensions are currently avaiable:

TVL	CAD/DRAW 1 and 2

T2L	CAD/DRAW Professional and CAD/DRAW 3

T3L	CAD/DRAW 3

T4L	CAD/DRAW 4 Level 1 und CAD/DRAW 4 Level 2

After you have copied the desired library file, you can delete the previously extracted files in the temporary directory.


Electrical Engineering #1

Library Contents

1 3 5

1 3 5 ; 2 4 6

1 3 5 ; 2 4 6 make contact with active connection

2 4 6

single-celled accumulator

amperemeter

drive by pressure

drive by piston

drive by force

drive by float

rotary bi-directional motion

rotary uni-directional motion

straightline bi-directional motion

straightline uni-directional motion

blocking bi-directional motion

blocking uni-directional motion

three-pole bimetal

single-pole bimetal

bridge rectifier (simplified)

diode

LED diode

three-phase bridge rectifier

three-phase generator

three-phase motor

three-phase transformer delta/star

three-phase transformer Yd5

choke form 1

choke form 2

trace with mechanical operating mechanism

treadle operation

generator

direct current generator

direct current motor

removable manual drive (socket wrench box-spanner)

manual drive

manual drive (rotate)

manual drive (press)

manual drive (trip)

manual drive (pull)

horn

electrically operated pulse counter

inductance form 1

inductance form 2

inductance screened

inductance with magnetic core

inductance with magnetic core and air gap

inductance with magnetic core, variable

capacitor

disconnected plug-and-socket connector

connected plug-and-socket connector

signal lamp

signal lamp, blinking

ground

measuring instrument, recording

measuring instrument, indicating

measuring instrument with double-sided swing

carrier

motor

motor 3 ph

three-pole motor-protection circuit breaker

NPN-transistor

NTC

break contact

break contact, lagging

photoresistor

PNP-transistor

potentiometer

PTC

catch

relay coil

relay coil with operated lag

relay coil with two opposingly operated windings

relay coil with two similarly operated windings

relay coil operating wattmeter

retentive-type relay

switching transient with electromechanical release

make contact

triple make contact

leading make contact

stepping motor

contactor coil

fuse

fuse with identification of the line side

siren

circuit breaker

coil form 1

coil form 2

plug socket

contact pin

plug-and-socket connector with pin and socket

impulse relay

latch relay

signal generator

thyristor

two winding transformer

two winding transformer with shield

three winding transformer

transformer with centre tapping off a winding (06-10-04)

auto-transformer

disconnection

TRIAC

surge arrester

three-pole overvoltage tripping piece

single-pole overvoltage tripping piece

clock

secondary clock

master clock

detachable connection (e.g. screwed)

undetachable connection (soldered)

bi-directional delay

uni-directional delay

voltmeter

alternating current generator (1 phase)

alternating current motor (1 phase)

alternating current

alternating current meter 1ph form1

alternating current meter 1ph form2

alternating current meter 1ph 2tariff form1

alternating current meter 1ph 2tariff form2

alternating current meter 3ph form1

change over contact

change over contact without break

call bell

winding form 1

winding form 2

resistance

resistance, variable

resistance, variable nonlinear

bi-directional wiper

uni-directional wiper

electromechanical register

(131 symbols)


Electronics

Library Contents

single-celled accumulator

three-celled accumulator battery

aerial

bridge rectifier (explicitly)

bridge rectifier (simplified)

diac

diode

diode, backward

diode, breakdown

diode, capacitance

diode LED

diode, lightsensitive

diode tunnel

z diode

choke form 1

choke form 2

ferrite - bead

FET IE - 2 gates with N channel and substrate joint

N channel junction FET

P channel junction FET

depletion type FET N channel

depletion type FET P channel

rectifier

smoothed direct voltage

unsmoothed direct voltage

direct voltage transformer

hall generator with 4 connections

receiver

ideal power source

ideal current source

electric operated pulse counter

inductance form 1

inductance form 2

inductance with magnetic core

inductance with magnetic core, variable

capacitor

capacitor, adjustable

electrolytic capacitor - polar

electrolytic capacitor - nonpolar

capacitor, polar

capacitor, variable

loudspeaker

LDR

conductor joint, splice

signal lamp

signal lamp, blinking

ground

ground

measuring instrument, recording

measuring instrument, indicating

microphone

shunt resistance

negative impulse

negative step function

NPN transistor

NPN transistor

NPN transistor, collector connected with casing

NPN phototransistor

break contact

photonic cell

photoresistor

PNP phototransistor

PNP transistor

PNP transistor

PNP transistor, collector connected with casing

positive impulse

positive step function

potentiometer

diagnostic flag

sawtooth

make contact

fuse

coil form 1

coil form 2

thyristor

diode thyristor reverse blocking

diode thyristor reverse conducting

triode thyristor bidirectional

triode thyristor reverse blocking

triode thyristor reverse blocking P gate

two winding transformer

two winding transformer with shield

three winding transformer

transformer with centre tapping off a winding (06-10-04)

transformer with variable coupling

auto transformer

TRIAC

clock

secondary clock

master clock

converter

unijunction transistor, N-type

unijunction transistor, P-type

detachable connection (e.g. screwed)

undetachable connection (soldered)

amplifier form 1

amplifier form 2

alternating converter

alternating current

alternating current impulse

change over contact

call bell

winding form 1

winding form 2

resistance

resistance, variable

resistance, variable nonlinear

resistance, lightsensitive

(108 symbols)


Electrical Installation

Library Contents

single-celled accumulator

amperemeter

aerial socket

oven

choke

simple socket

simple socket double

electrical appliance

electrical appliance possible to switch

electric cooker

discharge lamp

voltage-operated earth-leakage trip

current-operated earth-leakage circuit breaker

telecommunication socket

deep-fat fryer

dishwasher

boiler

horn

simple horn

infrared grill

conduit

air conditioning equipment

kitchen machine

cooling device

lighting

lighting for discharge lamp

lighting with switch

lighting with additional pilot lamp

panic lighting

lighting possible to darken

flurescent lamp with preheating (explicitly)

flurescent lamp with preheating (simple)

electric ventilator

ground

motor

motor-protection circuit breaker

break contact

plaster

switch 1/1 single-pole circuit breaker

switch 1/1 with earthing-contact socket outlet

switch 1/2 two-pole circuit breaker

switch 1/3 three-pole circuit breaker

switch 4/1 single-pole gang switch

switch 5/1 single-pole set switch

switch 5/1 with earthing-contact socket outlet

switch 6/1 single-pole two-way switch

switch 6/1 with earthing-contact socket outlet

switch 7/1 single-pole cross switch

switch

three-pole switch

flashlight

earth-contact socket outlet

double earth-contact socket outlet

protective switch with thermal release

coil contactor

fuse

three-pole fuse

siren

simple siren

plug socket

socket

contact pin

plug-and-socket connector with pin and socket

star-delta switch

impulse relay

signal generator

simple signal generator

momentary-contact switch

momentary-contact switch with internal lighting

deep freezer

transformer

disconnection

door opener

surge arrester

overcurrent protection switch

three-pole overcurrent protection switch

clock

secondary clock

master clock

transposer

undervoltage protection switch

series reactor

electric hot plate

washing machine

washer dryer

alternating current

alternating current meter 1ph form1

alternating current meter 1ph form2

alternating current meter 1ph 2tariff form1

alternating current meter 1ph 2tariff form2

alternating current meter 3ph form1

change over contact

call bell

simple call bell

resistance

meter

(98 symbols)


Digital Information Processing

Library Contents

processing (logic diagram)

AND

AND

AND (contact plan)

AND (Schmitt-Trigger)

outlet (logic plan)

outlet (contact plan)

instruction list - form

instruction (logic plan)

d flipflop

exklusive NOR (equivalence)

exklusive NOR (non-equivalence)

impulse generator

JK flipflop edge-triggered

monoflop

NAND

NAND (contact plan)

NAND (Schmitt-Trigger)

NOR

NOT (Inverter)

OR

OR

OR (contact plan)

OR seperately (contact plan)

RS flipflop

RS storage

RS storage (R of prime importance)

reset (contact plan)

set (contact plan)

T flipflop

timer (timing stage)

truth tables

meter, 4 bit, binary

(33 symbols)


Process Engineering

Library Contents

seperator

dry seperator

settler

exhaust hood

activated carbon filter

anchor agitator

machine drive

axial flow compressor

jaw crusher

band-pass filter for fluids

conveyor belt

belt dryer

conveying weigher

bucket elevator

basin

tank

tank with exchangeable bottoms

tank with plane cover

tank with fixed bed

tank with fluid bed

tank with convex cover

tank with convex bottoms

tank with half-pipe coil

tank with conical bottoms

jacked tank

tank with floating roof

open tank with conical bottoms

tank with full-pipe coil

flat paddle mixer

plate column

ground weigher

crusher

burner

weighing bridge

container for solid, liquid, gaseous substances

steam boiler

decanter

rotary dryer

rotary slide valve vacuum pump

rotary slide compressor

rotary plate

rotating drum dryer

concentrator

electrolysis-cell

electromagnetic seperator

electric motor

electrostatic seperator

eccentric screw pump

flare for gases

barrel

fixed-bed filter

firing

filter plant

filter press

centrifugal seperator

fluidized bed dryer

liquid filter

liquid-piston rotary vacuum pump

liquid-piston rotary compressor

fluid filter

ground conveyor

machine for shaping

gas filter

automatic gas filter

gas cylinder

gas mill

gas-mechanical filter

thread

gate paddle agitator

hammer crusher

hammer mill

heating

hurdle dryer

rotary hurdle dryer

reciprocating membrane compressor

reciprocating pump

piston vacuum pump

reciprocating compressor

impeller agitator

industrial furnace

ion exchange filter

chimney

drying chamber

box carriage

cone crusher

candle filter

kettle carriage

chain conveyor

column

compressor

centrifugal pump

centrifugal mixer

cross-blade agitator

cooling tower

cooling

spherical tank

air filter

membrane pump

membrane vacuum pump

mixer

mill

wet seperator

vacuum filter

pelletizing disc

plate heat exchanger

flat car

impact seperator

impact breaker

impact mill

propeller agitator

pump

centrifugal ventilator

rake

shower cooler

turbo-dryer

gilled tube heat exchanger

gilled tube heat exchanger with ventilator

roller dryer

rotor type dust collector

rotary compressor

rotary compressor

agitator

sack

rotating disc filter

disc impeller mixer

ship

bag filter

beater mill

screw conveyor

screw extruder

chimney

drying cabinet

jack screw trunnion pump

screw compressor

reciprocal pusher centrifuge

bed filter

bed filter for gases

gravitation seperator

vibrating conveyor

vibrating mill

vibrating trough

vibrating tube

sifter

screening machine

screening machine with two screens

screen screw-centrifuge

grading apparatus

injection

stamping press

continious conveyor

ejection pump for fluids

injection mill

jet compressor

extrusion press

tank carriage

pocket filter for gases

tumbling dryer

disc seperator

disc dryer

disc centrifuge

fluid entrainment vacuum pump

dryer

drum

rotating barrel filter

turbine

turbine agitator

turbo vacuum pump

turbo compressor

unpacked storage

vacuum pump

ventilator

venturi-seperator

venturi-scrubber

compressor

displacement vacuum pump

displacement compressor

displacement pump

magnifying device

solid jacked screw centrifuge

scale

roots pump

heat exchanger with crossing of flow lines

heat exchanger without crossing of flow lines

roll crusher

roller mill

roller press

helical ribbon agitator

whirl bed dryer

gear-type pump

bucket wheel

centrifuge

centrifuge with sieve casing

centrifuge with solid jacket

crusher

spray dryer

feeder for solid substances

cyclone

(196 symbols)


Valves

Library Contents

stopping device

angle pattern stopping device

stopping device plugged in

stopping device flanged

stopping device screwed

stopping device welded

stop cock

angle pattern stop cock

conical stop cock

angle pattern conical stop cock

stopping ball cock

angle pattern stopping ball cock

slide valve

angle pattern block valve

block valve

ventilation system device

curved bursting disc

curved bursting disc

blank flange

blind disc

protective cap against fire

spray

continuous fire protection

explosion protection

explosion protection continuous fire proof

three-way device

three-way cock

three-way conical cock

three-way ball cock

three-way valve

thrush plate

pressure reducing valve

pressure reducing valve with injection

angle pattern pressure reducing valve with injection

flow limiter with pressure recovery

flame trap explosion proof

flame trap explosion + continuous fire proof

flange pair

flowing direction ->

flowing direction <-

flowing direction of important substances ->

flowing direction of important substances <-

ascent ->

ascent <-

boundary

clamped flange pair

compensator

compensator (corrugated tube)

condensation discharger

condensation discharger plugged in

condensation discharger flanged

condensation discharger welded

ball joint

clutch

Lyracompensator

angle pattern membrane device

mixing jet

mixing section

level indicating

reduction

winded pipe

back stroke device

angle pattern back stroke device

back stroke flap

back stroke valve

angle pattern back stoke valve

dirt trap

current rectifier

sound absorber

gauge glas

gauge glas with indicator

slide sleeve

tube

sprinkler jet

injector

adjusting drive (auxiliary power=flowing substance)

adjusting drive with electromagnet

adjusting drive with electric motor

adjusting drive with spring

adjusting drive with weight

adjusting drive with hydromot. 1flow direction

adjusting drive with hydromot. 2 flow directions

adjusting drive with piston

adjusting drive with membrane

adjusting drive with pneum. mot. 1flow direction

adjusting drive with pneum. mot. 2 flow directions

adjusting drive with float

funnel

joint welded, soldered, glued

joint screwed [

joint screwed ]

joint plugged [

joint plugged ]

joint to atmosphere

closure

bottom closure plugged in

bottom closure screwed

bottom closure soldered

stop closure screwed

screwed joint with nut [

screwed joint with nut ]

four-way device

four-way conical cock

four-way ball cock

four-way valve

water meter

(106 symbols)


Heating

Library Contents

seperator

dry seperator

settler

stopping device

stop cock

conical stop cock

stopping ball cock

shut-off valve

slide valve

exhaust hood

activated carbon filter

driving engine

axial ventilator

ventilation system device

basin

tank

jacket tank

tank with full-pipe coil

fire protection cap

burner

steam boiler

three-way cock

three-way conical cock

three-way ball cock

three-way valve

pressure reducing valve

electric motor

firing

flowing direction ->

flowing direction <-

liquid ring compressor

gas cylinder

ascent ->

ascent <--

heating

reciprocating pump

reciprocating compressor

industrial furnace

ion exchange filter

chimney

compensator

compensator (corrugated tube)

compressor

condensation discharger

centrifugal pump

cooling tower

cooling

air filter

Lyracompensator

membrane pump

mixing jet

plate heat exchanger

pump

radial ventilator

rake

reduction

shower cooler

gilled tube heat exchanger

gilled tube heat exchanger with ventilator

winded pipe

back stroke device

back stroke valve

sound absorber

tube

dirt trap

chimney

screw compressor

injector

adjusting drive with electromagnet

adjusting drive with electric motor

continuous conveyor

turbine

turbo vacuum pump

vacuum pump

ventilator

compressor

four-way device

four-way conical cock

four-way ball cock

four-way valve

heat exchanger with crossing of flow lines

heat exchanger without crossing of flow lines

gear-type pump

(83 symbols)


Chemistry Laboratory Equipment #1

Library Contents

Allihn cooler 300 mm jacket length NS 29/32

Liebig cooler 300 mm jacket length NS 29/32

Dimroth cooler 300 mm jacket length NS 29/32

intensive cooler 300 mm jacket length NS 29/32

coil cooler 300 mm jacket length NS 29/32

Claisen still-head with Liebig cooler H 14/23 K 29/32

still-head with Liebig cooler, suction port, 200 mm jacket

still-head with Liebig cooler 200 mm jacket length NS 29/32

still-head 350 mm NS 29/32

still-head with polished socket 14/23 350 mm NS 29/32

Anschütz-Thiele equipment 50 ml

Anschütz-Thiele equipment 50 ml

Bredt equipment 4 flasks 100 ml

adapter H 14/23 K 29/32

adapter H 29/32 K 14/23

adapter H 29/32 K 45/40

adapter H 45/40 K 29/32

(17 symbols)


Chemistry Laboratory Equipment #2

Library Contents

NS 14/23 thimble

NS 14 two-sided tap

NS 14 one-sided tap

NS 14 stopper

NS 14/23 cone

NS 29/32 thimble

NS 29/32 cone

NS 29/32 cone

NS 29/32 cone

distillation thermometer with polished adapter NS 14/23

kjeldahl connecting bulb

Claisen distillation head, lateral grinding 75° K 29/32 H 1

distillation head with inclined grinding 75° K 29/32

two-neck head with parallel sockets NS 29/32

two-neck head with lateral socket 75° NS 29/32

two-neck head with lateral cone 75° NS 29/32

three-neck head NS 29/32

bend 75° socket 29/32

bend 90° socket 29/32

receiver adapter, curved 105°

vacuum receiver adapter

vacuum receiver adapter, curved 105°

Hempel column, filling level 300 mm

Vigreux column, efficient length 300 mm NS 29/32

Widmer column, spiral length 160 mm NS 29/32

(25 symbols)


Chemistry Laboratory Equipment #3

Library Contents

NS 12/21 thimble

NS 12/21 cone

NS 14/23 thimble

NS 14/23 cone

NS 19/26 thimble

NS 19/26 cone

NS 29/32 thimble

NS 29/32 cone

NS 45/40 thimble

NS 45/40 cone

cork ring for 10 - 100 ml

cork ring for 250 - 500 ml

cork ring for 500 - 1000 ml

stopper NS 12/21

stopper NS 29/32

iodine flask 100 ml NS 29/32

iodine flask 250 ml NS 29/32

iodine flask 500 ml NS 29/32

Erlenmeyer flask narrow-mouth 100 ml

Erlenmeyer flask wide-mouth 100 ml

Erlenmeyer flask narrow-mouth 250 ml

Erlenmeyer flask wide-mouth 250 ml

Erlenmeyer flask narrow-mouth 500 ml

Erlenmeyer flask wide-mouth 500 ml

round-bottom flask 50 ml NS 14/23

round-bottom flask 50 ml NS 29/32

round-bottom flask 100 ml NS 14/23

round-bottom flask 100 ml NS 29/32

round-bottom flask 250 ml NS 29/32

round-bottom flask 250 ml NS 45/40

round-bottom flask 500 ml NS 29/32

round-bottom flask 500 ml NS 45/40

flat-bottom flask narrow-mouth 100 ml

flat-bottom flask wide-mouth 100 ml

flat-bottom flask narrow-mouth 250 ml

flat-bottom flask wide-mouth 250 ml

flat-bottom flask narrow-mouth 500 ml

flat-bottom flask wide-mouth 500 ml

flat-bottom flask narrow-mouth 1000 ml

flat-bottom flask wide-mouth 1000 ml

two-neck flask 50 ml 14/23 14/23

two-neck flask 50 ml 29/32 14/23

two-neck flask 100 ml 29/32 14/23

two-neck flask 500 ml 29/32 14/23

two-neck flask 250 ml 29/32 14/23

three-neck flask 100 ml 29/32 14/23 14/23

three-neck flask 250 ml 29/32 14/23 14/23

three-neck flask 500 ml 29/32 14/23 14/23

polished-joint cover, flange 138 mm, NW 100 mm

polished-joint cover, flange 138 mm

polished-joint reaction vessel 500 ml, flange 138 mm, NW 100 mm

polished-joint reaction vessel 1000 ml, flange 138 mm, NW 100 m

polished-joint reaction vessel 2000 ml, flange 138 mm, NW 100 m

polished-joint round-bottom flask 2000 ml, flange 138 mm, NW 10

seperatory funnel 250 ml, scaled

gas-washing bottle NS 29/32

washing bottle insert without diffuser NS 29/32

washing bottle insert with diffuser NS 29/32

(58 symbols)


Furniture #1

Library Contents

bath tub 1700 * 750

shower tray 900 * 900

electric cooker

dining table 80 * 80

dining table 80 * 80 with 3 chairs (2)

dining table 80 * 80 with 4 chairs (2)

dining table 130 * 80

dining table 130 * 80 with 4 chairs (2)

dining table 130 * 80 with 6 chairs (2)

dining table 180 * 80

dining table 180 * 80 with 4 chairs (2)

dining table 180 * 80 with 4 chairs (2)

dining table 180 * 80 with 6 chairs (2)

dining table 180 * 80 with 8 chairs (2)

dining table oval 130 * 80

dining table oval 130 * 80 with 4 chairs (3)

dining table oval 130 * 80 with 5 chairs (3)

dining table oval 130 * 80 with 6 chairs (3)

dining table oval 180 * 80

dining table oval 180 * 80 with 4 chairs (3)

dining table oval 180 * 80 with 6 chairs (3)

dining table oval 180 * 80 with 8 chairs (3)

dining table round d = 80

dining table round d = 80 with 2 chairs (3)

dining table round d = 80 with 3 chairs (3)

dining table round d = 80 with 4 chairs (3)

dining table round d =120

dining table round d =120 with 4 chairs (3)

dining table round d =120 with 5 chairs (3)

dining table round d =120 with 6 chairs (3)

dining table round d =120 with 9 chairs (3)

wash-basin 620 * 520

hot water tank

high cupboard 45 * 60

high cupboard 50 * 60

high cupboard 60 * 60

high cupboard 80 * 60

kitchen table 80 * 80

kitchen table 80 * 80 with 2 chairs (1)

kitchen table 80 * 80 with 3 chairs (1)

kitchen table 80 * 80 with 4 chairs (1)

kitchen table 130 * 80

kitchen table 130 * 80 with 3 chairs (1)

kitchen table 130 * 80 with 4 chairs (1)

kitchen table 130 * 80 with 5 chairs (1)

kitchen table 130 * 80 with 6 chairs (1)

kitchen table 180 * 80

upper cupboard 45 * 32,5

upper cupboard 50 * 32,5

upper cupboard 60 * 32,5

upper cupboard corner 60 * 60

left basin 80 * 60

right basin 80 * 60

left basin 100 * 60

right basin 100 * 60

left basin 2 120 * 60

right basin 2 120 * 60

chair 1

chair 2

chair 3

lower cupboard 45 * 60

lower cupboard 50 * 60

lower cupboard 60 * 60

lower cupboard 80 * 60

lower cupboard 100 * 60

lower cupboard 105 * 60

lower cupboard 120 * 60

lower cupboard corner 85 * 85

lower cupboard corner 105 * 105

wc

wc with cistern

(71 symbols)


Furniture #2

Library Contents

bed 90 * 200

bed 90 * 200 model 1

bed 90 * 200 model 2

bed 90 * 200 model 3

bed 100 * 200

bed 100 * 200 model 1

bed 100 * 200 model 2

bed 100 * 200 model 3

bed 180 * 200

bed 180 * 200 model 1

bed 180 * 200 model 2

bed 180 * 200 model 3

bed 200 * 200

bed 200 * 200 model 1

bed 200 * 200 model 2

bed 200 * 200 model 3

computer monitor 45 * 40

computer keyboard

couch 2-seater

couch 3-seater

coffee table (1) 80 * 80

coffee table (2) 80 * 80

coffee table (1) 120 * 80

coffee table (2) 120 * 80

coffee table 6-cornered 65 * 90

TV 45 * 40 (PORTI)

TV 60 * 47,5

TV 80 * 45

TV armchair

french bed 140 * 200

french bed 140 * 200 model 1

french bed 140 * 200 model 2

french bed 140 * 200 model 3

chest of drawers 110 * 55

speaker 30 * 30

speaker 45 * 35

bedside table 50 * 73,5

bedside table 50 * 50

cupboard 110 * 65

cupboard 150 * 65

cupboard 180 * 65

cupboard 200 * 65

cupboard 220 * 65

cupboard 300 * 65

unit of a cupboard 40 * 38 (cabinet)

unit of a cupboard 40 * 41

unit of a cupboard 40 * 60

unit of a cupboard 80 * 41

unit of a cupboard 80 * 45 (cabinet)

unit of a cupboard 80 * 60

unit of a cupboard 99 * 60

unit of a cupboard 129 * 60

unit of a cupboard high 40 * 38 (cabinet)

unit of a cupboard high 40 * 41

unit of a cupboard high 40 * 60

unit of a cupboard high 80 * 41

unit of a cupboard high 80 * 45 (cabinet)

unit of a cupboard high 80 * 60

unit of a cupboard high 99 * 60

unit of a cupboard high 129 * 60

unit of a cupboard high 1120 * 1120 (corner)

desk 140 * 80

desk 150 * 80

desk 160 * 80

desk 160 * 80 monitor, keyboard

desk 180 * 80

desk 180 * 80 monitor, keyboard

desk for pupils 100 * 50 with chair

desk for pupils 120 * 50 with chair

armchair

unit of a seating section, corner

unit of a seating section, middle

unit of a seating section, round, outside, big

unit of a seating section, round, outside, small

seating section 2-seater

seating section 3-seater

seating section 4-seater

seating section 5-seater, around corner, outside

seating section 7-seater, around corner, inside

seating section round, outside

stereo system 35 * 30

stereo system 45 * 30

(82 symbols)


Hydraulics & Pneumatics

Library Contents

1 flow path

1 flow path (diag), 1 blocked joint

1 flow path (par), 1 blocked joint

1 flow path, shunt, 2 blocked joints

2 flow paths (par)

2 flow paths (par, conn)

2 flow paths + 1 blocked joint

2 flow paths (X)

2 blocked joints

3 blocked joints

4 blocked joints

5 blocked joints

6 blocked joints

tank

manual operation

manual operation, push-button

lever operation

mechanical operation, spring

mechanical operation, roll

mechanical operation, roll, only operating in one direction

mechanical operation, feeler

pedal operation

electromagnet operation

electromagnet operation and (hy) pilot valve

electromagnet operation and (pn) pilot valve

operation (hy) pilot valve

operation (pn) pilot valve

direction of rotation bi-direktional

direction of rotation uni-direktional

backstrike throttle valve

throttle valve, non-adjustable

throttle valve, adjustable

pressure stop valve

pressure tank

compressed-air stream

pressure source

pressure regulating valve, relief opening

electric motor

ventilation with connection

ventilation without connection

filter

sequence valve

silencer

hyd.-tank

hyd.-stream

compressor, constant displacement volume

constant motor, 1 conveying direction (hy)

constant motor, 1 conveying direction (pn)

constant pump, 1 stream direction

air dryer

motor

lubricator

pump

spring-loaded backstrike valve

unloaded backstrike valve

quick-ventilation valve

oscillating motor (hy)

oscillating motor (pn)

sieve

stream regulating valve, relief opening, variable orig. stream

stream regulating valve, variable original stream

flow direction bi-directional

flow direction uni-directional 1

flow direction uni-directional 2

adjustability (31° short)

adjustability (31° long)

adjustability (45°)

adjusting pump, 2 conveying directions

water seperator

reversing valve

two-pressure valve

cylinder, double operating, one-sided piston rod

cylinder, double operating, final position damping adjustable

cylinder, single operating, reset by spring

(74 symbols)


Environment & Ecology

Library Contents

nuclear power station

big car

small car

farm

mountains

mine, out of operation

operating mine

drilling rig

drilling platform

derrick

chemical factory, out of operation

operating chemical factory

oil refinery

factory, out of operation

operating factory

barrel

fish

house

blast-furnace

high tension pylon

church

village

coal power station

cooling tower

deciduous tree

human being

conifer

conifer 10 - 19% destroyed

conifer 20 - 39% destroyed

conifer 40 - 59% destroyed

conifer 60 - 79% destroyed

conifer 80 - 100% destroyed

smoke

rdioactivity

sack

reed

silo

silo plant

stream

rotating stream

powerful stream

pond

tractor

truck

flying bird

whale

wind turbine

cloud

warm air

(49 symbols)


Landscape Design

Library Contents

bloom 1 black

bloom 2

bloom 3

bloom 4

meadow as filling pattern

bush 1 black

bush 1

bush 2 black

bush 2

bush 3 black

bush 3

garden grill, round black

garden chair black

garden table, oval black

garden table, round black

green spaces as filling pattern

hedge 1 black

hedge 1

hedge 2 black

hedge 2

hedge 3 black

hedge 3

cascade well

lamp black

deciduous tree

deciduous tree 1 black

deciduous tree 2

deciduous tree 3

deciduous tree 4a black

deciduous tree 4 black

deciduous tree 4

deciduous tree 4a black (connecting piece for rows)

deciduous tree 4 black (connecting piece for rows)

deciduous tree 4 (connecting piece for rows)

deciduous tree 4a black (row of trees)

deciduous tree 4 black (row of trees)

deciduous tree 4 (row of trees)

deciduous tree 5

deciduous tree 6 black

deciduous tree 7 black

deciduous tree 7

deciduous tree 8

millstone well

conifer

conifer 1

conifer 1 (connecting piece for rows)

conifer 2 black

conifer 2

conifer 3

coniferiuos spinney 1 black

coniferiuos spinney 1

coniferiuos spinney 2 black

coniferiuos spinney 2

coniferiuos spinney 3

coniferiuos spinney 4

natural stone as filling pattern

natural stone 2 as filling pattern

north arrow

paper bin

park bench

bower

tub for plants, round black

tub for plants, round

tub for plants, round

tub for plants, hexagonal round

tub for plants, hexagonal

tub for plants, hexagonal

sand as filling pattern

sand pit

hexagon stone as filling pattern

waterlilies

sunshade

sunshade

plaything with slide and climbing frame

covered plaything with slide and climbing frame

herbaceous plant 1

herbaceous plant 2

herbaceous plant 3

herbaceous plant 4

herbaceous plant 5

herbaceous plant 6 black

herbaceous plant 7

herbaceous plant 8

herbaceous plant 9

herbaceous plant 10

stones

rock plants

pond

pond with waterlilies

compound stone as filling pattern

(90 symbols)


Electrical Engineering #2

Library Contents

3 phase vertical 100mm long

3 phase horizontal 100mm long

Dahlander 1 direction of rotation, 2 speeds

Dahlander 2 directions of rotation, 2 speeds

Dahlander star-delta, 1 direction of rotation

master contactor + 13,14

master contactor + 21,22

auxiliary contactor 22

auxiliary contactor 31

auxiliary contactor 40

auxiliary switch module 02

auxiliary switch module 04

auxiliary switch module 11

auxiliary switch module 11, address delayed

auxiliary switch module 11, relapse delayed

auxiliary switch module 13

auxiliary switch module 20

auxiliary switch module 22

auxiliary switch module 40

motor 3 ph with Q and contactor

motor 3 ph star-delta starting

motor 3 ph star-delta starting rotating r-l

motor 3 ph rotating r-l with m-protection relay

motor 3 ph rotating r-l with Q

motor-protection relay with 97/98 , 95/96; main contacts

motor-protection relay with 95/98 96; main contacts

motor-protection circuit breaker; 13/14; main contacts

motor-protection circuit breaker; 21/22; main contacts

motor-protection circuit breaker; 13/14, 21/22; main contacts

Q as primary protection of a control transformer

Q as primary + secondary protection of a control transformer

contactor coil A1/A2

contactor coil E1/E2

spark quenching diode

spark quenching RC-section

spark quenching varistor

reversing contactor; motor-protection circuit breaker; 13/14, 2

(37 symbols)


Steel Sections

Library Contents

001: I PB 100

002: I PB 100

003: I PB 120

004: I PB 120

005: I PB 140

006: I PB 140

007: crane track A 45

008: crane track A 45

009: crane track A 55

010: crane track A 55

011: crane track A 65

012: crane track A 65

013: crane track A 75

014: crane track A 75

015: crane track A 100

016: crane track A 100

017: crane track A 120

018: crane track A 120

019: crane track F 100

020: crane track F 100

021: crane track F 120

022: crane track F 120

023: L 20 * 3

024: L 20 * 3

025: L 25 * 3

026: L 25 * 3

027: L 25 * 4

028: L 25 * 4

029: L 30 * 3

030: L 30 * 3

031: L 30 * 4

032: L 30 * 4

033: L 35 * 4

034: L 35 * 4

035: L 35 * 5

036: L 35 * 5

037: L 40 * 4

038: L 40 * 4

039: L 40 * 5

040: L 40 * 5

041: L 45 * 5

042: L 45 * 5

043: L 50 * 5

044: L 50 * 5

045: L 50 * 6

046: L 50 * 6

047: L 50 * 7

048: L 50 * 7

049: L 60 * 5

050: L 60 * 5

051: L 60 * 6

052: L 60 * 6

053: L 60 * 8

054: L 60 * 8

055: L 65 * 7

056: L 65 * 7

057: L 70 * 7

058: L 70 * 7

059: L 70 * 9

060: L 70 * 9

061: L 75 * 7

062: L 75 * 7

063: L 75 * 8

064: L 75 * 8

065: L 80 * 6

066: L 80 * 6

067: L 80 * 8

068: L 80 * 8

069: L 80 * 10

070: L 80 * 10

071: L 90 * 7

072: L 90 * 7

073: L 90 * 9

074: L 90 * 9

075: L 100 * 8

076: L 100 * 8

077: L 100 * 10

078: L 100 * 10

079: L 100 * 12

080: L 100 * 12

081: L 30 * 20 * 3

082: L 30 * 20 * 3

083: L 30 * 20 * 3

084: L 30 * 20 * 4

085: L 30 * 20 * 4

086: L 30 * 20 * 4

087: L 40 * 20 * 3

088: L 40 * 20 * 3

089: L 40 * 20 * 3

090: L 40 * 20 * 4

091: L 40 * 20 * 4

092: L 40 * 20 * 4

093: L 45 * 30 * 4

094: L 45 * 30 * 4

095: L 45 * 30 * 4

096: L 45 * 30 * 5

097: L 45 * 30 * 5

098: L 45 * 30 * 5

099: L 50 * 30 * 4

100: L 50 * 30 * 4

101: L 50 * 30 * 4

102: L 50 * 30 * 5

103: L 50 * 30 * 5

104: L 50 * 30 * 5

105: L 50 * 40 * 5

106: L 50 * 40 * 5

107: L 50 * 40 * 5

108: L 60 * 30 * 5

109: L 60 * 30 * 5

110: L 60 * 30 * 5

111: L 60 * 40 * 5

112: L 60 * 40 * 5

113: L 60 * 40 * 5

114: L 60 * 40 * 6

115: L 60 * 40 * 6

116: L 60 * 40 * 6

117: L 65 * 50 * 5

118: L 65 * 50 * 5

119: L 65 * 50 * 5

120: L 70 * 50 * 6

121: L 70 * 50 * 6

122: L 70 * 50 * 6

123: L 75 * 50 * 7

124: L 75 * 50 * 7

125: L 75 * 50 * 7

126: L 75 * 55 * 5

127: L 75 * 55 * 5

128: L 75 * 55 * 5

129: L 75 * 55 * 7

130: L 75 * 55 * 7

131: L 75 * 55 * 7

132: L 80 * 40 * 6

133: L 80 * 40 * 6

134: L 80 * 40 * 6

135: L 80 * 40 * 8

136: L 80 * 40 * 8

137: L 80 * 40 * 8

138: L 80 * 60 * 7

139: L 80 * 60 * 7

140: L 80 * 60 * 7

141: L 90 * 60 * 6

142: L 90 * 60 * 6

143: L 90 * 60 * 6

144: L 90 * 60 * 8

145: L 90 * 60 * 8

146: L 90 * 60 * 8

147: L 100 * 50 * 6

148: L 100 * 50 * 6

149: L 100 * 50 * 6

150: L 100 * 50 * 8

151: L 100 * 50 * 8

152: L 100 * 50 * 8

153: L 100 * 50 * 10

154: L 100 * 50 * 10

155: L 100 * 50 * 10

156: track S 7

157: track S 7

158: track S 7 strap FL 7

159: track S 7 strap FL 7

160: track S 10

161: track S 10

162: track S 10 strap FL 10

163: track S 10 strap FL 10

164: U 30 * 15

165: U 30 * 15

166: U 30

167: U 30

168: U 40 * 20

169: U 40 * 20

170: U 40

171: U 40

172: U 50 * 25

173: U 50 * 25

174: U 50

175: U 50

176: U 60

177: U 60

178: U 65

179: U 65

180: U 80

181: U 80

182: U 100

183: U 100

184: U 120

185: U 120

186: U 140

187: U 140

188: U 160

189: U 160

190: U 180

191: U 180

192: U 200

193: U 200

194: U 220

195: U 220

196: U 240

197: U 240

198: U 260

199: U 260

200: U 280

201: U 280

202: U 300

203: U 300

204: U 320

205: U 320

206: U 350

207: U 350

208: U 380

209: U 380

210: U 400

211: U 400

212: Z 30

213: Z 30

214: Z 40

215: Z 40

216: Z 50

217: Z 50

218: Z 60

219: Z 60

220: Z 80

221: Z 80

222: Z 100

223: Z 100

224: Z 120

225: Z 120

226: Z 140

227: Z 140

228: Z 160

229: Z 160

(229 symbols)


Screws DIN 912

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

Normal View\M 1.4\2 lg

Normal View\M 1.4\2.5lg

Normal View\M 1.4\3 lg

Normal View\M 1.4\4 lg

Normal View\M 1.4\5 lg

Normal View\M 1.4\6 lg

Normal View\M 1.4\8 lg

Normal View\M 1.4\10 lg

Normal View\M 1.4\12 lg

Normal View\M 1.6\2.5lg

Normal View\M 1.6\3 lg

Normal View\M 1.6\4 lg

Normal View\M 1.6\5 lg

Normal View\M 1.6\6 lg

Normal View\M 1.6\8 lg

Normal View\M 1.6\10 lg

Normal View\M 1.6\12 lg

Normal View\M 1.6\16 lg

Normal View\M 2\3 lg

Normal View\M 2\4 lg

Normal View\M 2\5 lg

Normal View\M 2\6 lg

Normal View\M 2\8 lg

Normal View\M 2\10 lg

Normal View\M 2\12 lg

Normal View\M 2\16 lg

Normal View\M 2\20 lg

Normal View\M 3\5 lg

Normal View\M 3\6 lg

Normal View\M 3\8 lg

Normal View\M 3\10 lg

Normal View\M 3\12 lg

Normal View\M 3\16 lg

Normal View\M 3\20 lg

Normal View\M 3\25 lg

Normal View\M 3\30 lg

Normal View\M 2.5\4 lg

Normal View\M 2.5\5 lg

Normal View\M 2.5\6 lg

Normal View\M 2.5\8 lg

Normal View\M 2.5\10 lg

Normal View\M 2.5\12 lg

Normal View\M 2.5\16 lg

Normal View\M 2.5\20 lg

Normal View\M 2.5\25 lg

Normal View\M 4\6 lg

Normal View\M 4\8 lg

Normal View\M 4\10 lg

Normal View\M 4\12 lg

Normal View\M 4\16 lg

Normal View\M 4\20 lg

Normal View\M 4\25 lg

Normal View\M 4\30 lg

Normal View\M 4\35 lg

Normal View\M 4\40 lg

Normal View\M 5\8 lg

Normal View\M 5\10 lg

Normal View\M 5\12 lg

Normal View\M 5\16 lg

Normal View\M 5\20 lg

Normal View\M 5\25 lg

Normal View\M 5\30 lg

Normal View\M 5\35 lg

Normal View\M 5\40 lg

Normal View\M 5\45 lg

Normal View\M 5\50 lg

Normal View\M 6\10 lg

Normal View\M 6\12 lg

Normal View\M 6\16 lg

Normal View\M 6\20 lg

Normal View\M 6\25 lg

Normal View\M 6\30 lg

Normal View\M 6\35 lg

Normal View\M 6\40 lg

Normal View\M 6\45 lg

Normal View\M 6\50 lg

Normal View\M 6\55 lg

Normal View\M 6\60 lg

Normal View\M 8\12 lg

Normal View\M 8\16 lg

Normal View\M 8\20 lg

Normal View\M 8\25 lg

Normal View\M 8\30 lg

Normal View\M 8\35 lg

Normal View\M 8\40 lg

Normal View\M 8\45 lg

Normal View\M 8\50 lg

Normal View\M 8\55 lg

Normal View\M 8\60 lg

Normal View\M 8\65 lg

Normal View\M 8\70 lg

Normal View\M 8\80 lg

Normal View\M 10\16 lg

Normal View\M 10\20 lg

Normal View\M 10\25 lg

Normal View\M 10\30 lg

Normal View\M 10\35 lg

Normal View\M 10\40 lg

Normal View\M 10\45 lg

Normal View\M 10\50 lg

Normal View\M 10\55 lg

Normal View\M 10\60 lg

Normal View\M 10\65 lg

Normal View\M 10\70 lg

Normal View\M 10\80 lg

Normal View\M 10\90 lg

Normal View\M 10\100 lg

Normal View\M 12\20 lg

Normal View\M 12\25 lg

Normal View\M 12\30 lg

Normal View\M 12\35 lg

Normal View\M 12\40 lg

Normal View\M 12\45 lg

Normal View\M 12\50 lg

Normal View\M 12\55 lg

Normal View\M 12\60 lg

Normal View\M 12\65 lg

Normal View\M 12\70 lg

Normal View\M 12\80 lg

Normal View\M 12\90 lg

Normal View\M 12\100 lg

Normal View\M 12\110 lg

Normal View\M 12\120 lg

Normal View\M 16\25 lg

Normal View\M 16\30 lg

Normal View\M 16\35 lg

Normal View\M 16\40 lg

Normal View\M 16\45 lg

Normal View\M 16\50 lg

Normal View\M 16\55 lg

Normal View\M 16\60 lg

Normal View\M 16\65 lg

Normal View\M 16\70 lg

Normal View\M 16\80 lg

Normal View\M 16\90 lg

Normal View\M 16\100 lg

Normal View\M 16\110 lg

Normal View\M 16\120 lg

Normal View\M 16\130 lg

Normal View\M 16\140 lg

Normal View\M 16\150 lg

Normal View\M 16\160 lg

Normal View\M 20\30 lg

Normal View\M 20\35 lg

Normal View\M 20\40 lg

Normal View\M 20\45 lg

Normal View\M 20\50 lg

Normal View\M 20\55 lg

Normal View\M 20\60 lg

Normal View\M 20\65 lg

Normal View\M 20\70 lg

Normal View\M 20\80 lg

Normal View\M 20\90 lg

Normal View\M 20\100 lg

Normal View\M 20\110 lg

Normal View\M 20\120 lg

Normal View\M 20\130 lg

Normal View\M 20\140 lg

Normal View\M 20\150 lg

Normal View\M 20\160 lg

Normal View\M 20\180 lg

Normal View\M 20\200 lg

Normal View\M 24\40 lg

Normal View\M 24\45 lg

Normal View\M 24\50 lg

Normal View\M 24\55 lg

Normal View\M 24\60 lg

Normal View\M 24\65 lg

Normal View\M 24\70 lg

Normal View\M 24\80 lg

Normal View\M 24\90 lg

Normal View\M 24\100 lg

Normal View\M 24\110 lg

Normal View\M 24\120 lg

Normal View\M 24\130 lg

Normal View\M 24\140 lg

Normal View\M 24\150 lg

Normal View\M 24\160 lg

Normal View\M 24\180 lg

Normal View\M 24\200 lg

Normal View\M 30\45 lg

Normal View\M 30\50 lg

Normal View\M 30\55 lg

Normal View\M 30\60 lg

Normal View\M 30\65 lg

Normal View\M 30\70 lg

Normal View\M 30\80 lg

Normal View\M 30\90 lg

Normal View\M 30\100 lg

Normal View\M 30\110 lg

Normal View\M 30\120 lg

Normal View\M 30\130 lg

Normal View\M 30\140 lg

Normal View\M 30\150 lg

Normal View\M 30\160 lg

Normal View\M 30\180 lg

Normal View\M 30\200 lg

Normal View\M 36\55 lg

Normal View\M 36\60 lg

Normal View\M 36\65 lg

Normal View\M 36\70 lg

Normal View\M 36\80 lg

Normal View\M 36\90 lg

Normal View\M 36\100 lg

Normal View\M 36\110 lg

Normal View\M 36\120 lg

Normal View\M 36\130 lg

Normal View\M 36\140 lg

Normal View\M 36\150 lg

Normal View\M 36\160 lg

Normal View\M 36\180 lg

Normal View\M 36\200 lg

Normal View\M 36\220 lg

Normal View\M 36\240 lg

Normal View\M 36\260 lg

Normal View\M 36\280 lg

Normal View\M 36\300 lg

Normal View\M 42\60 lg

Normal View\M 42\65 lg

Normal View\M 42\70 lg

Normal View\M 42\80 lg

Normal View\M 42\90 lg

Normal View\M 42\100 lg

Normal View\M 42\110 lg

Normal View\M 42\120 lg

Normal View\M 42\130 lg

Normal View\M 42\140 lg

Normal View\M 42\150 lg

Normal View\M 42\160 lg

Normal View\M 42\180 lg

Normal View\M 42\200 lg

Normal View\M 42\220 lg

Normal View\M 42\240 lg

Normal View\M 42\260 lg

Normal View\M 42\280 lg

Normal View\M 42\300 lg

Normal View\M 48\70 lg

Normal View\M 48\80 lg

Normal View\M 48\90 lg

Normal View\M 48\100 lg

Normal View\M 48\110 lg

Normal View\M 48\120 lg

Normal View\M 48\130 lg

Normal View\M 48\140 lg

Normal View\M 48\150 lg

Normal View\M 48\160 lg

Normal View\M 48\180 lg

Normal View\M 48\200 lg

Normal View\M 48\220 lg

Normal View\M 48\240 lg

Normal View\M 48\260 lg

Normal View\M 48\280 lg

Normal View\M 48\300 lg

Normal View\M 56\80 lg

Normal View\M 56\90 lg

Normal View\M 56\100 lg

Normal View\M 56\110 lg

Normal View\M 56\120 lg

Normal View\M 56\130 lg

Normal View\M 56\140 lg

Normal View\M 56\150 lg

Normal View\M 56\160 lg

Normal View\M 56\180 lg

Normal View\M 56\200 lg

Normal View\M 56\220 lg

Normal View\M 56\240 lg

Normal View\M 56\260 lg

Normal View\M 56\280 lg

Normal View\M 56\300 lg

Normal View\M 64\90 lg

Normal View\M 64\100 lg

Normal View\M 64\110 lg

Normal View\M 64\120 lg

Normal View\M 64\130 lg

Normal View\M 64\140 lg

Normal View\M 64\150 lg

Normal View\M 64\160 lg

Normal View\M 64\180 lg

Normal View\M 64\200 lg

Normal View\M 64\220 lg

Normal View\M 64\240 lg

Normal View\M 64\260 lg

Normal View\M 64\280 lg

Normal View\M 64\300 lg

Normal View\M 72\100 lg

Normal View\M 72\110 lg

Normal View\M 72\120 lg

Normal View\M 72\130 lg

Normal View\M 72\140 lg

Normal View\M 72\150 lg

Normal View\M 72\160 lg

Normal View\M 72\180 lg

Normal View\M 72\200 lg

Normal View\M 72\220 lg

Normal View\M 72\240 lg

Normal View\M 72\260 lg

Normal View\M 72\280 lg

Normal View\M 72\300 lg

Normal View\M 80\120 lg

Normal View\M 80\130 lg

Normal View\M 80\140 lg

Normal View\M 80\150 lg

Normal View\M 80\160 lg

Normal View\M 80\180 lg

Normal View\M 80\200 lg

Normal View\M 80\220 lg

Normal View\M 80\240 lg

Normal View\M 80\260 lg

Normal View\M 80\280 lg

Normal View\M 80\300 lg

Normal View\M 90\140 lg

Normal View\M 90\150 lg

Normal View\M 90\160 lg

Normal View\M 90\180 lg

Normal View\M 90\200 lg

Normal View\M 90\220 lg

Normal View\M 90\240 lg

Normal View\M 90\260 lg

Normal View\M 90\280 lg

Normal View\M 90\300 lg

Normal View\M 100\150 lg

Normal View\M 100\160 lg

Normal View\M 100\180 lg

Normal View\M 100\200 lg

Normal View\M 100\220 lg

Normal View\M 100\240 lg

Normal View\M 100\260 lg

Normal View\M 100\280 lg

Normal View\M 100\300 lg

Side View\M 1.4

Side View\M 1.6

Side View\M 2

Side View\M 2.5

Side View\M 3

Side View\M 4

Side View\M 5

Side View\M 6

Side View\M 8

Side View\M 10

Side View\M 12

Side View\M 16

Side View\M 20

Side View\M 24

Side View\M 30

Side View\M 36

Side View\M 42

Side View\M 48

Side View\M 56

Side View\M 64

Side View\M 72

Side View\M 80

Side View\M 90

Side View\M 100

(353 symbols)


Screws DIN 931

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

Normal View\M 1.6\12 lg

Normal View\M 1.6\16 lg

Normal View\M 2\16 lg

Normal View\M 2\20 lg

Normal View\M 2.5\16 lg

Normal View\M 2.5\20 lg

Normal View\M 2.5\25 lg

Normal View\M 3\20 lg

Normal View\M 3\25 lg

Normal View\M 3\30 lg

Normal View\M 4\25 lg

Normal View\M 4\30 lg

Normal View\M 4\35 lg

Normal View\M 4\40 lg

Normal View\M 5\25 lg

Normal View\M 5\30 lg

Normal View\M 5\35 lg

Normal View\M 5\40 lg

Normal View\M 5\45 lg

Normal View\M 5\50 lg

Normal View\M 6\30 lg

Normal View\M 6\35 lg

Normal View\M 6\40 lg

Normal View\M 6\45 lg

Normal View\M 6\50 lg

Normal View\M 6\55 lg

Normal View\M 6\60 lg

Normal View\M 8\35 lg

Normal View\M 8\40 lg

Normal View\M 8\45 lg

Normal View\M 8\50 lg

Normal View\M 8\55 lg

Normal View\M 8\60 lg

Normal View\M 8\65 lg

Normal View\M 8\70 lg

Normal View\M 8\80 lg

Normal View\M 10\40 lg

Normal View\M 10\45 lg

Normal View\M 10\50 lg

Normal View\M 10\55 lg

Normal View\M 10\60 lg

Normal View\M 10\65 lg

Normal View\M 10\70 lg

Normal View\M 10\80 lg

Normal View\M 10\90 lg

Normal View\M 10\100 lg

Normal View\M 12\45 lg

Normal View\M 12\50 lg

Normal View\M 12\55 lg

Normal View\M 12\60 lg

Normal View\M 12\65 lg

Normal View\M 12\70 lg

Normal View\M 12\80 lg

Normal View\M 12\90 lg

Normal View\M 12\100 lg

Normal View\M 12\110 lg

Normal View\M 12\120 lg

Normal View\M 16\55 lg

Normal View\M 16\60 lg

Normal View\M 16\65 lg

Normal View\M 16\70 lg

Normal View\M 16\80 lg

Normal View\M 16\90 lg

Normal View\M 16\100 lg

Normal View\M 16\110 lg

Normal View\M 16\120 lg

Normal View\M 16\130 lg

Normal View\M 16\140 lg

Normal View\M 16\150 lg

Normal View\M 16\160 lg

Normal View\M 20\65 lg

Normal View\M 20\70 lg

Normal View\M 20\80 lg

Normal View\M 20\90 lg

Normal View\M 20\100 lg

Normal View\M 20\110 lg

Normal View\M 20\120 lg

Normal View\M 20\130 lg

Normal View\M 20\140 lg

Normal View\M 20\150 lg

Normal View\M 20\160 lg

Normal View\M 20\180 lg

Normal View\M 20\200 lg

Normal View\M 24\70 lg

Normal View\M 24\80 lg

Normal View\M 24\90 lg

Normal View\M 24\100 lg

Normal View\M 24\110 lg

Normal View\M 24\120 lg

Normal View\M 24\130 lg

Normal View\M 24\140 lg

Normal View\M 24\150 lg

Normal View\M 24\160 lg

Normal View\M 24\180 lg

Normal View\M 24\200 lg

Normal View\M 24\220 lg

Normal View\M 24\240 lg

Normal View\M 30\90 lg

Normal View\M 30\100 lg

Normal View\M 30\110 lg

Normal View\M 30\120 lg

Normal View\M 30\130 lg

Normal View\M 30\140 lg

Normal View\M 30\150 lg

Normal View\M 30\160 lg

Normal View\M 30\180 lg

Normal View\M 30\200 lg

Normal View\M 30\220 lg

Normal View\M 30\240 lg

Normal View\M 30\260 lg

Normal View\M 30\280 lg

Normal View\M 30\300 lg

Normal View\M 36\110 lg

Normal View\M 36\120 lg

Normal View\M 36\130 lg

Normal View\M 36\140 lg

Normal View\M 36\150 lg

Normal View\M 36\160 lg

Normal View\M 36\180 lg

Normal View\M 36\200 lg

Normal View\M 36\220 lg

Normal View\M 36\240 lg

Normal View\M 36\260 lg

Normal View\M 36\280 lg

Normal View\M 36\300 lg

Normal View\M 42\130 lg

Normal View\M 42\140 lg

Normal View\M 42\150 lg

Normal View\M 42\160 lg

Normal View\M 42\180 lg

Normal View\M 42\200 lg

Normal View\M 42\220 lg

Normal View\M 42\240 lg

Normal View\M 42\260 lg

Normal View\M 42\280 lg

Normal View\M 42\300 lg

Normal View\M 48\140 lg

Normal View\M 48\150 lg

Normal View\M 48\160 lg

Normal View\M 48\180 lg

Normal View\M 48\200 lg

Normal View\M 48\220 lg

Normal View\M 48\240 lg

Normal View\M 48\260 lg

Normal View\M 48\280 lg

Normal View\M 48\300 lg

Normal View\M 48\320 lg

Normal View\M 48\340 lg

Normal View\M 56\160 lg

Normal View\M 56\180 lg

Normal View\M 56\200 lg

Normal View\M 56\220 lg

Normal View\M 56\240 lg

Normal View\M 56\260 lg

Normal View\M 56\280 lg

Normal View\M 56\300 lg

Normal View\M 56\320 lg

Normal View\M 56\340 lg

Normal View\M 56\360 lg

Normal View\M 64\180 lg

Normal View\M 64\200 lg

Normal View\M 64\220 lg

Normal View\M 64\240 lg

Normal View\M 64\260 lg

Normal View\M 64\280 lg

Normal View\M 64\300 lg

Normal View\M 64\320 lg

Normal View\M 64\340 lg

Normal View\M 64\360 lg

Normal View\M 72\200 lg

Normal View\M 72\220 lg

Normal View\M 72\240 lg

Normal View\M 72\260 lg

Normal View\M 72\280 lg

Normal View\M 72\300 lg

Normal View\M 72\320 lg

Normal View\M 72\340 lg

Normal View\M 72\360 lg

Normal View\M 72\380 lg

Normal View\M 72\400 lg

Normal View\M 80\220 lg

Normal View\M 90\240 lg

Normal View\M 100\260 lg

Normal View\M 110\280 lg

Normal View\M 125\320 lg

Normal View\M 140\340 lg

Normal View\M 160\380 lg

Plan View\M 1.6

Plan View\M 2

Plan View\M 2.5

Plan View\M 3

Plan View\M 4

Plan View\M 5

Plan View\M 6

Plan View\M 8

Plan View\M 10

Plan View\M 12

Plan View\M 16

Plan View\M 20

Plan View\M 24

Plan View\M 30

Plan View\M 36

Plan View\M 42

Plan View\M 48

Plan View\M 56

Plan View\M 64

Plan View\M 72

Plan View\M 80

Plan View\M 90

Plan View\M 100

Plan View\M 110

Plan View\M 125

Plan View\M 140

Plan View\M 160

Side View\M 1.6

Side View\M 2

Side View\M 2.5

Side View\M 3

Side View\M 4

Side View\M 5

Side View\M 6

Side View\M 8

Side View\M 10

Side View\M 12

Side View\M 16

Side View\M 20

Side View\M 24

Side View\M 30

Side View\M 36

Side View\M 42

Side View\M 48

Side View\M 56

Side View\M 64

Side View\M 72

Side View\M 80

Side View\M 90

Side View\M 100

Side View\M 110

Side View\M 125

Side View\M 140

Side View\M 160

(241 symbols)


Screws DIN 933

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

Normal View\M 1.6\2 lg

Normal View\M 1.6\3 lg

Normal View\M 1.6\4 lg

Normal View\M 1.6\5 lg

Normal View\M 1.6\6 lg

Normal View\M 1.6\8 lg

Normal View\M 1.6\10 lg

Normal View\M 1.6\12 lg

Normal View\M 2\3 lg

Normal View\M 2\4 lg

Normal View\M 2\5 lg

Normal View\M 2\6 lg

Normal View\M 2\8 lg

Normal View\M 2\10 lg

Normal View\M 2\12 lg

Normal View\M 2\16 lg

Normal View\M 2.5\3 lg

Normal View\M 2.5\4 lg

Normal View\M 2.5\5 lg

Normal View\M 2.5\6 lg

Normal View\M 2.5\8 lg

Normal View\M 2.5\10 lg

Normal View\M 2.5\12 lg

Normal View\M 2.5\16 lg

Normal View\M 2.5\20 lg

Normal View\M 2.5\25 lg

Normal View\M 3\4 lg

Normal View\M 3\5 lg

Normal View\M 3\6 lg

Normal View\M 3\8 lg

Normal View\M 3\10 lg

Normal View\M 3\12 lg

Normal View\M 3\16 lg

Normal View\M 3\20 lg

Normal View\M 3\25 lg

Normal View\M 3\30 lg

Normal View\M 4\5 lg

Normal View\M 4\6 lg

Normal View\M 4\8 lg

Normal View\M 4\10 lg

Normal View\M 4\12 lg

Normal View\M 4\16 lg

Normal View\M 4\20 lg

Normal View\M 4\25 lg

Normal View\M 4\30 lg

Normal View\M 4\35 lg

Normal View\M 4\40 lg

Normal View\M 4\45 lg

Normal View\M 4\50 lg

Normal View\M 4\55 lg

Normal View\M 4\60 lg

Normal View\M 4\65 lg

Normal View\M 4\70 lg

Normal View\M 5\6 lg

Normal View\M 5\8 lg

Normal View\M 5\10 lg

Normal View\M 5\12 lg

Normal View\M 5\16 lg

Normal View\M 5\20 lg

Normal View\M 5\25 lg

Normal View\M 5\30 lg

Normal View\M 5\35 lg

Normal View\M 5\40 lg

Normal View\M 5\45 lg

Normal View\M 5\50 lg

Normal View\M 5\55 lg

Normal View\M 5\60 lg

Normal View\M 5\65 lg

Normal View\M 5\70 lg

Normal View\M 5\80 lg

Normal View\M 6\6 lg

Normal View\M 6\8 lg

Normal View\M 6\10 lg

Normal View\M 6\12 lg

Normal View\M 6\16 lg

Normal View\M 6\20 lg

Normal View\M 6\25 lg

Normal View\M 6\30 lg

Normal View\M 6\35 lg

Normal View\M 6\40 lg

Normal View\M 6\45 lg

Normal View\M 6\50 lg

Normal View\M 6\55 lg

Normal View\M 6\60 lg

Normal View\M 6\65 lg

Normal View\M 6\70 lg

Normal View\M 6\80 lg

Normal View\M 8\8 lg

Normal View\M 8\10 lg

Normal View\M 8\12 lg

Normal View\M 8\16 lg

Normal View\M 8\20 lg

Normal View\M 8\25 lg

Normal View\M 8\30 lg

Normal View\M 8\35 lg

Normal View\M 8\40 lg

Normal View\M 8\45 lg

Normal View\M 8\50 lg

Normal View\M 8\55 lg

Normal View\M 8\60 lg

Normal View\M 8\65 lg

Normal View\M 8\70 lg

Normal View\M 8\80 lg

Normal View\M 8\90 lg

Normal View\M 8\100 lg

Normal View\M 10\8 lg

Normal View\M 10\10 lg

Normal View\M 10\12 lg

Normal View\M 10\16 lg

Normal View\M 10\20 lg

Normal View\M 10\25 lg

Normal View\M 10\30 lg

Normal View\M 10\35 lg

Normal View\M 10\40 lg

Normal View\M 10\45 lg

Normal View\M 10\50 lg

Normal View\M 10\55 lg

Normal View\M 10\60 lg

Normal View\M 10\65 lg

Normal View\M 10\70 lg

Normal View\M 10\80 lg

Normal View\M 10\90 lg

Normal View\M 10\100 lg

Normal View\M 10\110 lg

Normal View\M 10\120 lg

Normal View\M 10\130 lg

Normal View\M 10\140 lg

Normal View\M 10\150 lg

Normal View\M 12\10 lg

Normal View\M 12\12 lg

Normal View\M 12\16 lg

Normal View\M 12\20 lg

Normal View\M 12\25 lg

Normal View\M 12\30 lg

Normal View\M 12\35 lg

Normal View\M 12\40 lg

Normal View\M 12\45 lg

Normal View\M 12\50 lg

Normal View\M 12\55 lg

Normal View\M 12\60 lg

Normal View\M 12\65 lg

Normal View\M 12\70 lg

Normal View\M 12\80 lg

Normal View\M 12\90 lg

Normal View\M 12\100 lg

Normal View\M 12\110 lg

Normal View\M 12\120 lg

Normal View\M 12\130 lg

Normal View\M 12\140 lg

Normal View\M 12\150 lg

Normal View\M 16\12 lg

Normal View\M 16\16 lg

Normal View\M 16\20 lg

Normal View\M 16\25 lg

Normal View\M 16\30 lg

Normal View\M 16\35 lg

Normal View\M 16\40 lg

Normal View\M 16\45 lg

Normal View\M 16\50 lg

Normal View\M 16\55 lg

Normal View\M 16\60 lg

Normal View\M 16\65 lg

Normal View\M 16\70 lg

Normal View\M 16\80 lg

Normal View\M 16\90 lg

Normal View\M 16\100 lg

Normal View\M 16\110 lg

Normal View\M 16\120 lg

Normal View\M 16\130 lg

Normal View\M 16\140 lg

Normal View\M 16\150 lg

Normal View\M 20\16 lg

Normal View\M 20\20 lg

Normal View\M 20\25 lg

Normal View\M 20\30 lg

Normal View\M 20\35 lg

Normal View\M 20\40 lg

Normal View\M 20\45 lg

Normal View\M 20\50 lg

Normal View\M 20\55 lg

Normal View\M 20\60 lg

Normal View\M 20\65 lg

Normal View\M 20\70 lg

Normal View\M 20\80 lg

Normal View\M 20\90 lg

Normal View\M 20\100 lg

Normal View\M 20\110 lg

Normal View\M 20\120 lg

Normal View\M 20\130 lg

Normal View\M 20\140 lg

Normal View\M 20\150 lg

Normal View\M 20\160 lg

Normal View\M 20\200 lg

Normal View\M 20\180 lg

Normal View\M 24\16 lg

Normal View\M 24\20 lg

Normal View\M 24\25 lg

Normal View\M 24\30 lg

Normal View\M 24\35 lg

Normal View\M 24\40 lg

Normal View\M 24\45 lg

Normal View\M 24\50 lg

Normal View\M 24\55 lg

Normal View\M 24\60 lg

Normal View\M 24\65 lg

Normal View\M 24\70 lg

Normal View\M 24\80 lg

Normal View\M 24\90 lg

Normal View\M 24\100 lg

Normal View\M 24\110 lg

Normal View\M 24\120 lg

Normal View\M 24\130 lg

Normal View\M 24\140 lg

Normal View\M 24\150 lg

Normal View\M 24\160 lg

Normal View\M 24\180 lg

Normal View\M 24\200 lg

Normal View\M 30\35 lg

Normal View\M 30\40 lg

Normal View\M 30\45 lg

Normal View\M 30\50 lg

Normal View\M 30\55 lg

Normal View\M 30\60 lg

Normal View\M 30\65 lg

Normal View\M 30\70 lg

Normal View\M 30\80 lg

Normal View\M 30\90 lg

Normal View\M 30\100 lg

Normal View\M 30\110 lg

Normal View\M 30\120 lg

Normal View\M 30\130 lg

Normal View\M 30\140 lg

Normal View\M 30\150 lg

Normal View\M 30\160 lg

Normal View\M 30\180 lg

Normal View\M 30\200 lg

Normal View\M 36\35 lg

Normal View\M 36\40 lg

Normal View\M 36\45 lg

Normal View\M 36\50 lg

Normal View\M 36\55 lg

Normal View\M 36\60 lg

Normal View\M 36\65 lg

Normal View\M 36\70 lg

Normal View\M 36\80 lg

Normal View\M 36\90 lg

Normal View\M 36\100 lg

Normal View\M 36\110 lg

Normal View\M 36\120 lg

Normal View\M 36\130 lg

Normal View\M 36\140 lg

Normal View\M 36\150 lg

Normal View\M 36\160 lg

Normal View\M 36\180 lg

Normal View\M 36\200 lg

Normal View\M 42\40 lg

Normal View\M 42\45 lg

Normal View\M 42\50 lg

Normal View\M 42\55 lg

Normal View\M 42\60 lg

Normal View\M 42\65 lg

Normal View\M 42\70 lg

Normal View\M 42\80 lg

Normal View\M 42\90 lg

Normal View\M 42\100 lg

Normal View\M 42\110 lg

Normal View\M 42\120 lg

Normal View\M 42\130 lg

Normal View\M 42\140 lg

Normal View\M 42\150 lg

Normal View\M 42\160 lg

Normal View\M 42\180 lg

Normal View\M 42\200 lg

Normal View\M 48\40 lg

Normal View\M 48\45 lg

Normal View\M 48\50 lg

Normal View\M 48\55 lg

Normal View\M 48\60 lg

Normal View\M 48\65 lg

Normal View\M 48\70 lg

Normal View\M 48\80 lg

Normal View\M 48\90 lg

Normal View\M 48\100 lg

Normal View\M 48\110 lg

Normal View\M 48\120 lg

Normal View\M 48\130 lg

Normal View\M 48\140 lg

Normal View\M 48\150 lg

Normal View\M 48\160 lg

Normal View\M 48\180 lg

Normal View\M 48\200 lg

Plan View\M 1.6

Plan View\M 2

Plan View\M 2.5

Plan View\M 3

Plan View\M 4

Plan View\M 5

Plan View\M 6

Plan View\M 8

Plan View\M 10

Plan View\M 12

Plan View\M 16

Plan View\M 20

Plan View\M 24

Plan View\M 30

Plan View\M 36

Plan View\M 42

Plan View\M 48

Side View\M 1.6

Side View\M 2

Side View\M 2.5

Side View\M 3

Side View\M 4

Side View\M 5

Side View\M 6

Side View\M 8

Side View\M 10

Side View\M 12

Side View\M 16

Side View\M 20

Side View\M 24

Side View\M 30

Side View\M 36

Side View\M 42

Side View\M 48

(325 symbols)


Screws DIN 7968

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

Normal View\M 12\30 lg

Normal View\M 12\35 lg

Normal View\M 12\40 lg

Normal View\M 12\45 lg

Normal View\M 12\50 lg

Normal View\M 12\55 lg

Normal View\M 12\60 lg

Normal View\M 12\65 lg

Normal View\M 12\70 lg

Normal View\M 12\120 lg

Normal View\M 12\115 lg

Normal View\M 12\110 lg

Normal View\M 12\105 lg

Normal View\M 12\100 lg

Normal View\M 12\95 lg

Normal View\M 12\90 lg

Normal View\M 12\85 lg

Normal View\M 12\80 lg

Normal View\M 12\75 lg

Normal View\M 16\35 lg

Normal View\M 16\40 lg

Normal View\M 16\45 lg

Normal View\M 16\50 lg

Normal View\M 16\55 lg

Normal View\M 16\60 lg

Normal View\M 16\65 lg

Normal View\M 16\70 lg

Normal View\M 16\75 lg

Normal View\M 16\80 lg

Normal View\M 16\85 lg

Normal View\M 16\90 lg

Normal View\M 16\95 lg

Normal View\M 16\100 lg

Normal View\M 16\105 lg

Normal View\M 16\110 lg

Normal View\M 16\115 lg

Normal View\M 16\120 lg

Normal View\M 16\125 lg

Normal View\M 16\130 lg

Normal View\M 16\135 lg

Normal View\M 16\140 lg

Normal View\M 16\145 lg

Normal View\M 16\150 lg

Normal View\M 16\155 lg

Normal View\M 16\160 lg

Normal View\M 20\40 lg

Normal View\M 20\45 lg

Normal View\M 20\50 lg

Normal View\M 20\55 lg

Normal View\M 20\60 lg

Normal View\M 20\65 lg

Normal View\M 20\70 lg

Normal View\M 20\75 lg

Normal View\M 20\80 lg

Normal View\M 20\85 lg

Normal View\M 20\90 lg

Normal View\M 20\95 lg

Normal View\M 20\100 lg

Normal View\M 20\105 lg

Normal View\M 20\110 lg

Normal View\M 20\115 lg

Normal View\M 20\120 lg

Normal View\M 20\125 lg

Normal View\M 20\130 lg

Normal View\M 20\135 lg

Normal View\M 20\140 lg

Normal View\M 20\145 lg

Normal View\M 20\150 lg

Normal View\M 20\155 lg

Normal View\M 20\160 lg

Normal View\M 20\165 lg

Normal View\M 20\170 lg

Normal View\M 20\175 lg

Normal View\M 20\180 lg

Normal View\M 22\45 lg

Normal View\M 22\50 lg

Normal View\M 22\55 lg

Normal View\M 22\60 lg

Normal View\M 22\65 lg

Normal View\M 22\70 lg

Normal View\M 22\75 lg

Normal View\M 22\80 lg

Normal View\M 22\85 lg

Normal View\M 24\50 lg

Normal View\M 24\55 lg

Normal View\M 24\60 lg

Normal View\M 24\65 lg

Normal View\M 24\70 lg

Normal View\M 24\75 lg

Normal View\M 24\80 lg

Normal View\M 24\85 lg

Normal View\M 24\90 lg

Normal View\M 24\95 lg

Normal View\M 24\100 lg

Normal View\M 24\105 lg

Normal View\M 24\110 lg

Normal View\M 24\115 lg

Normal View\M 24\120 lg

Normal View\M 24\125 lg

Normal View\M 24\130 lg

Normal View\M 24\135 lg

Normal View\M 24\140 lg

Normal View\M 24\145 lg

Normal View\M 24\150 lg

Normal View\M 24\155 lg

Normal View\M 24\160 lg

Normal View\M 24\165 lg

Normal View\M 24\170 lg

Normal View\M 24\175 lg

Normal View\M 24\180 lg

Normal View\M 24\185 lg

Normal View\M 24\190 lg

Normal View\M 24\195 lg

Normal View\M 24\200 lg

Normal View\M 27\60 lg

Normal View\M 27\65 lg

Normal View\M 27\70 lg

Normal View\M 27\75 lg

Normal View\M 27\80 lg

Normal View\M 27\85 lg

Normal View\M 27\90 lg

Normal View\M 27\95 lg

Normal View\M 27\100 lg

Normal View\M 27\105 lg

Normal View\M 27\110 lg

Normal View\M 27\115 lg

Normal View\M 27\120 lg

Normal View\M 27\125 lg

Normal View\M 27\130 lg

Normal View\M 27\200 lg

Normal View\M 27\195 lg

Normal View\M 27\190 lg

Normal View\M 27\185 lg

Normal View\M 27\180 lg

Normal View\M 27\175 lg

Normal View\M 27\170 lg

Normal View\M 27\165 lg

Normal View\M 27\160 lg

Normal View\M 27\155 lg

Normal View\M 27\150 lg

Normal View\M 27\145 lg

Normal View\M 27\140 lg

Normal View\M 27\135 lg

Normal View\M 30\70 lg

Normal View\M 30\75 lg

Normal View\M 30\80 lg

Normal View\M 30\85 lg

Normal View\M 30\90 lg

Normal View\M 30\95 lg

Normal View\M 30\100 lg

Normal View\M 30\105 lg

Normal View\M 30\110 lg

Normal View\M 30\115 lg

Normal View\M 30\120 lg

Normal View\M 30\125 lg

Normal View\M 30\130 lg

Normal View\M 30\135 lg

Normal View\M 30\140 lg

Normal View\M 30\145 lg

Normal View\M 30\150 lg

Normal View\M 30\155 lg

Normal View\M 30\160 lg

Normal View\M 30\165 lg

Normal View\M 30\170 lg

Normal View\M 30\175 lg

Normal View\M 30\180 lg

Normal View\M 30\185 lg

Normal View\M 30\190 lg

Normal View\M 30\195 lg

Normal View\M 30\200 lg

Plan View\M 12

Plan View\M 16

Plan View\M 20

Plan View\M 24

Plan View\M 30

Plan View\M 22

Plan View\M 27

Side View\M 12

Side View\M 16

Side View\M 20

Side View\M 24

Side View\M 30

Side View\M 22

Side View\M 27

(184 symbols)


Screws DIN 7991

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

Normal View\M 3\8 lg

Normal View\M 3\10 lg

Normal View\M 3\12 lg

Normal View\M 3\16 lg

Normal View\M 3\20 lg

Normal View\M 3\25 lg

Normal View\M 3\30 lg

Normal View\M 4\8 lg

Normal View\M 4\10 lg

Normal View\M 4\12 lg

Normal View\M 4\16 lg

Normal View\M 4\20 lg

Normal View\M 4\25 lg

Normal View\M 4\30 lg

Normal View\M 4\35 lg

Normal View\M 4\40 lg

Normal View\M 5\8 lg

Normal View\M 5\10 lg

Normal View\M 5\12 lg

Normal View\M 5\16 lg

Normal View\M 5\20 lg

Normal View\M 5\25 lg

Normal View\M 5\30 lg

Normal View\M 5\35 lg

Normal View\M 5\40 lg

Normal View\M 5\50 lg

Normal View\M 6\8 lg

Normal View\M 6\10 lg

Normal View\M 6\12 lg

Normal View\M 6\16 lg

Normal View\M 6\20 lg

Normal View\M 6\25 lg

Normal View\M 6\30 lg

Normal View\M 6\35 lg

Normal View\M 6\40 lg

Normal View\M 6\50 lg

Normal View\M 8\10 lg

Normal View\M 8\12 lg

Normal View\M 8\16 lg

Normal View\M 8\20 lg

Normal View\M 8\25 lg

Normal View\M 8\30 lg

Normal View\M 8\35 lg

Normal View\M 8\40 lg

Normal View\M 8\50 lg

Normal View\M 8\60 lg

Normal View\M 10\12 lg

Normal View\M 10\16 lg

Normal View\M 10\20 lg

Normal View\M 10\25 lg

Normal View\M 10\30 lg

Normal View\M 10\35 lg

Normal View\M 10\40 lg

Normal View\M 10\50 lg

Normal View\M 10\60 lg

Normal View\M 10\70 lg

Normal View\M 12\20 lg

Normal View\M 12\25 lg

Normal View\M 12\30 lg

Normal View\M 12\35 lg

Normal View\M 12\40 lg

Normal View\M 12\50 lg

Normal View\M 12\60 lg

Normal View\M 12\70 lg

Normal View\M 16\30 lg

Normal View\M 16\35 lg

Normal View\M 16\40 lg

Normal View\M 16\50 lg

Normal View\M 16\60 lg

Normal View\M 16\70 lg

Normal View\M 16\80 lg

Normal View\M 16\90 lg

Normal View\M 20\35 lg

Normal View\M 20\40 lg

Normal View\M 20\50 lg

Normal View\M 20\60 lg

Normal View\M 20\70 lg

Normal View\M 20\80 lg

Normal View\M 20\90 lg

Normal View\M 20\100 lg

Normal View\M 24\50 lg

Normal View\M 24\60 lg

Normal View\M 24\70 lg

Normal View\M 24\80 lg

Normal View\M 24\90 lg

Normal View\M 24\100 lg

Side View\M 3

Side View\M 4

Side View\M 5

Side View\M 6

Side View\M 8

Side View\M 10

Side View\M 12

Side View\M 16

Side View\M 20

Side View\M 24

(96 symbols)


Screw Heads

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

DIN 84\Normal View\M 1

DIN 84\Normal View\M 1.2

DIN 84\Normal View\M 1.4

DIN 84\Normal View\M 1.6

DIN 84\Normal View\M 2

DIN 84\Normal View\M 2.5

DIN 84\Normal View\M 3

DIN 84\Normal View\M 4

DIN 84\Normal View\M 5

DIN 84\Normal View\M 6

DIN 84\Normal View\M 8

DIN 84\Normal View\M 10

DIN 84\Side View\M 1

DIN 84\Side View\M 1.2

DIN 84\Side View\M 1.4

DIN 84\Side View\M 1.6

DIN 84\Side View\M 2

DIN 84\Side View\M 2.5

DIN 84\Side View\M 3

DIN 84\Side View\M 4

DIN 84\Side View\M 5

DIN 84\Side View\M 6

DIN 84\Side View\M 8

DIN 84\Side View\M 10

DIN 85\Normal View\M 3

DIN 85\Normal View\M 4

DIN 85\Normal View\M 5

DIN 85\Normal View\M 6

DIN 85\Side View\M 3

DIN 85\Side View\M 4

DIN 85\Side View\M 5

DIN 85\Side View\M 6

DIN 963\Normal View\M 1

DIN 963\Normal View\M 1.2

DIN 963\Normal View\M 1.4

DIN 963\Normal View\M 1.6

DIN 963\Normal View\M 2

DIN 963\Normal View\M 2.5

DIN 963\Normal View\M 3

DIN 963\Normal View\M 4

DIN 963\Normal View\M 5

DIN 963\Normal View\M 6

DIN 963\Normal View\M 8

DIN 963\Normal View\M 10

DIN 963\Normal View\M 12

DIN 963\Normal View\M 16

DIN 963\Normal View\M 20

DIN 963\Side View\M 20

DIN 963\Side View\M 16

DIN 963\Side View\M 12

DIN 963\Side View\M 10

DIN 963\Side View\M 8

DIN 963\Side View\M 6

DIN 963\Side View\M 5

DIN 963\Side View\M 4

DIN 963\Side View\M 3

DIN 963\Side View\M 2.5

DIN 963\Side View\M 2

DIN 963\Side View\M 1.6

DIN 963\Side View\M 1.4

DIN 963\Side View\M 1.2

DIN 963\Side View\M 1

DIN 964\Normal View\M 1

DIN 964\Normal View\M 1.2

DIN 964\Normal View\M 1.4

DIN 964\Normal View\M 1.6

DIN 964\Normal View\M 2

DIN 964\Normal View\M 2.5

DIN 964\Normal View\M 3

DIN 964\Normal View\M 4

DIN 964\Normal View\M 5

DIN 964\Normal View\M 6

DIN 964\Normal View\M 8

DIN 964\Normal View\M 10

DIN 964\Side View\M 1

DIN 964\Side View\M 1.2

DIN 964\Side View\M 1.4

DIN 964\Side View\M 1.6

DIN 964\Side View\M 2

DIN 964\Side View\M 2.5

DIN 964\Side View\M 3

DIN 964\Side View\M 4

DIN 964\Side View\M 5

DIN 964\Side View\M 6

DIN 964\Side View\M 8

DIN 964\Side View\M 10

DIN 965\Side View\M 1.6

DIN 965\Side View\M 2

DIN 965\Side View\M 2.5

DIN 965\Side View\M 3

DIN 965\Side View\M 4

DIN 965\Side View\M 5

DIN 965\Side View\M 6

DIN 965\Side View\M 8

DIN 965\Side View\M 10

DIN 965\Normal View\M 1.6

DIN 965\Normal View\M 2

DIN 965\Normal View\M 2.5

DIN 965\Normal View\M 3

DIN 965\Normal View\M 4

DIN 965\Normal View\M 5

DIN 965\Normal View\M 6

DIN 965\Normal View\M 8

DIN 965\Normal View\M 10

DIN 6921\Normal View\M 5

DIN 6921\Normal View\M 6

DIN 6921\Normal View\M 8

DIN 6921\Normal View\M 10

DIN 6921\Normal View\M 12

DIN 6921\Normal View\M 14

DIN 6921\Normal View\M 16

DIN 6921\Normal View\M 20

DIN 6921\Side View\M 5

DIN 6921\Side View\M 6

DIN 6921\Side View\M 8

DIN 6921\Side View\M 10

DIN 6921\Side View\M 12

DIN 6921\Side View\M 14

DIN 6921\Side View\M 16

DIN 6921\Side View\M 20

DIN 7984\Normal View\M 3

DIN 7984\Normal View\M 4

DIN 7984\Normal View\M 5

DIN 7984\Normal View\M 6

DIN 7984\Normal View\M 8

DIN 7984\Normal View\M 10

DIN 7984\Side View\M 3

DIN 7984\Side View\M 4

DIN 7984\Side View\M 5

DIN 7984\Side View\M 6

DIN 7984\Side View\M 8

DIN 7984\Side View\M 10

DIN 7985\Normal View\M 1.6

DIN 7985\Normal View\M 2

DIN 7985\Normal View\M 2.5

DIN 7985\Normal View\M 3

DIN 7985\Normal View\M 4

DIN 7985\Normal View\M 5

DIN 7985\Normal View\M 6

DIN 7985\Normal View\M 8

DIN 7985\Normal View\M 10

DIN 7985\Side View\M 1.6

DIN 7985\Side View\M 2

DIN 7985\Side View\M 2.5

DIN 7985\Side View\M 3

DIN 7985\Side View\M 4

DIN 7985\Side View\M 5

DIN 7985\Side View\M 6

DIN 7985\Side View\M 8

DIN 7985\Side View\M 10

(150 symbols)


Nuts

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

DIN 315\Normal View\M 4

DIN 315\Normal View\M 5

DIN 315\Normal View\M 6

DIN 315\Normal View\M 8

DIN 315\Normal View\M 10

DIN 315\Normal View\M 12

DIN 315\Normal View\M 16

DIN 315\Normal View\M 20

DIN 315\Normal View\M 24

DIN 315\Plan View\M 4

DIN 315\Plan View\M 5

DIN 315\Plan View\M 6

DIN 315\Plan View\M 8

DIN 315\Plan View\M 10

DIN 315\Plan View\M 12

DIN 315\Plan View\M 16

DIN 315\Plan View\M 20

DIN 315\Plan View\M 24

DIN 315\Side View\M 4

DIN 315\Side View\M 5

DIN 315\Side View\M 6

DIN 315\Side View\M 8

DIN 315\Side View\M 10

DIN 315\Side View\M 12

DIN 315\Side View\M 16

DIN 315\Side View\M 20

DIN 315\Side View\M 24

DIN 582\Normal View\M 8

DIN 582\Normal View\M 10

DIN 582\Normal View\M 12

DIN 582\Normal View\M 16

DIN 582\Normal View\M 20

DIN 582\Normal View\M 24

DIN 582\Normal View\M 30

DIN 582\Normal View\M 36

DIN 582\Normal View\M 42

DIN 582\Normal View\M 48

DIN 582\Normal View\M 56

DIN 582\Normal View\M 64

DIN 582\Normal View\M 72

DIN 582\Normal View\M 80

DIN 582\Normal View\M 100

DIN 582\Plan View\M 8

DIN 582\Plan View\M 10

DIN 582\Plan View\M 12

DIN 582\Plan View\M 16

DIN 582\Plan View\M 20

DIN 582\Plan View\M 24

DIN 582\Plan View\M 30

DIN 582\Plan View\M 36

DIN 582\Plan View\M 42

DIN 582\Plan View\M 48

DIN 582\Plan View\M 56

DIN 582\Plan View\M 64

DIN 582\Plan View\M 72

DIN 582\Plan View\M 80

DIN 582\Plan View\M100

DIN 582\Side View\M 8

DIN 582\Side View\M 10

DIN 582\Side View\M 12

DIN 582\Side View\M 16

DIN 582\Side View\M 20

DIN 582\Side View\M 24

DIN 582\Side View\M 30

DIN 582\Side View\M 36

DIN 582\Side View\M 42

DIN 582\Side View\M 48

DIN 582\Side View\M 56

DIN 582\Side View\M 64

DIN 582\Side View\M 72

DIN 582\Side View\M 80

DIN 582\Side View\M 100

DIN 917\Normal View\M 4

DIN 917\Normal View\M 5

DIN 917\Normal View\M 6

DIN 917\Normal View\M 8

DIN 917\Normal View\M 10

DIN 917\Normal View\M 12

DIN 917\Normal View\M 16

DIN 917\Normal View\M 20

DIN 917\Normal View\M 24

DIN 917\Normal View\M 30

DIN 917\Normal View\M 36

DIN 917\Normal View\M 42

DIN 917\Normal View\M 48

DIN 917\Side View\M 4

DIN 917\Side View\M 5

DIN 917\Side View\M 6

DIN 917\Side View\M 8

DIN 917\Side View\M 10

DIN 917\Side View\M 12

DIN 917\Side View\M 16

DIN 917\Side View\M 20

DIN 917\Side View\M 24

DIN 917\Side View\M 30

DIN 917\Side View\M 36

DIN 917\Side View\M 42

DIN 917\Side View\M 48

DIN 917\Plan View\M 4

DIN 917\Plan View\M 5

DIN 917\Plan View\M 6

DIN 917\Plan View\M 8

DIN 917\Plan View\M 10

DIN 917\Plan View\M 12

DIN 917\Plan View\M 16

DIN 917\Plan View\M 20

DIN 917\Plan View\M 24

DIN 917\Plan View\M 30

DIN 917\Plan View\M 36

DIN 917\Plan View\M 42

DIN 917\Plan View\M 48

DIN 934\Normal View\M 1

DIN 934\Normal View\M 1.2

DIN 934\Normal View\M 1.4

DIN 934\Normal View\M 1.6

DIN 934\Normal View\M 2

DIN 934\Normal View\M 2.5

DIN 934\Normal View\M 3

DIN 934\Normal View\M 4

DIN 934\Normal View\M 5

DIN 934\Normal View\M 6

DIN 934\Normal View\M 8

DIN 934\Normal View\M 10

DIN 934\Normal View\M 12

DIN 934\Normal View\M 16

DIN 934\Normal View\M 20

DIN 934\Normal View\M 24

DIN 934\Normal View\M 30

DIN 934\Normal View\M 36

DIN 934\Normal View\M 42

DIN 934\Normal View\M 48

DIN 934\Normal View\M 56

DIN 934\Normal View\M 64

DIN 934\Normal View\M 72

DIN 934\Normal View\M 80

DIN 934\Normal View\M 90

DIN 934\Normal View\M 100

DIN 934\Side View\M 1

DIN 934\Side View\M 1.2

DIN 934\Side View\M 1.4

DIN 934\Side View\M 1.6

DIN 934\Side View\M 2

DIN 934\Side View\M 2.5

DIN 934\Side View\M 3

DIN 934\Side View\M 4

DIN 934\Side View\M 5

DIN 934\Side View\M 6

DIN 934\Side View\M 8

DIN 934\Side View\M 10

DIN 934\Side View\M 12

DIN 934\Side View\M 16

DIN 934\Side View\M 20

DIN 934\Side View\M 24

DIN 934\Side View\M 30

DIN 934\Side View\M 36

DIN 934\Side View\M 42

DIN 934\Side View\M 48

DIN 934\Side View\M 56

DIN 934\Side View\M 64

DIN 934\Side View\M 72

DIN 934\Side View\M 80

DIN 934\Side View\M 90

DIN 934\Side View\M100

DIN 934\Plan View\M 1

DIN 934\Plan View\M 1.2

DIN 934\Plan View\M 1.4

DIN 934\Plan View\M 1.6

DIN 934\Plan View\M 2

DIN 934\Plan View\M 2.5

DIN 934\Plan View\M 3

DIN 934\Plan View\M 4

DIN 934\Plan View\M 5

DIN 934\Plan View\M 6

DIN 934\Plan View\M 8

DIN 934\Plan View\M 10

DIN 934\Plan View\M 12

DIN 934\Plan View\M 16

DIN 934\Plan View\M 20

DIN 934\Plan View\M 24

DIN 934\Plan View\M 30

DIN 934\Plan View\M 36

DIN 934\Plan View\M 42

DIN 934\Plan View\M 48

DIN 934\Plan View\M 56

DIN 934\Plan View\M 64

DIN 934\Plan View\M 72

DIN 934\Plan View\M 80

DIN 934\Plan View\M 90

DIN 934\Plan View\M 100

DIN 935\Normal View\M 4

DIN 935\Normal View\M 5

DIN 935\Normal View\M 6

DIN 935\Normal View\M 8

DIN 935\Normal View\M 10

DIN 935\Normal View\M 12

DIN 935\Normal View\M 16

DIN 935\Normal View\M 20

DIN 935\Normal View\M 24

DIN 935\Normal View\M 30

DIN 935\Normal View\M 36

DIN 935\Normal View\M 42

DIN 935\Normal View\M 48

DIN 935\Normal View\M 56

DIN 935\Normal View\M 64

DIN 935\Normal View\M 72

DIN 935\Normal View\M 80

DIN 935\Normal View\M 90

DIN 935\Normal View\M 100

DIN 935\Plan View\M 4

DIN 935\Plan View\M 5

DIN 935\Plan View\M 6

DIN 935\Plan View\M 8

DIN 935\Plan View\M 10

DIN 935\Plan View\M 12

DIN 935\Plan View\M 16

DIN 935\Plan View\M 20

DIN 935\Plan View\M 24

DIN 935\Plan View\M 30

DIN 935\Plan View\M 36

DIN 935\Plan View\M 42

DIN 935\Plan View\M 48

DIN 935\Plan View\M 56

DIN 935\Plan View\M 64

DIN 935\Plan View\M 48

DIN 935\Plan View\M 80

DIN 935\Plan View\M 90

DIN 935\Plan View\M 100

DIN 935\Side View\M 4

DIN 935\Side View\M 5

DIN 935\Side View\M 6

DIN 935\Side View\M 8

DIN 935\Side View\M 10

DIN 935\Side View\M 12

DIN 935\Side View\M 16

DIN 935\Side View\M 20

DIN 935\Side View\M 24

DIN 935\Side View\M 30

DIN 935\Side View\M 36

DIN 935\Side View\M 42

DIN 935\Side View\M 48

DIN 935\Side View\M 56

DIN 935\Side View\M 64

DIN 935\Side View\M 72

DIN 935\Side View\M 80

DIN 935\Side View\M 90

DIN 935\Side View\M 100

DIN 936\Normal View\M 8

DIN 936\Normal View\M 10

DIN 936\Normal View\M 12

DIN 936\Normal View\M 14

DIN 936\Normal View\M 16

DIN 936\Normal View\M 18

DIN 936\Normal View\M 20

DIN 936\Normal View\M 22

DIN 936\Normal View\M 24

DIN 936\Normal View\M 27

DIN 936\Normal View\M 30

DIN 936\Normal View\M 33

DIN 936\Normal View\M 36

DIN 936\Normal View\M 39

DIN 936\Normal View\M 42

DIN 936\Normal View\M 48

DIN 936\Normal View\M 52

DIN 936\Plan View\M 8

DIN 936\Plan View\M 10

DIN 936\Plan View\M 12

DIN 936\Plan View\M 14

DIN 936\Plan View\M 16

DIN 936\Plan View\M 18

DIN 936\Plan View\M 20

DIN 936\Plan View\M 22

DIN 936\Plan View\M 24

DIN 936\Plan View\M 27

DIN 936\Plan View\M 30

DIN 936\Plan View\M 33

DIN 936\Plan View\M 36

DIN 936\Plan View\M 39

DIN 936\Plan View\M 42

DIN 936\Plan View\M 48

DIN 936\Plan View\M 52

DIN 981\Section\M 10x0.75

DIN 981\Section\M 12x1

DIN 981\Section\M 15x1

DIN 981\Section\M 17x1

DIN 981\Section\M 20x1

DIN 981\Section\M 25x1.5

DIN 981\Section\M 30x1.5

DIN 981\Section\M 35x1.5

DIN 981\Section\M 40x1.5

DIN 981\Section\M 45x1.5

DIN 981\Section\M 50x1.5

DIN 981\Section\M 55x2

DIN 981\Section\M 60x2

DIN 981\Section\M 65x2

DIN 981\Section\M 70x2

DIN 981\Section\M 75x2

DIN 981\Section\M 80x2

DIN 936\Side View\M 8

DIN 936\Side View\M 10

DIN 936\Side View\M 12

DIN 936\Side View\M 14

DIN 936\Side View\M 16

DIN 936\Side View\M 18

DIN 936\Side View\M 20

DIN 936\Side View\M 22

DIN 936\Side View\M 24

DIN 936\Side View\M 27

DIN 936\Side View\M 30

DIN 936\Side View\M 33

DIN 936\Side View\M 36

DIN 936\Side View\M 39

DIN 936\Side View\M 42

DIN 936\Side View\M 48

DIN 936\Side View\M 52

DIN 981\Section\M 85x2

DIN 981\Section\M 90x2

DIN 981\Section\M 95x2

DIN 981\Section\M100x2

DIN 981\Section\M105x2

DIN 981\Section\M110x2

DIN 981\Section\M115x2

DIN 981\Section\M120x2 (KML24)

DIN 981\Section\M120x2 (KM24)

DIN 981\Section\M125x2

DIN 981\Section\M130x2 (KML26)

DIN 981\Section\M130x2 (KM26)

DIN 981\Section\M135x2

DIN 981\Section\M140x2 (KML28)

DIN 981\Section\M140x2 (KM28)

DIN 981\Section\M145x2

DIN 981\Section\M150x2 (KM30)

DIN 981\Section\M150x2 (KML30)

DIN 981\Side View\M 10x0.75

DIN 981\Side View\M 12x1

DIN 981\Side View\M 15x1

DIN 981\Side View\M 17x1

DIN 981\Side View\M 20x1

DIN 981\Side View\M 25x1.5

DIN 981\Side View\M 30x1.5

DIN 981\Side View\M 35x1.5

DIN 981\Side View\M 40x1.5

DIN 981\Side View\M 45x1.5

DIN 981\Side View\M 50x1.5

DIN 981\Side View\M 55x2

DIN 981\Side View\M 60x2

DIN 981\Side View\M 65x2

DIN 981\Side View\M 70x2

DIN 981\Side View\M 75x2

DIN 981\Side View\M 80x2

DIN 981\Side View\M 85x2

DIN 981\Side View\M 90x2

DIN 981\Side View\M 95x2

DIN 981\Side View\M100x2

DIN 981\Side View\M105x2

DIN 981\Side View\M110x2

DIN 981\Side View\M115x2

DIN 981\Side View\M120x2 (KML24)

DIN 981\Side View\M120x2 (KM24)

DIN 981\Side View\M150x2 (KM30)

DIN 981\Side View\M150x2 (KML30)

DIN 981\Side View\M145x2

DIN 981\Side View\M140x2 (KM28)

DIN 981\Side View\M140x2 (KML28)

DIN 981\Side View\M135x2

DIN 981\Side View\M130x2 (KM26)

DIN 981\Side View\M130x2 (KML26)

DIN 981\Side View\M125x2

DIN 1587\Normal View\M 4

DIN 1587\Normal View\M 5

DIN 1587\Normal View\M 6

DIN 1587\Normal View\M 8

DIN 1587\Normal View\M 10

DIN 1587\Normal View\M 12

DIN 1587\Normal View\M 16

DIN 1587\Normal View\M 20

DIN 1587\Normal View\M 24

DIN 1587\Plan View\M 4

DIN 1587\Plan View\M 5

DIN 1587\Plan View\M 6

DIN 1587\Plan View\M 8

DIN 1587\Plan View\M 10

DIN 1587\Plan View\M 12

DIN 1587\Plan View\M 16

DIN 1587\Plan View\M 20

DIN 1587\Plan View\M 24

DIN 1587\Side View\M 4

DIN 1587\Side View\M 5

DIN 1587\Side View\M 6

DIN 1587\Side View\M 8

DIN 1587\Side View\M 10

DIN 1587\Side View\M 12

DIN 1587\Side View\M 16

DIN 1587\Side View\M 20

DIN 1587\Side View\M 24

DIN 6330\Normal View\M 6

DIN 6330\Normal View\M 8

DIN 6330\Normal View\M 10

DIN 6330\Normal View\M 12

DIN 6330\Normal View\M 16

DIN 6330\Normal View\M 20

DIN 6330\Normal View\M 24

DIN 6330\Normal View\M 30

DIN 6330\Normal View\M 36

DIN 6330\Normal View\M 42

DIN 6330\Normal View\M 48

DIN 6330\Plan View\M 6

DIN 6330\Plan View\M 8

DIN 6330\Plan View\M 10

DIN 6330\Plan View\M 12

DIN 6330\Plan View\M 16

DIN 6330\Plan View\M 20

DIN 6330\Plan View\M 24

DIN 6330\Plan View\M 30

DIN 6330\Plan View\M 36

DIN 6330\Plan View\M 42

DIN 6330\Plan View\M 48

DIN 6330\Side View\M 6

DIN 6330\Side View\M 8

DIN 6330\Side View\M 10

DIN 6330\Side View\M 12

DIN 6330\Side View\M 16

DIN 6330\Side View\M 20

DIN 6330\Side View\M 24

DIN 6330\Side View\M 30

DIN 6330\Side View\M 36

DIN 6330\Side View\M 42

DIN 6330\Side View\M 48

DIN 6923\Normal View\M 5

DIN 6923\Normal View\M 6

DIN 6923\Normal View\M 8

DIN 6923\Normal View\M 10

DIN 6923\Normal View\M 12

DIN 6923\Normal View\M 14

DIN 6923\Normal View\M 16

DIN 6923\Normal View\M 20

DIN 6923\Side View\M 5

DIN 6923\Side View\M 6

DIN 6923\Side View\M 8

DIN 6923\Side View\M 10

DIN 6923\Side View\M 12

DIN 6923\Side View\M 14

DIN 6923\Side View\M 16

DIN 6923\Side View\M 20

(443 symbols)


Profiles
Steel Sections

For TommySoftware® CAD/DRAW 3 and CAD/DRAW 4 only!!!

Library Contents

Steel Profiles\DIN 1022\Side View\LS 20x3

Steel Profiles\DIN 1022\Side View\LS 20x4

Steel Profiles\DIN 1022\Side View\LS 25x3

Steel Profiles\DIN 1022\Side View\LS 25x4

Steel Profiles\DIN 1022\Side View\LS 30x3

Steel Profiles\DIN 1022\Side View\LS 30x4

Steel Profiles\DIN 1022\Side View\LS 35x4

Steel Profiles\DIN 1022\Side View\LS 40x4

Steel Profiles\DIN 1022\Side View\LS 40x5

Steel Profiles\DIN 1022\Side View\LS 45x5

Steel Profiles\DIN 1022\Side View\LS 50x5

Steel Profiles\DIN 1022\Normal View\LS 20x3

Steel Profiles\DIN 1022\Normal View\LS 20x4

Steel Profiles\DIN 1022\Normal View\LS 25x3

Steel Profiles\DIN 1022\Normal View\LS 25x4

Steel Profiles\DIN 1022\Normal View\LS 30x3

Steel Profiles\DIN 1022\Normal View\LS 30x4

Steel Profiles\DIN 1022\Normal View\LS 35x4

Steel Profiles\DIN 1022\Normal View\LS 40x4

Steel Profiles\DIN 1022\Normal View\LS 40x5

Steel Profiles\DIN 1022\Normal View\LS 45x5

Steel Profiles\DIN 1022\Normal View\LS 50x5

Steel Profiles\DIN 1022\Plan View\LS 20x3

Steel Profiles\DIN 1022\Plan View\LS 20x4

Steel Profiles\DIN 1022\Plan View\LS 25x3

Steel Profiles\DIN 1022\Plan View\LS 25x4

Steel Profiles\DIN 1022\Plan View\LS 30x3

Steel Profiles\DIN 1022\Plan View\LS 30x4

Steel Profiles\DIN 1022\Plan View\LS 35x4

Steel Profiles\DIN 1022\Plan View\LS 40x4

Steel Profiles\DIN 1022\Plan View\LS 40x5

Steel Profiles\DIN 1022\Plan View\LS 45x5

Steel Profiles\DIN 1022\Plan View\LS 50x5

Steel Profiles\DIN 1024\Side View\T 20

Steel Profiles\DIN 1024\Side View\T 25

Steel Profiles\DIN 1024\Side View\T 30

Steel Profiles\DIN 1024\Side View\T 35

Steel Profiles\DIN 1024\Side View\T 40

Steel Profiles\DIN 1024\Side View\T 45

Steel Profiles\DIN 1024\Side View\T 50

Steel Profiles\DIN 1024\Side View\T 60

Steel Profiles\DIN 1024\Side View\T 70

Steel Profiles\DIN 1024\Side View\T 80

Steel Profiles\DIN 1024\Side View\T 90

Steel Profiles\DIN 1024\Side View\T 100

Steel Profiles\DIN 1024\Side View\T 120

Steel Profiles\DIN 1024\Side View\T 140

Steel Profiles\DIN 1024\Side View\TB 30

Steel Profiles\DIN 1024\Side View\TB 35

Steel Profiles\DIN 1024\Side View\TB 40

Steel Profiles\DIN 1024\Side View\TB 50

Steel Profiles\DIN 1024\Side View\TB 60

Steel Profiles\DIN 1024\Normal View\T 20

Steel Profiles\DIN 1024\Normal View\T 25

Steel Profiles\DIN 1024\Normal View\T 30

Steel Profiles\DIN 1024\Normal View\T 35

Steel Profiles\DIN 1024\Normal View\T 40

Steel Profiles\DIN 1024\Normal View\T 45

Steel Profiles\DIN 1024\Normal View\T 50

Steel Profiles\DIN 1024\Normal View\T 60

Steel Profiles\DIN 1024\Normal View\T 70

Steel Profiles\DIN 1024\Normal View\T 80

Steel Profiles\DIN 1024\Normal View\T 90

Steel Profiles\DIN 1024\Normal View\T 100

Steel Profiles\DIN 1024\Normal View\T 120

Steel Profiles\DIN 1024\Normal View\T 140

Steel Profiles\DIN 1024\Normal View\TB 30

Steel Profiles\DIN 1024\Normal View\TB 35

Steel Profiles\DIN 1024\Normal View\TB 40

Steel Profiles\DIN 1024\Normal View\TB 50

Steel Profiles\DIN 1024\Normal View\TB 60

Steel Profiles\DIN 1024\Plan View\T 20

Steel Profiles\DIN 1024\Plan View\T 25

Steel Profiles\DIN 1024\Plan View\T 30

Steel Profiles\DIN 1024\Plan View\T 35

Steel Profiles\DIN 1024\Plan View\T 40

Steel Profiles\DIN 1024\Plan View\T 45

Steel Profiles\DIN 1024\Plan View\T 50

Steel Profiles\DIN 1024\Plan View\T 60

Steel Profiles\DIN 1024\Plan View\T 70

Steel Profiles\DIN 1024\Plan View\T 80

Steel Profiles\DIN 1024\Plan View\T 90

Steel Profiles\DIN 1024\Plan View\T 100

Steel Profiles\DIN 1024\Plan View\T 120

Steel Profiles\DIN 1024\Plan View\T 140

Steel Profiles\DIN 1024\Plan View\TB 30

Steel Profiles\DIN 1024\Plan View\TB 35

Steel Profiles\DIN 1024\Plan View\TB 40

Steel Profiles\DIN 1024\Plan View\TB 50

Steel Profiles\DIN 1024\Plan View\TB 60

Steel Profiles\DIN 1025/1\Side View\I 80

Steel Profiles\DIN 1025/1\Side View\I 100

Steel Profiles\DIN 1025/1\Side View\I 120

Steel Profiles\DIN 1025/1\Side View\I 140

Steel Profiles\DIN 1025/1\Side View\I 160

Steel Profiles\DIN 1025/1\Side View\I 180

Steel Profiles\DIN 1025/1\Side View\I 200

Steel Profiles\DIN 1025/1\Side View\I 220

Steel Profiles\DIN 1025/1\Side View\I 240

Steel Profiles\DIN 1025/1\Side View\I 260

Steel Profiles\DIN 1025/1\Side View\I 280

Steel Profiles\DIN 1025/1\Side View\I 300

Steel Profiles\DIN 1025/1\Side View\I 320

Steel Profiles\DIN 1025/1\Side View\I 340

Steel Profiles\DIN 1025/1\Side View\I 360

Steel Profiles\DIN 1025/1\Side View\I 380

Steel Profiles\DIN 1025/1\Side View\I 400

Steel Profiles\DIN 1025/1\Side View\I 425

Steel Profiles\DIN 1025/1\Side View\I 450

Steel Profiles\DIN 1025/1\Side View\I 475

Steel Profiles\DIN 1025/1\Side View\I 500

Steel Profiles\DIN 1025/1\Side View\I 550

Steel Profiles\DIN 1025/1\Side View\I 600

Steel Profiles\DIN 1025/1\Normal View\I 80

Steel Profiles\DIN 1025/1\Normal View\I 100

Steel Profiles\DIN 1025/1\Normal View\I 120

Steel Profiles\DIN 1025/1\Normal View\I 140

Steel Profiles\DIN 1025/1\Normal View\I 160

Steel Profiles\DIN 1025/1\Normal View\I 180

Steel Profiles\DIN 1025/1\Normal View\I 200

Steel Profiles\DIN 1025/1\Normal View\I 220

Steel Profiles\DIN 1025/1\Normal View\I 240

Steel Profiles\DIN 1025/1\Normal View\I 260

Steel Profiles\DIN 1025/1\Normal View\I 280

Steel Profiles\DIN 1025/1\Normal View\I 300

Steel Profiles\DIN 1025/1\Normal View\I 320

Steel Profiles\DIN 1025/1\Normal View\I 340

Steel Profiles\DIN 1025/1\Normal View\I 600

Steel Profiles\DIN 1025/1\Normal View\I 550

Steel Profiles\DIN 1025/1\Normal View\I 500

Steel Profiles\DIN 1025/1\Normal View\I 475

Steel Profiles\DIN 1025/1\Normal View\I 450

Steel Profiles\DIN 1025/1\Normal View\I 425

Steel Profiles\DIN 1025/1\Normal View\I 400

Steel Profiles\DIN 1025/1\Normal View\I 380

Steel Profiles\DIN 1025/1\Normal View\I 360

Steel Profiles\DIN 1025/1\Plan View\I 80

Steel Profiles\DIN 1025/1\Plan View\I 100

Steel Profiles\DIN 1025/1\Plan View\I 120

Steel Profiles\DIN 1025/1\Plan View\I 140

Steel Profiles\DIN 1025/1\Plan View\I 160

Steel Profiles\DIN 1025/1\Plan View\I 180

Steel Profiles\DIN 1025/1\Plan View\I 200

Steel Profiles\DIN 1025/1\Plan View\I 220

Steel Profiles\DIN 1025/1\Plan View\I 240

Steel Profiles\DIN 1025/1\Plan View\I 260

Steel Profiles\DIN 1025/1\Plan View\I 280

Steel Profiles\DIN 1025/1\Plan View\I 300

Steel Profiles\DIN 1025/1\Plan View\I 320

Steel Profiles\DIN 1025/1\Plan View\I 340

Steel Profiles\DIN 1025/1\Plan View\I 360

Steel Profiles\DIN 1025/1\Plan View\I 380

Steel Profiles\DIN 1025/1\Plan View\I 400

Steel Profiles\DIN 1025/1\Plan View\I 425

Steel Profiles\DIN 1025/1\Plan View\I 450

Steel Profiles\DIN 1025/1\Plan View\I 475

Steel Profiles\DIN 1025/1\Plan View\I 500

Steel Profiles\DIN 1025/1\Plan View\I 550

Steel Profiles\DIN 1025/1\Plan View\I 600

Steel Profiles\DIN 1025/2\Side View\IPB 100

Steel Profiles\DIN 1025/2\Side View\IPB 120

Steel Profiles\DIN 1025/2\Side View\IPB 140

Steel Profiles\DIN 1025/2\Side View\IPB 160

Steel Profiles\DIN 1025/2\Side View\IPB 180

Steel Profiles\DIN 1025/2\Side View\IPB 200

Steel Profiles\DIN 1025/2\Side View\IPB 220

Steel Profiles\DIN 1025/2\Side View\IPB 240

Steel Profiles\DIN 1025/2\Side View\IPB 260

Steel Profiles\DIN 1025/2\Side View\IPB 280

Steel Profiles\DIN 1025/2\Side View\IPB 300

Steel Profiles\DIN 1025/2\Side View\IPB 320

Steel Profiles\DIN 1025/2\Side View\IPB 340

Steel Profiles\DIN 1025/2\Side View\IPB 360

Steel Profiles\DIN 1025/2\Side View\IPB 400

Steel Profiles\DIN 1025/2\Side View\IPB 450

Steel Profiles\DIN 1025/2\Side View\IPB 500

Steel Profiles\DIN 1025/2\Side View\IPB 550

Steel Profiles\DIN 1025/2\Side View\IPB 600

Steel Profiles\DIN 1025/2\Side View\IPB 650

Steel Profiles\DIN 1025/2\Side View\IPB 1000

Steel Profiles\DIN 1025/2\Side View\IPB 900

Steel Profiles\DIN 1025/2\Side View\IPB 800

Steel Profiles\DIN 1025/2\Side View\IPB 700

Steel Profiles\DIN 1025/2\Normal View\IPB 100

Steel Profiles\DIN 1025/2\Normal View\IPB 120

Steel Profiles\DIN 1025/2\Normal View\IPB 140

Steel Profiles\DIN 1025/2\Normal View\IPB 160

Steel Profiles\DIN 1025/2\Normal View\IPB 180

Steel Profiles\DIN 1025/2\Normal View\IPB 200

Steel Profiles\DIN 1025/2\Normal View\IPB 220

Steel Profiles\DIN 1025/2\Normal View\IPB 240

Steel Profiles\DIN 1025/2\Normal View\IPB 260

Steel Profiles\DIN 1025/2\Normal View\IPB 280

Steel Profiles\DIN 1025/2\Normal View\IPB 300

Steel Profiles\DIN 1025/2\Normal View\IPB 320

Steel Profiles\DIN 1025/2\Normal View\IPB 340

Steel Profiles\DIN 1025/2\Normal View\IPB 360

Steel Profiles\DIN 1025/2\Normal View\IPB 400

Steel Profiles\DIN 1025/2\Normal View\IPB 450

Steel Profiles\DIN 1025/2\Normal View\IPB 500

Steel Profiles\DIN 1025/2\Normal View\IPB 550

Steel Profiles\DIN 1025/2\Normal View\IPB 600

Steel Profiles\DIN 1025/2\Normal View\IPB 650

Steel Profiles\DIN 1025/2\Normal View\IPB 700

Steel Profiles\DIN 1025/2\Normal View\IPB 800

Steel Profiles\DIN 1025/2\Normal View\IPB 900

Steel Profiles\DIN 1025/2\Normal View\IPB 1000

Steel Profiles\DIN 1025/2\Plan View\IPB 100

Steel Profiles\DIN 1025/2\Plan View\IPB 120

Steel Profiles\DIN 1025/2\Plan View\IPB 140

Steel Profiles\DIN 1025/2\Plan View\IPB 160

Steel Profiles\DIN 1025/2\Plan View\IPB 180

Steel Profiles\DIN 1025/2\Plan View\IPB 200

Steel Profiles\DIN 1025/2\Plan View\IPB 220

Steel Profiles\DIN 1025/2\Plan View\IPB 240

Steel Profiles\DIN 1025/2\Plan View\IPB 260

Steel Profiles\DIN 1025/2\Plan View\IPB 280

Steel Profiles\DIN 1025/2\Plan View\IPB 300

Steel Profiles\DIN 1025/2\Plan View\IPB 320

Steel Profiles\DIN 1025/2\Plan View\IPB 340

Steel Profiles\DIN 1025/2\Plan View\IPB 360

Steel Profiles\DIN 1025/2\Plan View\IPB 400

Steel Profiles\DIN 1025/2\Plan View\IPB 450

Steel Profiles\DIN 1025/2\Plan View\IPB 500

Steel Profiles\DIN 1025/2\Plan View\IPB 550

Steel Profiles\DIN 1025/2\Plan View\IPB 600

Steel Profiles\DIN 1025/2\Plan View\IPB 650

Steel Profiles\DIN 1025/2\Plan View\IPB 700

Steel Profiles\DIN 1025/2\Plan View\IPB 800

Steel Profiles\DIN 1025/2\Plan View\IPB 900

Steel Profiles\DIN 1025/2\Plan View\IPB 1000

Steel Profiles\DIN 1025/2\Side View\IB 100

Steel Profiles\DIN 1025/2\Side View\IB 120

Steel Profiles\DIN 1025/2\Side View\IB 140

Steel Profiles\DIN 1025/2\Side View\IB 160

Steel Profiles\DIN 1025/2\Side View\IB 180

Steel Profiles\DIN 1025/2\Normal View\IB 100

Steel Profiles\DIN 1025/2\Normal View\IB 120

Steel Profiles\DIN 1025/2\Normal View\IB 140

Steel Profiles\DIN 1025/2\Normal View\IB 160

Steel Profiles\DIN 1025/2\Normal View\IB 180

Steel Profiles\DIN 1025/2\Plan View\IB 100

Steel Profiles\DIN 1025/2\Plan View\IB 120

Steel Profiles\DIN 1025/2\Plan View\IB 140

Steel Profiles\DIN 1025/2\Plan View\IB 160

Steel Profiles\DIN 1025/2\Plan View\IB 180

Steel Profiles\DIN 1025/3\Side View\IPBl 100

Steel Profiles\DIN 1025/3\Side View\IPBl 120

Steel Profiles\DIN 1025/3\Side View\IPBl 140

Steel Profiles\DIN 1025/3\Side View\IPBl 160

Steel Profiles\DIN 1025/3\Side View\IPBl 180

Steel Profiles\DIN 1025/3\Side View\IPBl 200

Steel Profiles\DIN 1025/3\Side View\IPBl 220

Steel Profiles\DIN 1025/3\Side View\IPBl 240

Steel Profiles\DIN 1025/3\Side View\IPBl 260

Steel Profiles\DIN 1025/3\Side View\IPBl 280

Steel Profiles\DIN 1025/3\Side View\IPBl 300

Steel Profiles\DIN 1025/3\Side View\IPBl 320

Steel Profiles\DIN 1025/3\Side View\IPBl 340

Steel Profiles\DIN 1025/3\Side View\IPBl 360

Steel Profiles\DIN 1025/3\Side View\IPBl 400

Steel Profiles\DIN 1025/3\Side View\IPBl 450

Steel Profiles\DIN 1025/3\Side View\IPBl 500

Steel Profiles\DIN 1025/3\Side View\IPBl 550

Steel Profiles\DIN 1025/3\Side View\IPBl 600

Steel Profiles\DIN 1025/3\Side View\IPBl 650

Steel Profiles\DIN 1025/3\Side View\IPBl 1000

Steel Profiles\DIN 1025/3\Side View\IPBl 900

Steel Profiles\DIN 1025/3\Side View\IPBl 800

Steel Profiles\DIN 1025/3\Side View\IPBl 700

Steel Profiles\DIN 1025/3\Normal View\IPBl 100

Steel Profiles\DIN 1025/3\Normal View\IPBl 120

Steel Profiles\DIN 1025/3\Normal View\IPBl 140

Steel Profiles\DIN 1025/3\Normal View\IPBl 160

Steel Profiles\DIN 1025/3\Normal View\IPBl 180

Steel Profiles\DIN 1025/3\Normal View\IPBl 200

Steel Profiles\DIN 1025/3\Normal View\IPBl 220

Steel Profiles\DIN 1025/3\Normal View\IPBl 240

Steel Profiles\DIN 1025/3\Normal View\IPBl 260

Steel Profiles\DIN 1025/3\Normal View\IPBl 280

Steel Profiles\DIN 1025/3\Normal View\IPBl 300

Steel Profiles\DIN 1025/3\Normal View\IPBl 320

Steel Profiles\DIN 1025/3\Normal View\IPBl 340

Steel Profiles\DIN 1025/3\Normal View\IPBl 360

Steel Profiles\DIN 1025/3\Normal View\IPBl 400

Steel Profiles\DIN 1025/3\Normal View\IPBl 450

Steel Profiles\DIN 1025/3\Normal View\IPBl 500

Steel Profiles\DIN 1025/3\Normal View\IPBl 550

Steel Profiles\DIN 1025/3\Normal View\IPBl 600

Steel Profiles\DIN 1025/3\Normal View\IPBl 650

Steel Profiles\DIN 1025/3\Normal View\IPBl 700

Steel Profiles\DIN 1025/3\Normal View\IPBl 800

Steel Profiles\DIN 1025/3\Normal View\IPBl 900

Steel Profiles\DIN 1025/3\Normal View\IPBl 1000

Steel Profiles\DIN 1025/3\Plan View\IPBl 100

Steel Profiles\DIN 1025/3\Plan View\IPBl 120

Steel Profiles\DIN 1025/3\Plan View\IPBl 140

Steel Profiles\DIN 1025/3\Plan View\IPBl 160

Steel Profiles\DIN 1025/3\Plan View\IPBl 180

Steel Profiles\DIN 1025/3\Plan View\IPBl 200

Steel Profiles\DIN 1025/3\Plan View\IPBl 220

Steel Profiles\DIN 1025/3\Plan View\IPBl 240

Steel Profiles\DIN 1025/3\Plan View\IPBl 260

Steel Profiles\DIN 1025/3\Plan View\IPBl 280

Steel Profiles\DIN 1025/3\Plan View\IPBl 300

Steel Profiles\DIN 1025/3\Plan View\IPBl 320

Steel Profiles\DIN 1025/3\Plan View\IPBl 340

Steel Profiles\DIN 1025/3\Plan View\IPBl 360

Steel Profiles\DIN 1025/3\Plan View\IPBl 400

Steel Profiles\DIN 1025/3\Plan View\IPBl 450

Steel Profiles\DIN 1025/3\Plan View\IPBl 500

Steel Profiles\DIN 1025/3\Plan View\IPBl 550

Steel Profiles\DIN 1025/3\Plan View\IPBl 600

Steel Profiles\DIN 1025/3\Plan View\IPBl 650

Steel Profiles\DIN 1025/3\Plan View\IPBl 700

Steel Profiles\DIN 1025/3\Plan View\IPBl 800

Steel Profiles\DIN 1025/3\Plan View\IPBl 900

Steel Profiles\DIN 1025/3\Plan View\IPBl 1000

Steel Profiles\DIN 1025/4\Side View\IPBv 100

Steel Profiles\DIN 1025/4\Side View\IPBv 120

Steel Profiles\DIN 1025/4\Side View\IPBv 140

Steel Profiles\DIN 1025/4\Side View\IPBv 160

Steel Profiles\DIN 1025/4\Side View\IPBv 180

Steel Profiles\DIN 1025/4\Side View\IPBv 200

Steel Profiles\DIN 1025/4\Side View\IPBv 220

Steel Profiles\DIN 1025/4\Side View\IPBv 240

Steel Profiles\DIN 1025/4\Side View\IPBv 260

Steel Profiles\DIN 1025/4\Side View\IPBv 280

Steel Profiles\DIN 1025/4\Side View\IPBv 300

Steel Profiles\DIN 1025/4\Side View\IPBv 305

Steel Profiles\DIN 1025/4\Side View\IPBv 320

Steel Profiles\DIN 1025/4\Side View\IPBv 340

Steel Profiles\DIN 1025/4\Side View\IPBv 360

Steel Profiles\DIN 1025/4\Side View\IPBv 400

Steel Profiles\DIN 1025/4\Side View\IPBv 450

Steel Profiles\DIN 1025/4\Side View\IPBv 500

Steel Profiles\DIN 1025/4\Side View\IPBv 550

Steel Profiles\DIN 1025/4\Side View\IPBv 600

Steel Profiles\DIN 1025/4\Side View\IPBv 650

Steel Profiles\DIN 1025/4\Side View\IPBv 700

Steel Profiles\DIN 1025/4\Side View\IPBv 800

Steel Profiles\DIN 1025/4\Side View\IPBv 900

Steel Profiles\DIN 1025/4\Side View\IPBv 1000

Steel Profiles\DIN 1025/4\Normal View\IPBv 100

Steel Profiles\DIN 1025/4\Normal View\IPBv 120

Steel Profiles\DIN 1025/4\Normal View\IPBv 140

Steel Profiles\DIN 1025/4\Normal View\IPBv 160

Steel Profiles\DIN 1025/4\Normal View\IPBv 180

Steel Profiles\DIN 1025/4\Normal View\IPBv 200

Steel Profiles\DIN 1025/4\Normal View\IPBv 220

Steel Profiles\DIN 1025/4\Normal View\IPBv 240

Steel Profiles\DIN 1025/4\Normal View\IPBv 260

Steel Profiles\DIN 1025/4\Normal View\IPBv 280

Steel Profiles\DIN 1025/4\Normal View\IPBv 300

Steel Profiles\DIN 1025/4\Normal View\IPBv 305

Steel Profiles\DIN 1025/4\Normal View\IPBv 320

Steel Profiles\DIN 1025/4\Normal View\IPBv 340

Steel Profiles\DIN 1025/4\Normal View\IPBv 360

Steel Profiles\DIN 1025/4\Normal View\IPBv 400

Steel Profiles\DIN 1025/4\Normal View\IPBv 450

Steel Profiles\DIN 1025/4\Normal View\IPBv 500

Steel Profiles\DIN 1025/4\Normal View\IPBv 550

Steel Profiles\DIN 1025/4\Normal View\IPBv 600

Steel Profiles\DIN 1025/4\Normal View\IPBv 650

Steel Profiles\DIN 1025/4\Normal View\IPBv 700

Steel Profiles\DIN 1025/4\Normal View\IPBv 800

Steel Profiles\DIN 1025/4\Normal View\IPBv 900

Steel Profiles\DIN 1025/4\Normal View\IPBv 1000

Steel Profiles\DIN 1025/4\Plan View\IPBv 1000

Steel Profiles\DIN 1025/4\Plan View\IPBv 900

Steel Profiles\DIN 1025/4\Plan View\IPBv 800

Steel Profiles\DIN 1025/4\Plan View\IPBv 700

Steel Profiles\DIN 1025/4\Plan View\IPBv 650

Steel Profiles\DIN 1025/4\Plan View\IPBv 600

Steel Profiles\DIN 1025/4\Plan View\IPBv 550

Steel Profiles\DIN 1025/4\Plan View\IPBv 500

Steel Profiles\DIN 1025/4\Plan View\IPBv 450

Steel Profiles\DIN 1025/4\Plan View\IPBv 400

Steel Profiles\DIN 1025/4\Plan View\IPBv 360

Steel Profiles\DIN 1025/4\Plan View\IPBv 340

Steel Profiles\DIN 1025/4\Plan View\IPBv 320

Steel Profiles\DIN 1025/4\Plan View\IPBv 305

Steel Profiles\DIN 1025/4\Plan View\IPBv 300

Steel Profiles\DIN 1025/4\Plan View\IPBv 280

Steel Profiles\DIN 1025/4\Plan View\IPBv 260

Steel Profiles\DIN 1025/4\Plan View\IPBv 240

Steel Profiles\DIN 1025/4\Plan View\IPBv 220

Steel Profiles\DIN 1025/4\Plan View\IPBv 200

Steel Profiles\DIN 1025/4\Plan View\IPBv 180

Steel Profiles\DIN 1025/4\Plan View\IPBv 160

Steel Profiles\DIN 1025/4\Plan View\IPBv 140

Steel Profiles\DIN 1025/4\Plan View\IPBv 120

Steel Profiles\DIN 1025/4\Plan View\IPBv 100

Steel Profiles\DIN 1025/5\Side View\IPE 80

Steel Profiles\DIN 1025/5\Side View\IPE 100

Steel Profiles\DIN 1025/5\Side View\IPE 120

Steel Profiles\DIN 1025/5\Side View\IPE 140

Steel Profiles\DIN 1025/5\Side View\IPE 160

Steel Profiles\DIN 1025/5\Side View\IPE 180

Steel Profiles\DIN 1025/5\Side View\IPE 200

Steel Profiles\DIN 1025/5\Side View\IPE 220

Steel Profiles\DIN 1025/5\Side View\IPE 240

Steel Profiles\DIN 1025/5\Side View\IPE 270

Steel Profiles\DIN 1025/5\Side View\IPE 300

Steel Profiles\DIN 1025/5\Side View\IPE 330

Steel Profiles\DIN 1025/5\Side View\IPE 360

Steel Profiles\DIN 1025/5\Side View\IPE 400

Steel Profiles\DIN 1025/5\Side View\IPE 450

Steel Profiles\DIN 1025/5\Side View\IPE 500

Steel Profiles\DIN 1025/5\Side View\IPE 550

Steel Profiles\DIN 1025/5\Side View\IPE 600

Steel Profiles\DIN 1025/5\Plan View\IPE 600

Steel Profiles\DIN 1025/5\Plan View\IPE 550

Steel Profiles\DIN 1025/5\Plan View\IPE 500

Steel Profiles\DIN 1025/5\Plan View\IPE 450

Steel Profiles\DIN 1025/5\Plan View\IPE 400

Steel Profiles\DIN 1025/5\Plan View\IPE 360

Steel Profiles\DIN 1025/5\Plan View\IPE 330

Steel Profiles\DIN 1025/5\Plan View\IPE 300

Steel Profiles\DIN 1025/5\Plan View\IPE 270

Steel Profiles\DIN 1025/5\Plan View\IPE 240

Steel Profiles\DIN 1025/5\Plan View\IPE 220

Steel Profiles\DIN 1025/5\Plan View\IPE 200

Steel Profiles\DIN 1025/5\Plan View\IPE 180

Steel Profiles\DIN 1025/5\Plan View\IPE 160

Steel Profiles\DIN 1025/5\Plan View\IPE 140

Steel Profiles\DIN 1025/5\Plan View\IPE 120

Steel Profiles\DIN 1025/5\Plan View\IPE 100

Steel Profiles\DIN 1025/5\Plan View\IPE 80

Steel Profiles\DIN 1025/5\Normal View\IPE 80

Steel Profiles\DIN 1025/5\Normal View\IPE 100

Steel Profiles\DIN 1025/5\Normal View\IPE 120

Steel Profiles\DIN 1025/5\Normal View\IPE 140

Steel Profiles\DIN 1025/5\Normal View\IPE 160

Steel Profiles\DIN 1025/5\Normal View\IPE 180

Steel Profiles\DIN 1025/5\Normal View\IPE 200

Steel Profiles\DIN 1025/5\Normal View\IPE 220

Steel Profiles\DIN 1025/5\Normal View\IPE 240

Steel Profiles\DIN 1025/5\Normal View\IPE 270

Steel Profiles\DIN 1025/5\Normal View\IPE 300

Steel Profiles\DIN 1025/5\Normal View\IPE 330

Steel Profiles\DIN 1025/5\Normal View\IPE 360

Steel Profiles\DIN 1025/5\Normal View\IPE 400

Steel Profiles\DIN 1025/5\Normal View\IPE 450

Steel Profiles\DIN 1025/5\Normal View\IPE 500

Steel Profiles\DIN 1025/5\Normal View\IPE 550

Steel Profiles\DIN 1025/5\Normal View\IPE 600

Steel Profiles\DIN 1026\Side View\U 30x15

Steel Profiles\DIN 1026\Side View\U 30

Steel Profiles\DIN 1026\Side View\U 40x20

Steel Profiles\DIN 1026\Side View\U 40

Steel Profiles\DIN 1026\Side View\U 200

Steel Profiles\DIN 1026\Side View\U 220

Steel Profiles\DIN 1026\Side View\U 240

Steel Profiles\DIN 1026\Side View\U 260

Steel Profiles\DIN 1026\Side View\U 280

Steel Profiles\DIN 1026\Side View\U 300

Steel Profiles\DIN 1026\Side View\U 320

Steel Profiles\DIN 1026\Side View\U 350

Steel Profiles\DIN 1026\Side View\U 380

Steel Profiles\DIN 1026\Side View\U 400

Steel Profiles\DIN 1026\Normal View\U 30x15

Steel Profiles\DIN 1026\Normal View\U 30

Steel Profiles\DIN 1026\Normal View\U 40x20

Steel Profiles\DIN 1026\Normal View\U 40

Steel Profiles\DIN 1026\Normal View\U 50x25

Steel Profiles\DIN 1026\Normal View\U 50

Steel Profiles\DIN 1026\Normal View\U 60

Steel Profiles\DIN 1026\Normal View\U 65

Steel Profiles\DIN 1026\Normal View\U 80

Steel Profiles\DIN 1026\Normal View\U 100

Steel Profiles\DIN 1026\Normal View\U 120

Steel Profiles\DIN 1026\Normal View\U 140

Steel Profiles\DIN 1026\Normal View\U 160

Steel Profiles\DIN 1026\Normal View\U 180

Steel Profiles\DIN 1026\Normal View\U 200

Steel Profiles\DIN 1026\Normal View\U 220

Steel Profiles\DIN 1026\Normal View\U 240

Steel Profiles\DIN 1026\Normal View\U 260

Steel Profiles\DIN 1026\Normal View\U 280

Steel Profiles\DIN 1026\Normal View\U 300

Steel Profiles\DIN 1026\Normal View\U 320

Steel Profiles\DIN 1026\Normal View\U 350

Steel Profiles\DIN 1026\Normal View\U 380

Steel Profiles\DIN 1026\Normal View\U 400

Steel Profiles\DIN 1026\Plan View\U 30x15

Steel Profiles\DIN 1026\Plan View\U 30

Steel Profiles\DIN 1026\Plan View\U 40x20

Steel Profiles\DIN 1026\Plan View\U 40

Steel Profiles\DIN 1026\Plan View\U 50x25

Steel Profiles\DIN 1026\Plan View\U 50

Steel Profiles\DIN 1026\Plan View\U 60

Steel Profiles\DIN 1026\Plan View\U 65

Steel Profiles\DIN 1026\Plan View\U 80

Steel Profiles\DIN 1026\Plan View\U 100

Steel Profiles\DIN 1026\Plan View\U 120

Steel Profiles\DIN 1026\Plan View\U 140

Steel Profiles\DIN 1026\Plan View\U 160

Steel Profiles\DIN 1026\Plan View\U 180

Steel Profiles\DIN 1026\Plan View\U 200

Steel Profiles\DIN 1026\Plan View\U 220

Steel Profiles\DIN 1026\Plan View\U 240

Steel Profiles\DIN 1026\Plan View\U 260

Steel Profiles\DIN 1026\Plan View\U 280

Steel Profiles\DIN 1026\Plan View\U 300

Steel Profiles\DIN 1026\Plan View\U 320

Steel Profiles\DIN 1026\Plan View\U 350

Steel Profiles\DIN 1026\Plan View\U 380

Steel Profiles\DIN 1026\Plan View\U 400

Steel Profiles\DIN 1026\Side View\U 50x25

Steel Profiles\DIN 1026\Side View\U 50

Steel Profiles\DIN 1026\Side View\U 60

Steel Profiles\DIN 1026\Side View\U 65

Steel Profiles\DIN 1026\Side View\U 80

Steel Profiles\DIN 1026\Side View\U 100

Steel Profiles\DIN 1026\Side View\U 120

Steel Profiles\DIN 1026\Side View\U 140

Steel Profiles\DIN 1026\Side View\U 160

Steel Profiles\DIN 1026\Side View\U 180

Steel Profiles\DIN 1027\Side View\Z 30

Steel Profiles\DIN 1027\Side View\Z 40

Steel Profiles\DIN 1027\Side View\Z 50

Steel Profiles\DIN 1027\Side View\Z 60

Steel Profiles\DIN 1027\Side View\Z 80

Steel Profiles\DIN 1027\Side View\Z 100

Steel Profiles\DIN 1027\Side View\Z 120

Steel Profiles\DIN 1027\Side View\Z 140

Steel Profiles\DIN 1027\Side View\Z 160

Steel Profiles\DIN 1027\Side View\Z 180

Steel Profiles\DIN 1027\Side View\Z 200

Steel Profiles\DIN 1027\Normal View\Z 30

Steel Profiles\DIN 1027\Normal View\Z 40

Steel Profiles\DIN 1027\Normal View\Z 50

Steel Profiles\DIN 1027\Normal View\Z 60

Steel Profiles\DIN 1027\Normal View\Z 80

Steel Profiles\DIN 1027\Normal View\Z 100

Steel Profiles\DIN 1027\Normal View\Z 120

Steel Profiles\DIN 1027\Normal View\Z 140

Steel Profiles\DIN 1027\Normal View\Z 160

Steel Profiles\DIN 1027\Normal View\Z 180

Steel Profiles\DIN 1027\Normal View\Z 200

Steel Profiles\DIN 1027\Plan View\Z 30

Steel Profiles\DIN 1027\Plan View\Z 40

Steel Profiles\DIN 1027\Plan View\Z 50

Steel Profiles\DIN 1027\Plan View\Z 60

Steel Profiles\DIN 1027\Plan View\Z 80

Steel Profiles\DIN 1027\Plan View\Z 100

Steel Profiles\DIN 1027\Plan View\Z 120

Steel Profiles\DIN 1027\Plan View\Z 140

Steel Profiles\DIN 1027\Plan View\Z 160

Steel Profiles\DIN 1027\Plan View\Z 180

Steel Profiles\DIN 1027\Plan View\Z 200

Steel Profiles\DIN 1028\Side View\L 20x3

Steel Profiles\DIN 1028\Side View\L 25x3

Steel Profiles\DIN 1028\Side View\L 25x4

Steel Profiles\DIN 1028\Side View\L 30x3

Steel Profiles\DIN 1028\Side View\L 30x4

Steel Profiles\DIN 1028\Side View\L 35x4

Steel Profiles\DIN 1028\Side View\L 35x5

Steel Profiles\DIN 1028\Side View\L 40x4

Steel Profiles\DIN 1028\Side View\L 40x5

Steel Profiles\DIN 1028\Side View\L 45x4

Steel Profiles\DIN 1028\Side View\L 45x5

Steel Profiles\DIN 1028\Side View\L 50x5

Steel Profiles\DIN 1028\Side View\L 50x6

Steel Profiles\DIN 1028\Side View\L 50x7

Steel Profiles\DIN 1028\Side View\L 60x5

Steel Profiles\DIN 1028\Side View\L 60x6

Steel Profiles\DIN 1028\Side View\L 60x8

Steel Profiles\DIN 1028\Side View\L 65x7

Steel Profiles\DIN 1028\Side View\L 70x7

Steel Profiles\DIN 1028\Side View\L 70x9

Steel Profiles\DIN 1028\Side View\L 75x7

Steel Profiles\DIN 1028\Side View\L 75x8

Steel Profiles\DIN 1028\Side View\L 80x6

Steel Profiles\DIN 1028\Side View\L 80x8

Steel Profiles\DIN 1028\Side View\L 80x10

Steel Profiles\DIN 1028\Side View\L 90x7

Steel Profiles\DIN 1028\Side View\L 90x9

Steel Profiles\DIN 1028\Side View\L 100x8

Steel Profiles\DIN 1028\Side View\L 100x10

Steel Profiles\DIN 1028\Side View\L 100x12

Steel Profiles\DIN 1028\Side View\L 110x10

Steel Profiles\DIN 1028\Side View\L 120x10

Steel Profiles\DIN 1028\Side View\L 120x12

Steel Profiles\DIN 1028\Side View\L 130x12

Steel Profiles\DIN 1028\Side View\L 140x13

Steel Profiles\DIN 1028\Side View\L 150x12

Steel Profiles\DIN 1028\Side View\L 150x15

Steel Profiles\DIN 1028\Side View\L 160x15

Steel Profiles\DIN 1028\Side View\L 180x16

Steel Profiles\DIN 1028\Side View\L 180x18

Steel Profiles\DIN 1028\Side View\L 200x16

Steel Profiles\DIN 1028\Side View\L 200x20

Steel Profiles\DIN 1028\Side View\L 200x24

Steel Profiles\DIN 1028\Normal View\L 20x3

Steel Profiles\DIN 1028\Normal View\L 25x3

Steel Profiles\DIN 1028\Normal View\L 25x4

Steel Profiles\DIN 1028\Normal View\L 30x3

Steel Profiles\DIN 1028\Normal View\L 30x4

Steel Profiles\DIN 1028\Normal View\L 35x4

Steel Profiles\DIN 1028\Normal View\L 35x5

Steel Profiles\DIN 1028\Normal View\L 40x4

Steel Profiles\DIN 1028\Normal View\L 40x5

Steel Profiles\DIN 1028\Normal View\L 45x4

Steel Profiles\DIN 1028\Normal View\L 45x5

Steel Profiles\DIN 1028\Normal View\L 50x5

Steel Profiles\DIN 1028\Normal View\L 50x6

Steel Profiles\DIN 1028\Normal View\L 50x7

Steel Profiles\DIN 1028\Normal View\L 60x5

Steel Profiles\DIN 1028\Normal View\L 60x6

Steel Profiles\DIN 1028\Normal View\L 60x8

Steel Profiles\DIN 1028\Normal View\L 65x7

Steel Profiles\DIN 1028\Normal View\L 70x7

Steel Profiles\DIN 1028\Normal View\L 70x9

Steel Profiles\DIN 1028\Normal View\L 75x7

Steel Profiles\DIN 1028\Normal View\L 75x8

Steel Profiles\DIN 1028\Normal View\L 80x6

Steel Profiles\DIN 1028\Normal View\L 80x8

Steel Profiles\DIN 1028\Normal View\L 80x10

Steel Profiles\DIN 1028\Normal View\L 90x7

Steel Profiles\DIN 1028\Normal View\L 90x9

Steel Profiles\DIN 1028\Normal View\L 100x8

Steel Profiles\DIN 1028\Normal View\L 100x10

Steel Profiles\DIN 1028\Normal View\L 100x12

Steel Profiles\DIN 1028\Normal View\L 110x10

Steel Profiles\DIN 1028\Normal View\L 120x10

Steel Profiles\DIN 1028\Normal View\L 120x12

Steel Profiles\DIN 1028\Normal View\L 130x12

Steel Profiles\DIN 1028\Normal View\L 140x13

Steel Profiles\DIN 1028\Normal View\L 150x12

Steel Profiles\DIN 1028\Normal View\L 150x15

Steel Profiles\DIN 1028\Normal View\L 160x15

Steel Profiles\DIN 1028\Normal View\L 180x16

Steel Profiles\DIN 1028\Normal View\L 180x18

Steel Profiles\DIN 1028\Normal View\L 200x16

Steel Profiles\DIN 1028\Normal View\L 200x20

Steel Profiles\DIN 1028\Normal View\L 200x24

Steel Profiles\DIN 1028\Plan View\U 20x3

Steel Profiles\DIN 1028\Plan View\U 25x3

Steel Profiles\DIN 1028\Plan View\U 25x4

Steel Profiles\DIN 1028\Plan View\U 30x3

Steel Profiles\DIN 1028\Plan View\U 30x4

Steel Profiles\DIN 1028\Plan View\U 35x4

Steel Profiles\DIN 1028\Plan View\U 35x5

Steel Profiles\DIN 1028\Plan View\U 40x4

Steel Profiles\DIN 1028\Plan View\U 40x5

Steel Profiles\DIN 1028\Plan View\U 45x4

Steel Profiles\DIN 1028\Plan View\U 45x5

Steel Profiles\DIN 1028\Plan View\U 50x5

Steel Profiles\DIN 1028\Plan View\U 50x6

Steel Profiles\DIN 1028\Plan View\U 50x7

Steel Profiles\DIN 1028\Plan View\U 60x5

Steel Profiles\DIN 1028\Plan View\U 60x6

Steel Profiles\DIN 1028\Plan View\U 60x8

Steel Profiles\DIN 1028\Plan View\U 65x7

Steel Profiles\DIN 1028\Plan View\U 70x7

Steel Profiles\DIN 1028\Plan View\U 70x9

Steel Profiles\DIN 1028\Plan View\U 75x7

Steel Profiles\DIN 1028\Plan View\U 75x8

Steel Profiles\DIN 1028\Plan View\U 80x6

Steel Profiles\DIN 1028\Plan View\U 80x8

Steel Profiles\DIN 1028\Plan View\U 80x10

Steel Profiles\DIN 1028\Plan View\U 90x7

Steel Profiles\DIN 1028\Plan View\U 90x9

Steel Profiles\DIN 1028\Plan View\U 100x8

Steel Profiles\DIN 1028\Plan View\U 100x10

Steel Profiles\DIN 1028\Plan View\U 100x12

Steel Profiles\DIN 1028\Plan View\U 110x10

Steel Profiles\DIN 1028\Plan View\U 120x10

Steel Profiles\DIN 1028\Plan View\U 120x12

Steel Profiles\DIN 1028\Plan View\U 130x12

Steel Profiles\DIN 1028\Plan View\U 140x13

Steel Profiles\DIN 1028\Plan View\U 150x12

Steel Profiles\DIN 1028\Plan View\U 150x15

Steel Profiles\DIN 1028\Plan View\U 160x15

Steel Profiles\DIN 1028\Plan View\U 180x16

Steel Profiles\DIN 1028\Plan View\U 180x18

Steel Profiles\DIN 1028\Plan View\U 200x16

Steel Profiles\DIN 1028\Plan View\U 200x20

Steel Profiles\DIN 1028\Plan View\U 200x24

Steel Profiles\DIN 1029\Side View\L 30x20x3

Steel Profiles\DIN 1029\Side View\L 30x20x4

Steel Profiles\DIN 1029\Side View\L 40x20x3

Steel Profiles\DIN 1029\Side View\L 40x20x4

Steel Profiles\DIN 1029\Side View\L 45x30x4

Steel Profiles\DIN 1029\Side View\L 45x30x5

Steel Profiles\DIN 1029\Side View\L 50x30x4

Steel Profiles\DIN 1029\Side View\L 50x30x5

Steel Profiles\DIN 1029\Side View\L 50x40x5

Steel Profiles\DIN 1029\Side View\L 60x30x5

Steel Profiles\DIN 1029\Side View\L 60x40x5

Steel Profiles\DIN 1029\Side View\L 60x40x6

Steel Profiles\DIN 1029\Side View\L 65x50x5

Steel Profiles\DIN 1029\Side View\L 70x50x6

Steel Profiles\DIN 1029\Side View\L 75x50x7

Steel Profiles\DIN 1029\Side View\L 75x55x5

Steel Profiles\DIN 1029\Side View\L 75x55x7

Steel Profiles\DIN 1029\Side View\L 80x40x6

Steel Profiles\DIN 1029\Side View\L 80x40x8

Steel Profiles\DIN 1029\Side View\L 80x60x7

Steel Profiles\DIN 1029\Side View\L 80x65x8

Steel Profiles\DIN 1029\Side View\L 90x60x6

Steel Profiles\DIN 1029\Side View\L 90x60x8

Steel Profiles\DIN 1029\Side View\L 100x50x6

Steel Profiles\DIN 1029\Side View\L 100x50x8

Steel Profiles\DIN 1029\Side View\L 100x50x10

Steel Profiles\DIN 1029\Side View\L 100x65x7

Steel Profiles\DIN 1029\Side View\L 100x65x9

Steel Profiles\DIN 1029\Side View\L 100x75x9

Steel Profiles\DIN 1029\Side View\L 120x80x8

Steel Profiles\DIN 1029\Side View\L 120x80x10

Steel Profiles\DIN 1029\Side View\L 120x80x12

Steel Profiles\DIN 1029\Side View\L 130x65x8

Steel Profiles\DIN 1029\Side View\L 130x65x10

Steel Profiles\DIN 1029\Side View\L 150x75x9

Steel Profiles\DIN 1029\Side View\L 150x75x11

Steel Profiles\DIN 1029\Side View\L 150x100x10

Steel Profiles\DIN 1029\Side View\L 150x100x12

Steel Profiles\DIN 1029\Side View\L 180x90x10

Steel Profiles\DIN 1029\Side View\L 200x100x10

Steel Profiles\DIN 1029\Side View\L 200x100x12

Steel Profiles\DIN 1029\Side View\L 200x100x14

Steel Profiles\DIN 1029\Normal View\L 30x20x3

Steel Profiles\DIN 1029\Normal View\L 30x20x4

Steel Profiles\DIN 1029\Normal View\L 40x20x3

Steel Profiles\DIN 1029\Normal View\L 40x20x4

Steel Profiles\DIN 1029\Normal View\L 45x30x4

Steel Profiles\DIN 1029\Normal View\L 45x30x5

Steel Profiles\DIN 1029\Normal View\L 50x30x4

Steel Profiles\DIN 1029\Normal View\L 50x30x5

Steel Profiles\DIN 1029\Normal View\L 50x40x5

Steel Profiles\DIN 1029\Normal View\L 60x30x5

Steel Profiles\DIN 1029\Normal View\L 60x40x5

Steel Profiles\DIN 1029\Normal View\L 60x40x6

Steel Profiles\DIN 1029\Normal View\L 65x50x5

Steel Profiles\DIN 1029\Normal View\L 70x50x6

Steel Profiles\DIN 1029\Normal View\L 75x50x7

Steel Profiles\DIN 1029\Normal View\L 75x55x5

Steel Profiles\DIN 1029\Normal View\L 75x55x7

Steel Profiles\DIN 1029\Normal View\L 80x40x6

Steel Profiles\DIN 1029\Normal View\L 80x40x8

Steel Profiles\DIN 1029\Normal View\L 80x60x7

Steel Profiles\DIN 1029\Normal View\L 80x65x8

Steel Profiles\DIN 1029\Normal View\L 90x60x6

Steel Profiles\DIN 1029\Normal View\L 90x60x8

Steel Profiles\DIN 1029\Normal View\L 100x50x6

Steel Profiles\DIN 1029\Normal View\L 100x50x8

Steel Profiles\DIN 1029\Normal View\L 100x50x10

Steel Profiles\DIN 1029\Normal View\L 100x65x7

Steel Profiles\DIN 1029\Normal View\L 100x65x9

Steel Profiles\DIN 1029\Normal View\L 100x75x9

Steel Profiles\DIN 1029\Normal View\L 120x80x8

Steel Profiles\DIN 1029\Normal View\L 120x80x10

Steel Profiles\DIN 1029\Normal View\L 120x80x12

Steel Profiles\DIN 1029\Normal View\L 130x65x8

Steel Profiles\DIN 1029\Normal View\L 130x65x10

Steel Profiles\DIN 1029\Normal View\L 150x75x9

Steel Profiles\DIN 1029\Normal View\L 150x75x11

Steel Profiles\DIN 1029\Normal View\L 150x100x10

Steel Profiles\DIN 1029\Normal View\L 150x100x12

Steel Profiles\DIN 1029\Normal View\L 180x90x10

Steel Profiles\DIN 1029\Normal View\L 200x100x10

Steel Profiles\DIN 1029\Normal View\L 200x100x12

Steel Profiles\DIN 1029\Normal View\L 200x100x14

Steel Profiles\DIN 1029\Plan View\L 30x20x3

Steel Profiles\DIN 1029\Plan View\L 30x20x4

Steel Profiles\DIN 1029\Plan View\L 40x20x3

Steel Profiles\DIN 1029\Plan View\L 40x20x4

Steel Profiles\DIN 1029\Plan View\L 45x30x4

Steel Profiles\DIN 1029\Plan View\L 45x30x5

Steel Profiles\DIN 1029\Plan View\L 50x30x4

Steel Profiles\DIN 1029\Plan View\L 50x30x5

Steel Profiles\DIN 1029\Plan View\L 50x40x5

Steel Profiles\DIN 1029\Plan View\L 60x30x5

Steel Profiles\DIN 1029\Plan View\L 60x40x5

Steel Profiles\DIN 1029\Plan View\L 60x40x6

Steel Profiles\DIN 1029\Plan View\L 65x50x5

Steel Profiles\DIN 1029\Plan View\L 70x50x6

Steel Profiles\DIN 1029\Plan View\L 75x50x7

Steel Profiles\DIN 1029\Plan View\L 75x55x5

Steel Profiles\DIN 1029\Plan View\L 75x55x7

Steel Profiles\DIN 1029\Plan View\L 80x40x6

Steel Profiles\DIN 1029\Plan View\L 80x40x8

Steel Profiles\DIN 1029\Plan View\L 80x60x7

Steel Profiles\DIN 1029\Plan View\L 80x65x8

Steel Profiles\DIN 1029\Plan View\L 90x60x6

Steel Profiles\DIN 1029\Plan View\L 90x60x8

Steel Profiles\DIN 1029\Plan View\L 100x50x6

Steel Profiles\DIN 1029\Plan View\L 100x50x8

Steel Profiles\DIN 1029\Plan View\L 100x50x10

Steel Profiles\DIN 1029\Plan View\L 100x65x7

Steel Profiles\DIN 1029\Plan View\L 100x65x9

Steel Profiles\DIN 1029\Plan View\L 100x75x9

Steel Profiles\DIN 1029\Plan View\L 120x80x8

Steel Profiles\DIN 1029\Plan View\L 120x80x10

Steel Profiles\DIN 1029\Plan View\L 120x80x12

Steel Profiles\DIN 1029\Plan View\L 130x65x8

Steel Profiles\DIN 1029\Plan View\L 130x65x10

Steel Profiles\DIN 1029\Plan View\L 150x75x9

Steel Profiles\DIN 1029\Plan View\L 150x75x11

Steel Profiles\DIN 1029\Plan View\L 150x100x10

Steel Profiles\DIN 1029\Plan View\L 150x100x12

Steel Profiles\DIN 1029\Plan View\L 180x90x10

Steel Profiles\DIN 1029\Plan View\L 200x100x10

Steel Profiles\DIN 1029\Plan View\L 200x100x12

Steel Profiles\DIN 1029\Plan View\L 200x100x14

Alloy Profiles\DIN 1771\Side View shard-edged\L 10

Alloy Profiles\DIN 1771\Side View shard-edged\L 10x10x1.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 10x10x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 10x10x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 15x10x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 15x15x1.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 15x15x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 15x15x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 15x15x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x10x1.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x10x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x10x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x15x1.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x15x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x15x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x20x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x20x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 20x20x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x10x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x10x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x15x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x15x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x20x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x25x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x25x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 25x25x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x15x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x15x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x15x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x20x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x20x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x20x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x20x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x30x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x30x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x30x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 30x30x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 35x35x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 35x35x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 35x35x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 35x35x5

Alloy Profiles\DIN 1771\Side View rounded\L 10x10x1.5

Alloy Profiles\DIN 1771\Side View rounded\L 10x10x2

Alloy Profiles\DIN 1771\Side View rounded\L 10x10x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 15x10x2

Alloy Profiles\DIN 1771\Side View rounded\L 15x15x1.5

Alloy Profiles\DIN 1771\Side View rounded\L 15x15x2

Alloy Profiles\DIN 1771\Side View rounded\L 15x15x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 15x15x3

Alloy Profiles\DIN 1771\Side View rounded\L 20x10x1.5

Alloy Profiles\DIN 1771\Side View rounded\L 20x10x2

Alloy Profiles\DIN 1771\Side View rounded\L 20x10x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 20x15x1.5

Alloy Profiles\DIN 1771\Side View rounded\L 20x15x2

Alloy Profiles\DIN 1771\Side View rounded\L 20x15x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 20x20x2

Alloy Profiles\DIN 1771\Side View rounded\L 20x20x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 20x20x3

Alloy Profiles\DIN 1771\Side View rounded\L 25x10x2

Alloy Profiles\DIN 1771\Side View rounded\L 25x10x3

Alloy Profiles\DIN 1771\Side View rounded\L 25x15x2

Alloy Profiles\DIN 1771\Side View rounded\L 25x15x3

Alloy Profiles\DIN 1771\Side View rounded\L 25x20x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 25x25x2

Alloy Profiles\DIN 1771\Side View rounded\L 25x25x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 25x25x3

Alloy Profiles\DIN 1771\Side View rounded\L 30x15x2

Alloy Profiles\DIN 1771\Side View rounded\L 30x15x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 30x15x3

Alloy Profiles\DIN 1771\Side View rounded\L 30x20x2

Alloy Profiles\DIN 1771\Side View rounded\L 30x20x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 30x20x3

Alloy Profiles\DIN 1771\Side View rounded\L 30x20x4

Alloy Profiles\DIN 1771\Side View rounded\L 30x30x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 30x30x3

Alloy Profiles\DIN 1771\Side View rounded\L 30x30x4

Alloy Profiles\DIN 1771\Side View rounded\L 30x30x5

Alloy Profiles\DIN 1771\Side View rounded\L 35x35x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 35x35x3

Alloy Profiles\DIN 1771\Side View rounded\L 35x35x4

Alloy Profiles\DIN 1771\Side View rounded\L 35x35x5

Alloy Profiles\DIN 1771\Normal View\L 10x10x1.5

Alloy Profiles\DIN 1771\Normal View\L 10x10x2

Alloy Profiles\DIN 1771\Normal View\L 10x10x2.5

Alloy Profiles\DIN 1771\Normal View\L 15x10x2

Alloy Profiles\DIN 1771\Normal View\L 15x15x1.5

Alloy Profiles\DIN 1771\Normal View\L 15x15x2

Alloy Profiles\DIN 1771\Normal View\L 15x15x2.5

Alloy Profiles\DIN 1771\Normal View\L 15x15x3

Alloy Profiles\DIN 1771\Normal View\L 20x10x1.5

Alloy Profiles\DIN 1771\Normal View\L 20x10x2

Alloy Profiles\DIN 1771\Normal View\L 20x10x2.5

Alloy Profiles\DIN 1771\Normal View\L 20x15x1.5

Alloy Profiles\DIN 1771\Normal View\L 20x15x2

Alloy Profiles\DIN 1771\Normal View\L 20x15x2.5

Alloy Profiles\DIN 1771\Normal View\L 20x20x2

Alloy Profiles\DIN 1771\Normal View\L 20x20x2.5

Alloy Profiles\DIN 1771\Normal View\L 20x20x3

Alloy Profiles\DIN 1771\Normal View\L 25x10x2

Alloy Profiles\DIN 1771\Normal View\L 25x10x3

Alloy Profiles\DIN 1771\Normal View\L 25x15x2

Alloy Profiles\DIN 1771\Normal View\L 25x15x3

Alloy Profiles\DIN 1771\Normal View\L 25x20x2.5

Alloy Profiles\DIN 1771\Normal View\L 25x25x2

Alloy Profiles\DIN 1771\Normal View\L 25x25x2.5

Alloy Profiles\DIN 1771\Normal View\L 25x25x3

Alloy Profiles\DIN 1771\Normal View\L 30x15x2

Alloy Profiles\DIN 1771\Normal View\L 30x15x2.5

Alloy Profiles\DIN 1771\Normal View\L 30x15x3

Alloy Profiles\DIN 1771\Normal View\L 30x20x2

Alloy Profiles\DIN 1771\Normal View\L 30x20x2.5

Alloy Profiles\DIN 1771\Normal View\L 30x20x3

Alloy Profiles\DIN 1771\Normal View\L 30x20x4

Alloy Profiles\DIN 1771\Normal View\L 30x30x2.5

Alloy Profiles\DIN 1771\Normal View\L 30x30x3

Alloy Profiles\DIN 1771\Normal View\L 30x30x4

Alloy Profiles\DIN 1771\Normal View\L 30x30x5

Alloy Profiles\DIN 1771\Normal View\L 35x35x2.5

Alloy Profiles\DIN 1771\Normal View\L 35x35x3

Alloy Profiles\DIN 1771\Normal View\L 35x35x4

Alloy Profiles\DIN 1771\Normal View\L 35x35x5

Alloy Profiles\DIN 1771\Plan View\L 10x10x1.5

Alloy Profiles\DIN 1771\Plan View\L 10x10x2

Alloy Profiles\DIN 1771\Plan View\L 10x10x2.5

Alloy Profiles\DIN 1771\Plan View\L 15x10x2

Alloy Profiles\DIN 1771\Plan View\L 15x15x1.5

Alloy Profiles\DIN 1771\Plan View\L 15x15x2

Alloy Profiles\DIN 1771\Plan View\L 15x15x2.5

Alloy Profiles\DIN 1771\Plan View\L 15x15x3

Alloy Profiles\DIN 1771\Plan View\L 20x10x1.5

Alloy Profiles\DIN 1771\Plan View\L 20x10x2

Alloy Profiles\DIN 1771\Plan View\L 20x10x2.5

Alloy Profiles\DIN 1771\Plan View\L 20x15x1.5

Alloy Profiles\DIN 1771\Plan View\L 20x15x2

Alloy Profiles\DIN 1771\Plan View\L 20x15x2.5

Alloy Profiles\DIN 1771\Plan View\L 20x20x2

Alloy Profiles\DIN 1771\Plan View\L 20x20x2.5

Alloy Profiles\DIN 1771\Plan View\L 20x20x3

Alloy Profiles\DIN 1771\Plan View\L 25x10x2

Alloy Profiles\DIN 1771\Plan View\L 25x10x3

Alloy Profiles\DIN 1771\Plan View\L 25x15x2

Alloy Profiles\DIN 1771\Plan View\L 25x15x3

Alloy Profiles\DIN 1771\Plan View\L 25x20x2.5

Alloy Profiles\DIN 1771\Plan View\L 25x25x2

Alloy Profiles\DIN 1771\Plan View\L 25x25x2.5

Alloy Profiles\DIN 1771\Plan View\L 25x25x3

Alloy Profiles\DIN 1771\Plan View\L 30x15x2

Alloy Profiles\DIN 1771\Plan View\L 30x15x2.5

Alloy Profiles\DIN 1771\Plan View\L 30x15x3

Alloy Profiles\DIN 1771\Plan View\L 30x20x2

Alloy Profiles\DIN 1771\Plan View\L 30x20x2.5

Alloy Profiles\DIN 1771\Plan View\L 30x20x3

Alloy Profiles\DIN 1771\Plan View\L 30x20x4

Alloy Profiles\DIN 1771\Plan View\L 30x30x2.5

Alloy Profiles\DIN 1771\Plan View\L 30x30x3

Alloy Profiles\DIN 1771\Plan View\L 30x30x4

Alloy Profiles\DIN 1771\Plan View\L 30x30x5

Alloy Profiles\DIN 1771\Plan View\L 35x35x2.5

Alloy Profiles\DIN 1771\Plan View\L 35x35x3

Alloy Profiles\DIN 1771\Plan View\L 35x35x4

Alloy Profiles\DIN 1771\Plan View\L 35x35x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x20x2

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x20x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x20x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x20x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x25x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x25x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x25x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x30x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x40x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x40x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 40x40x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x25x2.5

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x25x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x25x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x30x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x30x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x30x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x50x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x50x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x50x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 50x50x6

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x30x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x30x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x30x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x40x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x40x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x40x6

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x60x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x60x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 60x60x6

Alloy Profiles\DIN 1771\Side View shard-edged\L 65x25x3

Alloy Profiles\DIN 1771\Side View shard-edged\L 65x50x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 65x50x6

Alloy Profiles\DIN 1771\Side View shard-edged\L 65x50x7

Alloy Profiles\DIN 1771\Side View shard-edged\L 80x40x4

Alloy Profiles\DIN 1771\Side View shard-edged\L 80x40x5

Alloy Profiles\DIN 1771\Side View shard-edged\L 80x40x6

Alloy Profiles\DIN 1771\Side View shard-edged\L 80x80x8

Alloy Profiles\DIN 1771\Side View shard-edged\L 80x80x10

Alloy Profiles\DIN 1771\Side View shard-edged\L 80x80x12

Alloy Profiles\DIN 1771\Side View rounded\L 40x20x2

Alloy Profiles\DIN 1771\Side View rounded\L 40x20x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 40x20x3

Alloy Profiles\DIN 1771\Side View rounded\L 40x20x4

Alloy Profiles\DIN 1771\Side View rounded\L 40x25x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 40x25x3

Alloy Profiles\DIN 1771\Side View rounded\L 40x25x4

Alloy Profiles\DIN 1771\Side View rounded\L 40x30x5

Alloy Profiles\DIN 1771\Side View rounded\L 40x40x3

Alloy Profiles\DIN 1771\Side View rounded\L 40x40x4

Alloy Profiles\DIN 1771\Side View rounded\L 40x40x5

Alloy Profiles\DIN 1771\Side View rounded\L 50x25x2.5

Alloy Profiles\DIN 1771\Side View rounded\L 50x25x3

Alloy Profiles\DIN 1771\Side View rounded\L 50x25x4

Alloy Profiles\DIN 1771\Side View rounded\L 50x30x3

Alloy Profiles\DIN 1771\Side View rounded\L 50x30x4

Alloy Profiles\DIN 1771\Side View rounded\L 50x30x5

Alloy Profiles\DIN 1771\Side View rounded\L 50x50x3

Alloy Profiles\DIN 1771\Side View rounded\L 50x50x4

Alloy Profiles\DIN 1771\Side View rounded\L 50x50x5

Alloy Profiles\DIN 1771\Side View rounded\L 50x50x6

Alloy Profiles\DIN 1771\Side View rounded\L 60x30x3

Alloy Profiles\DIN 1771\Side View rounded\L 60x30x4

Alloy Profiles\DIN 1771\Side View rounded\L 60x30x5

Alloy Profiles\DIN 1771\Side View rounded\L 60x40x4

Alloy Profiles\DIN 1771\Side View rounded\L 60x40x5

Alloy Profiles\DIN 1771\Side View rounded\L 60x40x6

Alloy Profiles\DIN 1771\Side View rounded\L 60x60x4

Alloy Profiles\DIN 1771\Side View rounded\L 60x60x5

Alloy Profiles\DIN 1771\Side View rounded\L 60x60x6

Alloy Profiles\DIN 1771\Side View rounded\L 60x25x3

Alloy Profiles\DIN 1771\Side View rounded\L 65x50x5

Alloy Profiles\DIN 1771\Side View rounded\L 65x50x6

Alloy Profiles\DIN 1771\Side View rounded\L 65x50x7

Alloy Profiles\DIN 1771\Side View rounded\L 80x40x4

Alloy Profiles\DIN 1771\Side View rounded\L 80x40x5

Alloy Profiles\DIN 1771\Side View rounded\L 80x40x6

Alloy Profiles\DIN 1771\Side View rounded\L 80x80x8

Alloy Profiles\DIN 1771\Side View rounded\L 80x80x10

Alloy Profiles\DIN 1771\Side View rounded\L 80x80x12

Alloy Profiles\DIN 1771\Normal View\L 40x20x2

Alloy Profiles\DIN 1771\Normal View\L 40x20x2.5

Alloy Profiles\DIN 1771\Normal View\L 40x20x3

Alloy Profiles\DIN 1771\Normal View\L 40x20x4

Alloy Profiles\DIN 1771\Normal View\L 40x25x2.5

Alloy Profiles\DIN 1771\Normal View\L 40x25x3

Alloy Profiles\DIN 1771\Normal View\L 40x25x4

Alloy Profiles\DIN 1771\Normal View\L 40x30x5

Alloy Profiles\DIN 1771\Normal View\L 40x40x3

Alloy Profiles\DIN 1771\Normal View\L 40x40x4

Alloy Profiles\DIN 1771\Normal View\L 40x40x5

Alloy Profiles\DIN 1771\Normal View\L 50x25x2.5

Alloy Profiles\DIN 1771\Normal View\L 50x25x3

Alloy Profiles\DIN 1771\Normal View\L 50x25x4

Alloy Profiles\DIN 1771\Normal View\L 50x30x3

Alloy Profiles\DIN 1771\Normal View\L 50x30x4

Alloy Profiles\DIN 1771\Normal View\L 50x30x5

Alloy Profiles\DIN 1771\Normal View\L 50x50x3

Alloy Profiles\DIN 1771\Normal View\L 50x50x4

Alloy Profiles\DIN 1771\Normal View\L 50x50x5

Alloy Profiles\DIN 1771\Normal View\L 50x50x6

Alloy Profiles\DIN 1771\Normal View\L 60x30x3

Alloy Profiles\DIN 1771\Normal View\L 60x30x4

Alloy Profiles\DIN 1771\Normal View\L 60x30x5

Alloy Profiles\DIN 1771\Normal View\L 60x40x4

Alloy Profiles\DIN 1771\Normal View\L 60x40x5

Alloy Profiles\DIN 1771\Normal View\L 60x40x6

Alloy Profiles\DIN 1771\Normal View\L 60x60x4

Alloy Profiles\DIN 1771\Normal View\L 60x60x5

Alloy Profiles\DIN 1771\Normal View\L 60x60x6

Alloy Profiles\DIN 1771\Normal View\L 65x25x3

Alloy Profiles\DIN 1771\Normal View\L 65x50x5

Alloy Profiles\DIN 1771\Normal View\L 65x50x6

Alloy Profiles\DIN 1771\Normal View\L 65x50x7

Alloy Profiles\DIN 1771\Normal View\L 80x40x4

Alloy Profiles\DIN 1771\Normal View\L 80x40x5

Alloy Profiles\DIN 1771\Normal View\L 80x40x6

Alloy Profiles\DIN 1771\Normal View\L 80x80x8

Alloy Profiles\DIN 1771\Normal View\L 80x80x10

Alloy Profiles\DIN 1771\Normal View\L 80x80x12

Alloy Profiles\DIN 1771\Plan View\L 40x20x2

Alloy Profiles\DIN 1771\Plan View\L 40x20x2.5

Alloy Profiles\DIN 1771\Plan View\L 40x20x3

Alloy Profiles\DIN 1771\Plan View\L 40x20x4

Alloy Profiles\DIN 1771\Plan View\L 40x25x2.5

Alloy Profiles\DIN 1771\Plan View\L 40x25x3

Alloy Profiles\DIN 1771\Plan View\L 40x25x4

Alloy Profiles\DIN 1771\Plan View\L 40x30x5

Alloy Profiles\DIN 1771\Plan View\L 40x40x3

Alloy Profiles\DIN 1771\Plan View\L 40x40x4

Alloy Profiles\DIN 1771\Plan View\L 40x40x5

Alloy Profiles\DIN 1771\Plan View\L 50x25x2.5

Alloy Profiles\DIN 1771\Plan View\L 50x25x3

Alloy Profiles\DIN 1771\Plan View\L 50x25x4

Alloy Profiles\DIN 1771\Plan View\L 50x30x3

Alloy Profiles\DIN 1771\Plan View\L 50x30x4

Alloy Profiles\DIN 1771\Plan View\L 50x30x5

Alloy Profiles\DIN 1771\Plan View\L 50x50x3

Alloy Profiles\DIN 1771\Plan View\L 50x50x4

Alloy Profiles\DIN 1771\Plan View\L 50x50x5

Alloy Profiles\DIN 1771\Plan View\L 50x50x6

Alloy Profiles\DIN 1771\Plan View\L 60x30x3

Alloy Profiles\DIN 1771\Plan View\L 60x30x4

Alloy Profiles\DIN 1771\Plan View\L 60x30x5

Alloy Profiles\DIN 1771\Plan View\L 60x40x4

Alloy Profiles\DIN 1771\Plan View\L 60x40x5

Alloy Profiles\DIN 1771\Plan View\L 60x40x6

Alloy Profiles\DIN 1771\Plan View\L 60x60x4

Alloy Profiles\DIN 1771\Plan View\L 60x60x5

Alloy Profiles\DIN 1771\Plan View\L 60x60x6

Alloy Profiles\DIN 1771\Plan View\L 65x25x3

Alloy Profiles\DIN 1771\Plan View\L 65x50x5

Alloy Profiles\DIN 1771\Plan View\L 65x50x6

Alloy Profiles\DIN 1771\Plan View\L 65x50x7

Alloy Profiles\DIN 1771\Plan View\L 80x40x4

Alloy Profiles\DIN 1771\Plan View\L 80x40x5

Alloy Profiles\DIN 1771\Plan View\L 80x40x6

Alloy Profiles\DIN 1771\Plan View\L 80x80x8

Alloy Profiles\DIN 1771\Plan View\L 80x80x10

Alloy Profiles\DIN 1771\Plan View\L 80x80x12

Alloy Profiles\DIN 9712\Side View shard-edged\I 40x40x3x3

Alloy Profiles\DIN 9712\Side View shard-edged\I 40x40x4x4

Alloy Profiles\DIN 9712\Side View shard-edged\I 45x45x3x3

Alloy Profiles\DIN 9712\Side View shard-edged\I 45x45x4x4

Alloy Profiles\DIN 9712\Side View shard-edged\I 45x45x4x5

Alloy Profiles\DIN 9712\Side View shard-edged\I 50x50x3x3

Alloy Profiles\DIN 9712\Side View shard-edged\I 50x50x4x4

Alloy Profiles\DIN 9712\Side View shard-edged\I 50x50x4x6

Alloy Profiles\DIN 9712\Side View shard-edged\I 60x50x3x3

Alloy Profiles\DIN 9712\Side View shard-edged\I 60x50x4x4

Alloy Profiles\DIN 9712\Side View shard-edged\I 60x60x4x4

Alloy Profiles\DIN 9712\Side View shard-edged\I 60x60x4x6

Alloy Profiles\DIN 9712\Side View shard-edged\I 80x42x4x6

Alloy Profiles\DIN 9712\Side View shard-edged\I 80x60x5x6

Alloy Profiles\DIN 9712\Side View shard-edged\I 100x50x5x7

Alloy Profiles\DIN 9712\Side View shard-edged\I 100x70x6x7

Alloy Profiles\DIN 9712\Side View shard-edged\I 120x58x5x8

Alloy Profiles\DIN 9712\Side View shard-edged\I 120x80x7x9

Alloy Profiles\DIN 9712\Side View shard-edged\I 140x66x6x9

Alloy Profiles\DIN 9712\Side View shard-edged\I 140x90x8x10

Alloy Profiles\DIN 9712\Side View shard-edged\I 160x74x7x10

Alloy Profiles\DIN 9712\Side View shard-edged\I 180x82x7x10

Alloy Profiles\DIN 9712\Side View shard-edged\I 200x90x8x11

Alloy Profiles\DIN 9712\Side View rounded\I 40x40x3x3

Alloy Profiles\DIN 9712\Side View rounded\I 40x40x4x4

Alloy Profiles\DIN 9712\Side View rounded\I 45x45x3x3

Alloy Profiles\DIN 9712\Side View rounded\I 45x45x4x4

Alloy Profiles\DIN 9712\Side View rounded\I 45x45x4x5

Alloy Profiles\DIN 9712\Side View rounded\I 50x50x3x3

Alloy Profiles\DIN 9712\Side View rounded\I 50x50x4x4

Alloy Profiles\DIN 9712\Side View rounded\I 50x50x4x6

Alloy Profiles\DIN 9712\Side View rounded\I 60x50x3x3

Alloy Profiles\DIN 9712\Side View rounded\I 60x50x4x4

Alloy Profiles\DIN 9712\Side View rounded\I 60x60x4x4

Alloy Profiles\DIN 9712\Side View rounded\I 60x60x4x6

Alloy Profiles\DIN 9712\Side View rounded\I 80x42x4x6

Alloy Profiles\DIN 9712\Side View rounded\I 80x60x5x6

Alloy Profiles\DIN 9712\Side View rounded\I 100x50x5x7

Alloy Profiles\DIN 9712\Side View rounded\I 100x70x6x7

Alloy Profiles\DIN 9712\Side View rounded\I 120x58x5x8

Alloy Profiles\DIN 9712\Side View rounded\I 120x80x7x9

Alloy Profiles\DIN 9712\Side View rounded\I 140x66x6x9

Alloy Profiles\DIN 9712\Side View rounded\I 140x90x8x10

Alloy Profiles\DIN 9712\Side View rounded\I 160x74x7x10

Alloy Profiles\DIN 9712\Side View rounded\I 180x82x7x10

Alloy Profiles\DIN 9712\Side View rounded\I 200x90x8x11

Alloy Profiles\DIN 9712\Normal View\I 40x40x3x3

Alloy Profiles\DIN 9712\Normal View\I 40x40x4x4

Alloy Profiles\DIN 9712\Normal View\I 45x45x3x3

Alloy Profiles\DIN 9712\Normal View\I 45x45x4x4

Alloy Profiles\DIN 9712\Normal View\I 45x45x4x5

Alloy Profiles\DIN 9712\Normal View\I 50x50x3x3

Alloy Profiles\DIN 9712\Normal View\I 50x50x4x4

Alloy Profiles\DIN 9712\Normal View\I 50x50x4x6

Alloy Profiles\DIN 9712\Normal View\I 60x50x3x3

Alloy Profiles\DIN 9712\Normal View\I 60x50x4x4

Alloy Profiles\DIN 9712\Normal View\I 60x60x4x4

Alloy Profiles\DIN 9712\Normal View\I 60x60x4x6

Alloy Profiles\DIN 9712\Normal View\I 80x42x4x6

Alloy Profiles\DIN 9712\Normal View\I 80x60x5x6

Alloy Profiles\DIN 9712\Normal View\I 100x50x5x7

Alloy Profiles\DIN 9712\Normal View\I 100x70x6x7

Alloy Profiles\DIN 9712\Normal View\I 120x58x5x8

Alloy Profiles\DIN 9712\Normal View\I 120x80x7x9

Alloy Profiles\DIN 9712\Normal View\I 140x66x6x9

Alloy Profiles\DIN 9712\Normal View\I 140x90x8x10

Alloy Profiles\DIN 9712\Normal View\I 160x74x7x10

Alloy Profiles\DIN 9712\Normal View\I 180x82x7x10

Alloy Profiles\DIN 9712\Normal View\I 200x90x8x11

Alloy Profiles\DIN 9712\Plan View\I 40x40x3x3

Alloy Profiles\DIN 9712\Plan View\I 40x40x4x4

Alloy Profiles\DIN 9712\Plan View\I 45x45x3x3

Alloy Profiles\DIN 9712\Plan View\I 45x45x4x4

Alloy Profiles\DIN 9712\Plan View\I 45x45x4x5

Alloy Profiles\DIN 9712\Plan View\I 50x50x3x3

Alloy Profiles\DIN 9712\Plan View\I 50x50x4x4

Alloy Profiles\DIN 9712\Plan View\I 50x50x4x6

Alloy Profiles\DIN 9712\Plan View\I 60x50x3x3

Alloy Profiles\DIN 9712\Plan View\I 60x50x4x4

Alloy Profiles\DIN 9712\Plan View\I 60x60x4x4

Alloy Profiles\DIN 9712\Plan View\I 60x60x4x6

Alloy Profiles\DIN 9712\Plan View\I 80x42x4x6

Alloy Profiles\DIN 9712\Plan View\I 80x60x5x6

Alloy Profiles\DIN 9712\Plan View\I 100x50x5x7

Alloy Profiles\DIN 9712\Plan View\I 100x70x6x7

Alloy Profiles\DIN 9712\Plan View\I 120x58x5x8

Alloy Profiles\DIN 9712\Plan View\I 120x80x7x9

Alloy Profiles\DIN 9712\Plan View\I 140x66x6x9

Alloy Profiles\DIN 9712\Plan View\I 140x90x8x10

Alloy Profiles\DIN 9712\Plan View\I 160x74x7x10

Alloy Profiles\DIN 9712\Plan View\I 180x82x7x10

Alloy Profiles\DIN 9712\Plan View\I 200x90x8x11

Alloy Profiles\DIN 9713\Side View shard-edged\U 20x20x3x3

Alloy Profiles\DIN 9713\Side View shard-edged\U 30x30x3x3

Alloy Profiles\DIN 9713\Side View shard-edged\U 35x20x2x2

Alloy Profiles\DIN 9713\Side View shard-edged\U 35x35x3x3

Alloy Profiles\DIN 9713\Side View shard-edged\U 40x15x3x3

Alloy Profiles\DIN 9713\Side View shard-edged\U 40x20x2x2

Alloy Profiles\DIN 9713\Side View shard-edged\U 40x20x3x3

Alloy Profiles\DIN 9713\Side View shard-edged\U 40x30x3x3

Alloy Profiles\DIN 9713\Side View shard-edged\U 40x30x4x4

Alloy Profiles\DIN 9713\Side View shard-edged\U 40x40x4x4

Alloy Profiles\DIN 9713\Side View shard-edged\U 40x40x5x5

Alloy Profiles\DIN 9713\Side View shard-edged\U 50x20x2.5

Alloy Profiles\DIN 9713\Side View shard-edged\U 50x30x3x3

Alloy Profiles\DIN 9713\Side View shard-edged\U 50x30x4x4

Alloy Profiles\DIN 9713\Side View shard-edged\U 50x40x4x4

Alloy Profiles\DIN 9713\Side View shard-edged\U 50x40x5x5

Alloy Profiles\DIN 9713\Side View shard-edged\U 60x30x4x4

Alloy Profiles\DIN 9713\Side View shard-edged\U 60x30x5x5

Alloy Profiles\DIN 9713\Side View shard-edged\U 60x40x4x4

Alloy Profiles\DIN 9713\Side View shard-edged\U 60x40x5x5

Alloy Profiles\DIN 9713\Side View shard-edged\U 80x40x6x6

Alloy Profiles\DIN 9713\Side View shard-edged\U 80x45x6x8

Alloy Profiles\DIN 9713\Side View shard-edged\U 100x40x6x6

Alloy Profiles\DIN 9713\Side View shard-edged\U 100x50x6x9

Alloy Profiles\DIN 9713\Side View shard-edged\U 120x55x7x9

Alloy Profiles\DIN 9713\Side View shard-edged\U 140x60x4x6

Alloy Profiles\DIN 9713\Side View shard-edged\U 140x60x7x10

Alloy Profiles\DIN 9713\Side View rounded\U 20x20x3x3

Alloy Profiles\DIN 9713\Side View rounded\U 30x30x3x3

Alloy Profiles\DIN 9713\Side View rounded\U 35x20x2x2

Alloy Profiles\DIN 9713\Side View rounded\U 35x35x3x3

Alloy Profiles\DIN 9713\Side View rounded\U 40x15x3x3

Alloy Profiles\DIN 9713\Side View rounded\U 40x20x2x2

Alloy Profiles\DIN 9713\Side View rounded\U 40x20x3x3

Alloy Profiles\DIN 9713\Side View rounded\U 40x30x3x3

Alloy Profiles\DIN 9713\Side View rounded\U 40x30x4x4

Alloy Profiles\DIN 9713\Side View rounded\U 40x40x4x4

Alloy Profiles\DIN 9713\Side View rounded\U 40x40x5x5

Alloy Profiles\DIN 9713\Side View rounded\U 50x20x2.5

Alloy Profiles\DIN 9713\Side View rounded\U 50x30x3x3

Alloy Profiles\DIN 9713\Side View rounded\U 50x30x4x4

Alloy Profiles\DIN 9713\Side View rounded\U 50x40x4x4

Alloy Profiles\DIN 9713\Side View rounded\U 50x40x5x5

Alloy Profiles\DIN 9713\Side View rounded\U 60x30x4x4

Alloy Profiles\DIN 9713\Side View rounded\U 60x30x5x5

Alloy Profiles\DIN 9713\Side View rounded\U 60x40x4x4

Alloy Profiles\DIN 9713\Side View rounded\U 60x40x5x5

Alloy Profiles\DIN 9713\Side View rounded\U 80x40x6x6

Alloy Profiles\DIN 9713\Side View rounded\U 80x45x6x8

Alloy Profiles\DIN 9713\Side View rounded\U 100x40x6x6

Alloy Profiles\DIN 9713\Side View rounded\U 100x50x6x9

Alloy Profiles\DIN 9713\Side View rounded\U 120x55x7x9

Alloy Profiles\DIN 9713\Side View rounded\U 140x60x4x6

Alloy Profiles\DIN 9713\Side View rounded\U 140x60x7x10

Alloy Profiles\DIN 9713\Normal View\U 20x20x3x3

Alloy Profiles\DIN 9713\Normal View\U 30x30x3x3

Alloy Profiles\DIN 9713\Normal View\U 35x20x2x2

Alloy Profiles\DIN 9713\Normal View\U 35x35x3x3

Alloy Profiles\DIN 9713\Normal View\U 40x15x3x3

Alloy Profiles\DIN 9713\Normal View\U 40x20x2x2

Alloy Profiles\DIN 9713\Normal View\U 40x20x3x3

Alloy Profiles\DIN 9713\Normal View\U 40x30x3x3

Alloy Profiles\DIN 9713\Normal View\U 40x30x4x4

Alloy Profiles\DIN 9713\Normal View\U 40x40x4x4

Alloy Profiles\DIN 9713\Normal View\U 40x40x5x5

Alloy Profiles\DIN 9713\Normal View\U 50x20x2.5

Alloy Profiles\DIN 9713\Normal View\U 50x30x3x3

Alloy Profiles\DIN 9713\Normal View\U 50x30x4x4

Alloy Profiles\DIN 9713\Normal View\U 50x40x4x4

Alloy Profiles\DIN 9713\Normal View\U 50x40x5x5

Alloy Profiles\DIN 9713\Normal View\U 60x30x4x4

Alloy Profiles\DIN 9713\Normal View\U 60x30x5x5

Alloy Profiles\DIN 9713\Normal View\U 60x40x4x4

Alloy Profiles\DIN 9713\Normal View\U 60x40x5x5

Alloy Profiles\DIN 9713\Normal View\U 80x40x6x6

Alloy Profiles\DIN 9713\Normal View\U 80x45x6x8

Alloy Profiles\DIN 9713\Normal View\U 100x40x6x6

Alloy Profiles\DIN 9713\Normal View\U 100x50x6x9

Alloy Profiles\DIN 9713\Normal View\U 120x55x7x9

Alloy Profiles\DIN 9713\Normal View\U 140x60x4x6

Alloy Profiles\DIN 9713\Normal View\U 140x60x7x10

Alloy Profiles\DIN 9713\Plan View\U 20x20x3x3

Alloy Profiles\DIN 9713\Plan View\U 30x30x3x3

Alloy Profiles\DIN 9713\Plan View\U 35x20x2x2

Alloy Profiles\DIN 9713\Plan View\U 35x35x3x3

Alloy Profiles\DIN 9713\Plan View\U 40x15x3x3

Alloy Profiles\DIN 9713\Plan View\U 40x20x2x2

Alloy Profiles\DIN 9713\Plan View\U 40x20x3x3

Alloy Profiles\DIN 9713\Plan View\U 40x30x3x3

Alloy Profiles\DIN 9713\Plan View\U 40x30x4x4

Alloy Profiles\DIN 9713\Plan View\U 40x40x4x4

Alloy Profiles\DIN 9713\Plan View\U 40x40x5x5

Alloy Profiles\DIN 9713\Plan View\U 50x20x2.5

Alloy Profiles\DIN 9713\Plan View\U 50x30x3x3

Alloy Profiles\DIN 9713\Plan View\U 50x30x4x4

Alloy Profiles\DIN 9713\Plan View\U 50x40x4x4

Alloy Profiles\DIN 9713\Plan View\U 50x40x5x5

Alloy Profiles\DIN 9713\Plan View\U 60x30x4x4

Alloy Profiles\DIN 9713\Plan View\U 60x30x5x5

Alloy Profiles\DIN 9713\Plan View\U 60x40x4x4

Alloy Profiles\DIN 9713\Plan View\U 60x40x5x5

Alloy Profiles\DIN 9713\Plan View\U 80x40x6x6

Alloy Profiles\DIN 9713\Plan View\U 80x45x6x8

Alloy Profiles\DIN 9713\Plan View\U 100x40x6x6

Alloy Profiles\DIN 9713\Plan View\U 100x50x6x9

Alloy Profiles\DIN 9713\Plan View\U 120x55x7x9

Alloy Profiles\DIN 9713\Plan View\U 140x60x4x6

Alloy Profiles\DIN 9713\Plan View\U 140x60x7x10

Alloy Profiles\DIN 9714\Side View shard-edged\T 15x15x2

Alloy Profiles\DIN 9714\Side View shard-edged\T 20x20x2

Alloy Profiles\DIN 9714\Side View shard-edged\T 20x30x2

Alloy Profiles\DIN 9714\Side View shard-edged\T 20x30x2.5

Alloy Profiles\DIN 9714\Side View shard-edged\T 20x30x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 25x25x2.5

Alloy Profiles\DIN 9714\Side View shard-edged\T 25x40x2

Alloy Profiles\DIN 9714\Side View shard-edged\T 25x40x2.5

Alloy Profiles\DIN 9714\Side View shard-edged\T 25x40x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x30x2

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x30x2.5

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x30x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x30x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x45x2.5

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x45x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x45x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x60x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 30x60x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 35x35x2.5

Alloy Profiles\DIN 9714\Side View shard-edged\T 35x35x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 35x35x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 35x50x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 35x50x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 35x50x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 40x40x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 40x40x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 40x40x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 40x60x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 40x60x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 40x80x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 40x80x7

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x50x3

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x50x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x50x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x50x6

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x70x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x70x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x70x6

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x100x7

Alloy Profiles\DIN 9714\Side View shard-edged\T 50x100x9

Alloy Profiles\DIN 9714\Side View shard-edged\T 60x60x4

Alloy Profiles\DIN 9714\Side View shard-edged\T 60x60x5

Alloy Profiles\DIN 9714\Side View shard-edged\T 60x60x6

Alloy Profiles\DIN 9714\Side View shard-edged\T 60x60x7

Alloy Profiles\DIN 9714\Side View shard-edged\T 60x120x8

Alloy Profiles\DIN 9714\Side View shard-edged\T 60x120x10

Alloy Profiles\DIN 9714\Side View shard-edged\T 70x70x6

Alloy Profiles\DIN 9714\Side View shard-edged\T 70x70x8

Alloy Profiles\DIN 9714\Side View shard-edged\T 70x140x10

Alloy Profiles\DIN 9714\Side View shard-edged\T 70x140x12

Alloy Profiles\DIN 9714\Side View shard-edged\T 80x80x7

Alloy Profiles\DIN 9714\Side View shard-edged\T 80x80x9

Alloy Profiles\DIN 9714\Side View rounded\T 15x15x2

Alloy Profiles\DIN 9714\Side View rounded\T 20x20x2

Alloy Profiles\DIN 9714\Side View rounded\T 20x30x2

Alloy Profiles\DIN 9714\Side View rounded\T 20x30x2.5

Alloy Profiles\DIN 9714\Side View rounded\T 20x30x3

Alloy Profiles\DIN 9714\Side View rounded\T 25x25x2.5

Alloy Profiles\DIN 9714\Side View rounded\T 25x40x2

Alloy Profiles\DIN 9714\Side View rounded\T 25x40x2.5

Alloy Profiles\DIN 9714\Side View rounded\T 25x40x3

Alloy Profiles\DIN 9714\Side View rounded\T 30x30x2

Alloy Profiles\DIN 9714\Side View rounded\T 30x30x2.5

Alloy Profiles\DIN 9714\Side View rounded\T 30x30x3

Alloy Profiles\DIN 9714\Side View rounded\T 30x30x4

Alloy Profiles\DIN 9714\Side View rounded\T 30x45x2.5

Alloy Profiles\DIN 9714\Side View rounded\T 30x45x3

Alloy Profiles\DIN 9714\Side View rounded\T 30x45x4

Alloy Profiles\DIN 9714\Side View rounded\T 30x60x3

Alloy Profiles\DIN 9714\Side View rounded\T 30x60x5

Alloy Profiles\DIN 9714\Side View rounded\T 35x35x2.5

Alloy Profiles\DIN 9714\Side View rounded\T 35x35x3

Alloy Profiles\DIN 9714\Side View rounded\T 35x35x4

Alloy Profiles\DIN 9714\Side View rounded\T 35x50x3

Alloy Profiles\DIN 9714\Side View rounded\T 35x50x4

Alloy Profiles\DIN 9714\Side View rounded\T 35x50x5

Alloy Profiles\DIN 9714\Side View rounded\T 40x40x3

Alloy Profiles\DIN 9714\Side View rounded\T 40x40x4

Alloy Profiles\DIN 9714\Side View rounded\T 40x40x5

Alloy Profiles\DIN 9714\Side View rounded\T 40x60x4

Alloy Profiles\DIN 9714\Side View rounded\T 40x60x5

Alloy Profiles\DIN 9714\Side View rounded\T 40x80x5

Alloy Profiles\DIN 9714\Side View rounded\T 40x80x7

Alloy Profiles\DIN 9714\Side View rounded\T 50x50x3

Alloy Profiles\DIN 9714\Side View rounded\T 50x50x4

Alloy Profiles\DIN 9714\Side View rounded\T 50x50x5

Alloy Profiles\DIN 9714\Side View rounded\T 50x50x6

Alloy Profiles\DIN 9714\Side View rounded\T 50x70x4

Alloy Profiles\DIN 9714\Side View rounded\T 50x70x5

Alloy Profiles\DIN 9714\Side View rounded\T 50x70x6

Alloy Profiles\DIN 9714\Side View rounded\T 50x100x7

Alloy Profiles\DIN 9714\Side View rounded\T 50x100x9

Alloy Profiles\DIN 9714\Side View rounded\T 60x60x4

Alloy Profiles\DIN 9714\Side View rounded\T 60x60x5

Alloy Profiles\DIN 9714\Side View rounded\T 60x60x6

Alloy Profiles\DIN 9714\Side View rounded\T 60x60x7

Alloy Profiles\DIN 9714\Side View rounded\T 60x120x8

Alloy Profiles\DIN 9714\Side View rounded\T 60x120x10

Alloy Profiles\DIN 9714\Side View rounded\T 70x70x6

Alloy Profiles\DIN 9714\Side View rounded\T 70x70x8

Alloy Profiles\DIN 9714\Side View rounded\T 70x140x8

Alloy Profiles\DIN 9714\Side View rounded\T 70x140x10

Alloy Profiles\DIN 9714\Side View rounded\T 80x80x7

Alloy Profiles\DIN 9714\Side View rounded\T 80x80x9

Alloy Profiles\DIN 9714\Normal View\T 15x15x2

Alloy Profiles\DIN 9714\Normal View\T 20x20x2

Alloy Profiles\DIN 9714\Normal View\T 20x30x2

Alloy Profiles\DIN 9714\Normal View\T 20x30x2.5

Alloy Profiles\DIN 9714\Normal View\T 20x30x3

Alloy Profiles\DIN 9714\Normal View\T 25x25x2.5

Alloy Profiles\DIN 9714\Normal View\T 25x40x2

Alloy Profiles\DIN 9714\Normal View\T 25x40x2.5

Alloy Profiles\DIN 9714\Normal View\T 25x40x3

Alloy Profiles\DIN 9714\Normal View\T 30x30x2

Alloy Profiles\DIN 9714\Normal View\T 30x30x2.5

Alloy Profiles\DIN 9714\Normal View\T 30x30x3

Alloy Profiles\DIN 9714\Normal View\T 30x30x4

Alloy Profiles\DIN 9714\Normal View\T 30x45x2.5

Alloy Profiles\DIN 9714\Normal View\T 30x45x3

Alloy Profiles\DIN 9714\Normal View\T 30x45x4

Alloy Profiles\DIN 9714\Normal View\T 30x60x3

Alloy Profiles\DIN 9714\Normal View\T 30x60x5

Alloy Profiles\DIN 9714\Normal View\T 35x35x2.5

Alloy Profiles\DIN 9714\Normal View\T 35x35x3

Alloy Profiles\DIN 9714\Normal View\T 35x35x4

Alloy Profiles\DIN 9714\Normal View\T 35x50x3

Alloy Profiles\DIN 9714\Normal View\T 35x50x4

Alloy Profiles\DIN 9714\Normal View\T 35x50x5

Alloy Profiles\DIN 9714\Normal View\T 40x40x3

Alloy Profiles\DIN 9714\Normal View\T 40x40x4

Alloy Profiles\DIN 9714\Normal View\T 40x40x5

Alloy Profiles\DIN 9714\Normal View\T 40x60x4

Alloy Profiles\DIN 9714\Normal View\T 40x60x5

Alloy Profiles\DIN 9714\Normal View\T 40x80x5

Alloy Profiles\DIN 9714\Normal View\T 40x80x7

Alloy Profiles\DIN 9714\Normal View\T 50x50x3

Alloy Profiles\DIN 9714\Normal View\T 50x50x4

Alloy Profiles\DIN 9714\Normal View\T 50x50x5

Alloy Profiles\DIN 9714\Normal View\T 50x50x6

Alloy Profiles\DIN 9714\Normal View\T 50x70x4

Alloy Profiles\DIN 9714\Normal View\T 50x70x5

Alloy Profiles\DIN 9714\Normal View\T 50x70x6

Alloy Profiles\DIN 9714\Normal View\T 50x100x7

Alloy Profiles\DIN 9714\Normal View\T 50x100x9

Alloy Profiles\DIN 9714\Normal View\T 60x60x4

Alloy Profiles\DIN 9714\Normal View\T 60x60x5

Alloy Profiles\DIN 9714\Normal View\T 60x60x6

Alloy Profiles\DIN 9714\Normal View\T 60x60x7

Alloy Profiles\DIN 9714\Normal View\T 60x120x8

Alloy Profiles\DIN 9714\Normal View\T 60x120x10

Alloy Profiles\DIN 9714\Normal View\T 70x70x6

Alloy Profiles\DIN 9714\Normal View\T 70x70x8

Alloy Profiles\DIN 9714\Normal View\T 70x140x10

Alloy Profiles\DIN 9714\Normal View\T 70x140x12

Alloy Profiles\DIN 9714\Normal View\T 80x80x7

Alloy Profiles\DIN 9714\Normal View\T 80x80x9

Alloy Profiles\DIN 9714\Plan View\T 15x15x2

Alloy Profiles\DIN 9714\Plan View\T 20x20x2

Alloy Profiles\DIN 9714\Plan View\T 20x30x2

Alloy Profiles\DIN 9714\Plan View\T 20x30x2.5

Alloy Profiles\DIN 9714\Plan View\T 20x30x3

Alloy Profiles\DIN 9714\Plan View\T 25x25x2.5

Alloy Profiles\DIN 9714\Plan View\T 25x40x2

Alloy Profiles\DIN 9714\Plan View\T 25x40x2.5

Alloy Profiles\DIN 9714\Plan View\T 25x40x3

Alloy Profiles\DIN 9714\Plan View\T 30x30x2

Alloy Profiles\DIN 9714\Plan View\T 30x30x2.5

Alloy Profiles\DIN 9714\Plan View\T 30x30x3

Alloy Profiles\DIN 9714\Plan View\T 30x30x4

Alloy Profiles\DIN 9714\Plan View\T 30x45x2.5

Alloy Profiles\DIN 9714\Plan View\T 30x45x3

Alloy Profiles\DIN 9714\Plan View\T 30x45x4

Alloy Profiles\DIN 9714\Plan View\T 30x60x3

Alloy Profiles\DIN 9714\Plan View\T 30x60x5

Alloy Profiles\DIN 9714\Plan View\T 35x35x2.5

Alloy Profiles\DIN 9714\Plan View\T 35x35x3

Alloy Profiles\DIN 9714\Plan View\T 35x35x4

Alloy Profiles\DIN 9714\Plan View\T 35x50x3

Alloy Profiles\DIN 9714\Plan View\T 35x50x4

Alloy Profiles\DIN 9714\Plan View\T 35x50x5

Alloy Profiles\DIN 9714\Plan View\T 40x40x3

Alloy Profiles\DIN 9714\Plan View\T 40x40x4

Alloy Profiles\DIN 9714\Plan View\T 40x40x5

Alloy Profiles\DIN 9714\Plan View\T 40x60x4

Alloy Profiles\DIN 9714\Plan View\T 40x60x5

Alloy Profiles\DIN 9714\Plan View\T 40x80x5

Alloy Profiles\DIN 9714\Plan View\T 40x80x7

Alloy Profiles\DIN 9714\Plan View\T 50x50x3

Alloy Profiles\DIN 9714\Plan View\T 50x50x4

Alloy Profiles\DIN 9714\Plan View\T 50x50x5

Alloy Profiles\DIN 9714\Plan View\T 50x50x6

Alloy Profiles\DIN 9714\Plan View\T 50x70x4

Alloy Profiles\DIN 9714\Plan View\T 50x70x5

Alloy Profiles\DIN 9714\Plan View\T 50x70x6

Alloy Profiles\DIN 9714\Plan View\T 50x100x7

Alloy Profiles\DIN 9714\Plan View\T 50x100x9

Alloy Profiles\DIN 9714\Plan View\T 60x60x4

Alloy Profiles\DIN 9714\Plan View\T 60x60x5

Alloy Profiles\DIN 9714\Plan View\T 60x60x6

Alloy Profiles\DIN 9714\Plan View\T 60x60x7

Alloy Profiles\DIN 9714\Plan View\T 60x120x8

Alloy Profiles\DIN 9714\Plan View\T 60x120x10

Alloy Profiles\DIN 9714\Plan View\T 70x70x6

Alloy Profiles\DIN 9714\Plan View\T 70x70x8

Alloy Profiles\DIN 9714\Plan View\T 70x140x10

Alloy Profiles\DIN 9714\Plan View\T 70x140x12

Alloy Profiles\DIN 9714\Plan View\T 80x80x7

Alloy Profiles\DIN 9714\Plan View\T 80x80x9

(1536 symbols)