InS_StArT
LPCAT.COM
1.0
^MELCO LPC-AT,LPCAT.COM,IE0
?Please select the options that match your board's settings.
!RIE0(INT)Hardware Interrupt(IRQ)
@3
4
5
9
10
11
12
15
!RIE0(PORT)Base I/O Port
220
240
280
2A0
2C0
@300
320
340
*RIE0(FRAME)Media Frame Type(s)
?NOTE: Ethernet_802.2 is now the default frame type for ODI Drivers. Existing LANs may be using Ethernet_802.3.
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP
InS_EnD
