このシステムはあなたの作業環境に合わせて、AC電源またはバッテリー電源に自由に切り替えることができます。ACアダプタを接続したり、外したりすると、システムは自動的にバッテリーモードからACモード（またはその逆）に切り替わります。

電源モードはFn+F11キーを押すと、フルパワー設定、最省電力設定、カスタマイズに切り替えられます。


このボックスをクリックすると、AC電源またはバッテリー電源の設定を表示または変更できます。


このモードではシステムのパフォーマンスが最高になります。このモードはAC電源操作が適しています。バッテリー操作時にこのモードを選択すると、バッテリー電源が大量に消費されます。


このモードではシステムの性能を維持したまま、パワーマネージメント状態に入ります。このモードを選択するとバッテリーの寿命を長く保つことができますので、バッテリー操作に適しています。


AC操作かバッテリー操作を細かく設定したい場合は、このモードを選択してください。


システムがアイドル状態に入ってからサスペンドモードに移行するまでの時間を0（無効）から60分の間で指定してください。


システムがアイドル状態に入ってからLCDモニターと外付けモニターがオフにされるまでの時間を0（無効）から60分の間で指定してください。


ハードディスクに最後にアクセスしてからハードディスクが停止するまで（スピンダウン）の時間を0（無効）から20分の間で指定してください。


プロセッサのクロックレートを指定してください。

a) 最大	1/1(100%)クロック周波数

b) 最小	1/2(50%)クロック周波数

c) 低速	1/4(25%)クロック周波数


このオプションを選択すると、キーを押すかハードディスクへアクセスしたとき、プロセッサが一定時間、最高速度で稼動します。このモードはバッテリーでシステムを稼動しているときのワープロ操作などに適しています。


CD-ROMの操作モードを指定してください。

高速	CD-ROMドライブは最高速度の性能最適化モードで稼動します。

通常	通常の状態（標準値）

停止	CD-ROMドライブから聞こえるノイズを縮小するにはこのモードを選択してください。このモードを選択するとCD-ROMドライブは最高速度では稼動されませんので、処理能力は遅くなります。

この設定はすべてのパワーマネージメントモードに対して共通です。


このシステムではあなたの作業環境に応じて、サスペンドオプションとレジューム時間オプションを設定することができます。


各サスペンドオプションを表示します。


このオプションはLCDモニターを閉じた状態でシステムを起動したいときに選択してください。


a) システムをドッキングステーションにつないでいるときにこのオプションを有効にすると、F+F4キーを押すとサスペンドモードに、Fn+F12キーを押すとハイバネーションモードに入ります。システムがサスペンドモードまたはハイバネーションモードに移行すると、ドッキングステーションのアダプタへの電源供給が停止されます。

注意：コンピューターとドッキングステーションとの組み合わせによっては、ドッキングステーションにつないであってもシステムがサスペンド／ハイバネーションモードに移行しない場合もあります。詳細はドッキングステーションの説明書をお読みください。

b) このオプションを無効にすると、Fn+F4キーかFn+F12キーを押したときシステムはスタンバイモードに移行します。スタンバイモードではスクリーンはオフになりハードディスクも停止しますが、ドッキングステーションのアダプターへの電源供給は続行されます。


このオプションを選択すると、電源スイッチをオフにしたときにシステムがハイバネーションモードに入ります。


このオプションを選択すると、サスペンド時間が経過したときにシステムがハイバネーションモードに入ります。サスペンド時間を設定するには、電源モードのページをご参照ください。


このオプションを選択すると、バッテリーの残存量が少なくなったときにシステムがハイバネーションモードに入ります。


このオプションを有効にすると、サスペンド時間が経過するとシステムは自動的にハイバネーションモードに移行します。タイマーは30、60、90分に設定できます。


各ハイバネーションオプションを表示します。


システムがサスペンドモードから回復する日にちと時間を指定してください。［毎日］を選択すると、システムは毎日同じ時間に回復します。


現在選択されている電源と電源モードの設定を表示または変更します。

注意：このグループに表示される項目は、選択した電源モードがフルパワー設定か最省電力設定のときは、すべて読み取り専用となります。


現在の電源の電源モードを表示します。

設定可能な電源モード：

∗	フルパワー設定

∗	最省電力設定

∗	カスタマイズ