Copyright: Copyright, IBM Corp. and others  1998, 2002


ThinkPadの設定のヘルプ

メニュー

バッテリーメーター

注意

バッテリーメーターの商標とサービスマーク


バッテリーメーター

このアイコンをクリックすると、バッテリーメータープログラムが呼び出されます。このプログラムでは次のものが表示されます。

1) バッテリーの残存量を視覚的に表示します。

2) 電源モードの状態（フルパワー設定／最大省電力設定／カスタマイズ）

   - 電源モードを変更するには、電源モードアイコンをダブルクリックするか、Fn+F11キーを押してください。

3) 電源（AC／バッテリー）

4) バッテリー充電状態

バッテリーメーターウインドウには次のボタンが表示されます。

 サスペンドボタン

- サスペンドモードに移行します。また、Fn+F4キーを押してもサスペンドモードに移行できます。

 ハイバネーションボタン

- ハイバネーションモードに移行します。また、Fn+F12キーを押してもハイバネーションモードに移行できます。

Fn+F2キーを押すとバッテリーメーターウインドウを表示したり、隠したりします。


商標とサービスマーク

次の製品名およびブランド名は米国IBM社の商標およびサービスマークです。

IBM

PS/2

ThinkPad

OS/2

次の製品名およびブランド名は各社の商標です。

Microsoft	Microsoft Corporation

Windows	Microsoft Corporation

PCMCIA	Personal Computer Memory Card International Association


サスペンドモード

コンピューターがサスペンドモードに移行すると、実行中のタスクはすべて中止され、デバイスもオフになるか低電力状態に入ります。メモリーの内容はバッテリーかACアダプターからの給電によりメモリー内に保管されます。システムが通常モードに復帰したら、システムがサスペンドされたときの状態に戻ります。


ハイバネーションモード

コンピューターがハイバネーションモードに移行すると、実行中のタスクをすべて中止して、コンピューターがシャットダウンされる前にメモリの内容をすべて保存します。システムを再びオンにすると、コンピューターがこの情報を読み戻し、コンピューターがハイバネーションモードに入ったときの状態に戻ります。