{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"PROGRAM","type":"character","width":56},{"name":"POPIS","type":"character","width":40},{"name":"CESTA","type":"character","width":52},{"name":"NIC","type":"character","width":1}],"n_rows":3,"rows_kept":3,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_other","reader":"statdb_count/12"}
["nc","Norton Commander 4.0",null,null]
["t602","Textov\u0098 editor T602",null,null]
["q4cs","QUATTRO 4.0",null,null]