{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"CBYTE","type":"character","width":1},{"name":"NAZEV","type":"character","width":8},{"name":"PORT","type":"character","width":4},{"name":"POC_RAD","type":"number","width":1,"decimals":0},{"name":"DEL_RAD","type":"number","width":2,"decimals":0},{"name":"INT_EX","type":"character","width":7},{"name":"KOD_IND","type":"character","width":19},{"name":"KOD_2RA","type":"character","width":19},{"name":"KOD_CUR","type":"character","width":19},{"name":"POC_PAR","type":"number","width":1,"decimals":0},{"name":"DFONT","type":"character","width":83},{"name":"POZNAMKA","type":"memo","width":10,"read":false}],"n_rows":1,"rows_kept":1,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"foxpro_two","encoding_class":"enc_other","reader":"statdb_count/12"}
["1","POS 2x20","PRIV",2,20,"INTERN\u008b",null,null,null,2,"di20_ipc.bin",null]