{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"CBYTE","type":"character","width":1},{"name":"NAZEV","type":"character","width":8},{"name":"PORT","type":"character","width":4},{"name":"INT_EX","type":"character","width":7},{"name":"SEZ_PAR","type":"character","width":120},{"name":"DFONT","type":"character","width":83},{"name":"POZNAMKA","type":"memo","width":10,"read":false}],"n_rows":2,"rows_kept":2,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"foxpro_two","encoding_class":"enc_other","reader":"statdb_count/12"}
["1","DRAWER 1","PRIV","INTERN\u008b","1","supl_ipc.bin",null]
["1","DRAWER 2","PRIV","INTERN\u008b","2","supl_ipc.bin",null]