*** IMAGEAXS AND IMAGEAXS PRO UPGRADE ***

Thank you for installing ImageAXS, and welcome to the power and elegance of the ImageAXS product line.  Digital Arts & Sciences Corp. has worked hard to create an image management system which helps you take full advantage of the speed and storage capacity of Iomega's ZIP drives. Your ZIP drive gives you extra storage space for those multimedia files; now use ImageAXS to organize and present those files.  And if you want to do more, the rest of the ImageAXS product line is the solution for you!  Check out our special upgrade pricing for registered users:

GET UNLIMITED!

ImageAXS (Record-Unlimited Version)-- $29.99

Until now you've been organizing your multimedia files into collections of 100 records. If you like ImageAXS so far, you'll like it record-unlimited even more!  Create collections of thousands upon thousands of records!  Catalogue as many images as your system can store!  Visit our website today for upgrade information!

GET PROFESSIONAL!

ImageAXS Pro--  $129.99

Want to create collections of unlimited records?  Want to publish your images to the World Wide Web?  Want to create stand-alone browsers for distribution to your friends?  Want to open multiple collections at once?  Want to create collections with an unlimited number of fields?  Then you need ImageAXS Pro-- the professional solution for image management.  To upgrade to ImageAXS Pro, visit our website today!

GET CD AUTHORING!

ImageAXS CD Authoring Kit

Once you've got an attractive, elegant ImageAXS collection, we bet you'll want to share it with others, and we've got the solution for you.  Whether you want to sell your collection to thousands, or make it a gift for loved ones, the ImageAXS CD Authoring Kit gives you the tools you need.  The CD Authoring Kit includes a license to distribute a read-only version of ImageAXS, as well as instructions for authoring your own CDs.  Visit our website today to see what the ImageAXS CD Authoring Kit can do for you!

GET ONLINE!

The Digital Arts & Sciences website:  http://www.dascorp.com

Visit our website today to order your upgrade, to download a free evaluation copy of any of our products, or just to look around.  While you're there, don't forget to register your copy of ImageAXS!

If you don't have internet access-

email us--	sales@dascorp.com

OR send us a  FAX:               	510-814-6100

OR write us: 	Digital Arts & Sciences Corp.

Attn:  Iomega Sales