@176
ALERT CAUSE: A fatal error has occurred.

CORRECTIVE ACTION: View the Backup Exec Job Manager NLM window for details.

@177
ALERT CAUSE: The tape currently in the tape drive needs to be replaced.

CORRECTIVE ACTION: View the Backup Exec Job Manager NLM window for details.
Replace the tape.

@181
ALERT CAUSE: Tapes need to be inserted in the tape drives.

CORRECTIVE ACTION: View the Backup Exec Job Manager NLM window for details.

@182
ALERT CAUSE: The tape in the drive has been rewound.

CORRECTIVE ACTION: View the Backup Exec Job Manager NLM window for details.

@186
ALERT CAUSE: Backup Exec has come on-line.

CORRECTIVE ACTION: No action is required.

@184
ALERT CAUSE: Backup Exec has been taken off-line.

CORRECTIVE ACTION: No action is required.

@185
ALERT CAUSE: Backup Exec has been taken off-line.

CORRECTIVE ACTION: No action is required.

@180
ALERT CAUSE: Backup Exec needs a tape to be inserted in the drive.

CORRECTIVE ACTION: View the Backup Exec Job Manager NLM window for details.

@179
ALERT CAUSE: Backup Exec is requesting a keystroke to complete an operation.

CORRECTIVE ACTION: View the Backup Exec Job Manager NLM window for details.

@178
ALERT CAUSE: The tape is not inserted in the tape drive correctly.

CORRECTIVE ACTION: Re-insert the tape in the drive.  View the Backup Exec
Job Manager NLM to make sure there is not another problem.

@END
