Copyright: Copyright © 1997 MicroMouse Productions
Citation: Copyright © 1997 MicroMouse Productions


Contents

Readme document for AccuTrans 3D

Installation

Security

Comments

Pricing

Order Form


Installation

Create a temporary folder and unzip the distribution zip file to this directory.

Click on the 'Start' button on the Windows Task Bar to open the Start Menu.

From the Start Menu click on the 'Run' menu item to open the 'Run' dialog box.

Click on the 'Browse' button to open the 'Browse' dialog box.  Select the drive and directory that contains the AccuTrans 3D installation files.

Select the Setup.exe file and click on the 'Open' button.

In the 'Run' dialog box click on the 'OK' button.

Follow the on-screen prompts to complete the installation.

After installation is complete delete the temporary folder and its contents.

Note:

When the installation starts a 'Setup' dialog box is opened and the Installshield Wizard is loaded.  A problem can occur where the program operation stops when the file has only been 40% loaded.  If this happens press the CTRL + ALT + DEL keys.  After a new dialog box opens select the 'Setup' program and then press the 'End Task' button.  Now try to install the program again.  If trouble persists try the installation immediately after rebooting the computer.


Security

The program has a security module that allows you to examine a fully working version of AccuTrans 3D for one trial period.  This trial period lasts for 30 days or 120 runs, whichever occurs first.  The number of runs available decreases by 4 runs per day.  At the end of the trial period or when the security module detects a security violation the file save module will be disabled.  Please read the security section in the main help file, at3d.hlp.

Each installation of the program creates a unique serial number.  Send this serial number and the license fee to MicroMouse Productions.  You will be sent a password which will activate all features of the program.


Comments

Please email all comments on the program whether positive or negative to MicroMouse Productions at micromouse@cableregina.com.

Even if you decide to not pay the license fee your comments would be appreciated.


Pricing

The price you pay for software is divided into three parts: retail, distributor and manufacturer.  By ordering direct from MicroMouse Productions you pay only the manufacturer's component.

As everyone was a student at some time, there is no special student's price and this was taken into consideration when setting the price.

Regular Price (License Fee)

US $ 99.00    (in United States currency)

Special Introductory Price (License Fee)

US $ 60.00   (in United States currency)

.  this price is in effect until July 31, 1997.

Payment Terms

.  Price must be paid in full before password will be released.

.  No refunds as you have already tested the software.

.  Customers from the United States and other Foreign Countries can pay by

.  International money order in United States dollars.

.  By VISA credit card.  Billing will be in Canadian dollars calculated at the daily exchange rate.

.  Canadian Customers

.  Pay by cheque, money order or VISA credit card

.  Regular Price:  C$ 130.00 (in Canadian currency)

.  Special Introductory price:  C$ 80.00 (in Canadian currency)

.  Saskatchewan residents add 7% PST.

.  Canadian customers add 7% GST.  Order quick and avoid the GST charges.  Until the sales reach a certain yearly total the GST does not have to be collected.


Order Form

AccuTrans 3D

Version 2.0

Name:       ___________________________________________________

Company:  ___________________________________________________

Address:   ___________________________________________________

CIty:  __________________________  Province/State:  ________________

Postal/Zip Code: _________________  Country:  _____________________

Voice Phone:  ___________________  Fax:  ________________________

E-Mail:  _____________________________________________________

AccuTrans 3D Serial Number:  ____________________

                                                     Price:    ______________

           7% PST (Saskatchewan residents)    _______________

          7% GST (Canadian residents)            _______________

                                                       Total:  _______________

Paid by:   _____ cheque       ____  money order     ____ VISA

VISA Orders:

Card Number  ___________________    Expiration Date  ______________

Exact Name on Card  __________________________________________

Signature:  ___________________________________________________

Mail Orders To:  MicroMouse Productions

                        847 Athol Street

                        Regina, Saskatchewan

                        Canada   S4T 3B6

Fax Orders To:  (306) 522-9799

Voice Phone:  (306) 522-6077